# fc432554574a42f6c5c7025262f18aef

Unknown

To my dear wife and friend

Dr Irina Dmitrieva,

My only Love¾


Digital Proofer

Energy Fields Electr...

Authored by Konstantin G Korotkov

6.0" x 9.0" (15.24 x 22.86 cm)

Color on White paper

236 pages

ISBN-13: 9781499216264

ISBN-10: 1499216262

Please carefully review your Digital Proof download for formatting, grammar, and design issues that may need to be corrected.

We recommend that you review your book three times, with each time focusing on a different aspect.

Check the format, including headers, footers, page 1 numbers, spacing, table of contents, and index.

Review any images or graphics and captions if applicable.

2

Read the book for grammatical errors and typos.

3

Once you are satisfied with your review, you can approve your proof and move forward to the next step in the publishing process.

To print this proof we recommend that you scale the PDF to fit the size of your printer paper.

Dr. Konstantin Korotkov


ENERGY FIELDS

ELECTROPHOTONIC ANALYSIS

IN HUMANS AND NATURE


Be governed by your knowledge, and proceed

I’ the sway of your own will

William Shakespeare

King Lear IV, 7


ENERGY FIELDS ELECTROPHOTONIC ANALYSIS

IN HUMANS AND NATURE

Contents


Dr. Konstantin Korotkov

INTRODUCTION . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6


Highs and lows of modern medicine . . . . . . . . . . . . . . . . . . . . . .

7


Principles of the systemic approach in biology. . . . . . . . . . . . . . . 10

This book presents the state of the art, principles and ideas of Electrophotonic The concept of a biological field . . . . . . . . . . . . . . . . . . . . . . . . .

15

analysis based on Gas Discharge Visualization (GDV) technique, known as What is Consciousness? . . . . . . . . . . . . . . . . . . . . . . . . .. . . . . .

17

well as Electrophotonic Imaging (EPI). This approach, celebrating now 20

PART I: GENERAL PRINCIPLES OF ELECTROPHOTONIC

years after developing the first GDV instrument, has a strong scientific (GDV) ANALYSIS . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

27

foundation with thousands of researchers, doctors and practitioners using it in Technology . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

29

the world. Electrophotonic methods allow to study Energy Fields of humans, Advantages of the EPI/GDV Bioelectrography technique . . . . .

30

water, materials and environment. Conceptual background and practical Indications for the application of the EPI technique . . . . . . . . . .

31

approaches are presented in this book.

Material and technical support . . . . . . . . . . . . . . . . . . . . . . . . . .

32


Scientific Evaluation . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

34

Second updated edition

What does the EPI method measure in physical terms? . . . . . .

35


Can this emission take place without an electric field? . . . . . . .

36

Translated from Russian by the author

What does the EPI method measure in biophysical terms? . . .

37

Edoted by Berney Williams and Lutz Rabe

Where does the electronic current in the body come from? . . .

38


What is energy? . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

41


What is biological energy? . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

42

ISBN-13: 978-1499216264

What does the EPI method measure in physiological terms? . .

43

ISBN-10: 149921626

What is the sensitivity of the EPI method based on? . . . . . . . . .

46


The influence of mental, emotional and spiritual processes on

© 2014 Korotkov Konstantin

EPI/GDV images . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

46

PART II: PRACTICAL BASIS OF ELECTROPHOTONIC (GDV) ANALYSIS . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

49

EPI images with and without filter . . . . . . . . . . . . . . . . . . . . . . .

39

EPI/GDV Diagram program . . . . . . . . . . . . . . . . . . . . . . . . . .


56

Parameters of BIO-gramsused for the analysis . . . . . . . . . . . . .

57

EPI Software Design . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

62

L-R symmetry . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

66

Analyzing Human Energy Field . . . . . . . . . . . . . . . . . . . . . . . .

68

Heightened Awareness Zones . . . . . . . . . . . . . . . . . . . . . . . . . .

78

Stability of data . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

85

Recommended procedures for recording BIO-grams. . . . . . . .

87

Statistical distribution in EPI glow parameters of fingers . . . . .

89


Energy Fields Electrophotonic Analysis 5

In this book we use the following abbreviations: PART III: THE CONCEPT OF HOMEOSTASIS LEVELS IN

ELECTROPHOTONIC (GDV) BIOELECTROGRAPHY

93

1L,

2L…..5L fingers of the left and right hands, correspondingly, Levels and Zones of Homeostasis . . . . . . . . . . . . . . . . . . . . .


95

and 1R……5R

beginning from thumb to little finger

Particular features of EPI data for different homeostasis levels 100

2L/3

3rd sector of 2L finger

H (Health) homeostasis zone . . . . . . . . . . . . . . . . . . . . . . . ..

100

HS (Health + Stress) homeostasis zone . . . . . . . . . . . . . . . . .

103

ADP

ADP is the product of ATP dephosphorylation by P (Pathology) homeostasis zone . . . . . . . . . . . . . . . . . . . . . . .

120

ATPases. ADP is converted back to ATP by ATP

ASC (Altered States of Consciousness) homeostasis zone . .

138

synthesis

PART IV: THE REFINEMENTS OF ELECTROPHOTONIC (GDV) ANS

Autonomic nervous system

ANALYSIS . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

141

ASC

Altered State of Consciousness zone of homeostasis Noise level . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

142

Stress examples . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

145

ATP

Adenosine triphosphate, the main energy storage and Sectorial analysis of BIO-grams. . . . . . . . . . . . . . . . . . . . . . . 147

transfer molecule in the cell

Basic rules of EPI analysis . . . . . . . . . . . . . . . . . . . . . . . . . .

159

CNS

Central Nervous System

Monitoring of the patient’s condition during treatment . . . . 164

Dynamic EPI capture . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

165

D wF and D

D F

Diagram without filter, and Diagram with filter, Analysis of psychological condition . . . . . . . . . . . . . . . . . . .

139

correspondingly

Using EPI parameters when analyzing data . . . . . . . . . . . . . 168

EF

Energy Field

Energy fields, meridians and chakras . . . . . . . . . . . . . . . . . .

171

EPC

Electrophotonic Capture

PART V: ENVIRONMENT SCAN AND REMOTE

DETECTING OF HUMAN EMOTIONS . . . . . . . . . . . . 173

EPI

Electrophotonic Imaging

Non-local consciousness influence to physical sensors 179

EPI wF and EPI-grams taken without filter and with filter, PART VI: DIFFERENT RESEARCH LINES . . . . . . . . . 189

EPI F

correspondingly

Electrophotonic Analysis of Arterial Hypertension. . . . .. . 189

Express-evaluation of the psycho-physiological condition F, wF

Filter, without Filter

of the Paralympic athletes . . . . . . . . . . . . . . . . . . . . . . . . .. . 198

GDV

Gas Discharge Visualization

Comparative assessment of the impact of drinking water quality on the athletes’ condition during exercise. . . . . . . .. . 206

HS

Health + Stress zone of homeostasis

Can a bird fly across the Atlantic? . . . . . . . . . . . . . . . . . . . 214

JSR, JSL

Parameter “Integral Area” from the Diagram program References. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 219

Acknowledgments . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 233

L

Left hand


R

Right hand


SD Standard

Deviation

H

Health zone of homeostasis

P

Pathology zone of homeostasis

6 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 7

Introduction

Highs and Lows of Modern Medicine

The current manual is for those who are actively working with EPI/GDV


technology. In recent years, continuing research has accumulated a large The miserable have no other medicine

volume of experimental data, and doctors have created patient databases with But only hope

detailed analysis. This data makes it possible to formulate a number of new William Shakespeare

approaches and ideas. The main purpose of this book is to help experts, Measure for Measure, III, 1

doctors, psychologists and researchers to interpret EPI Bioelectrography data.


Considering the diverse levels of training and qualifications among our readers, Medicine at the beginning of the XXI century we have tried to present the information simply and directly, and without the use of specialized terms and mathematical expressions wherever possible. For Western medicine has achieved tremendous breakthroughs by the beginning this reason, we only touch briefly on the question of EPI parameters and their of the XXI century: major infectious diseases have been defeated, surgeons use when interpreting data. This book is written in the style of a study aid aimed perform heart and kidney transplantations on a daily basis, modern computer at learning and consultation rather than for light reading. The material is technologies allow monitoring human organs in vivo. Glimmering displays, reviewed with many examples. By reading the book and looking at the images, subtle biochemical and genetic analyses, a vast inventory of medicines and you will easily assimilate the principle of EPI data analysis.

drugs. One would think that all diseases must retreat before this multibillion This book summarizes the work of hundreds of people busy with dollar onslaught. However, this is far from the truth.

development, research and practical work in EPI Bioelectrography. It is not At the beginning of the XXth century various infectious diseases, as well as possible to name all those involved in this work, and it is difficult to single out other acute illnesses, prevailed; however, by the beginning of the 21st century individual contributions, which is why we would like to thank all those who the leadership went to chronic and systemic disturbances of health. And the gave of their energy, knowledge and spirit to create and develop the method fact that people in developed countries have a longer average lifespan now is of EPI Bioelectrography. Each year the circle of professionals using the EPI not accountable for this – many diseases that previously were common only method in their work widens, and new research opens undreamt of horizons.

for elderly people have suddenly grown much ‘younger.’ In particular, We are sure that these are but the first steps in the vast new continent which childhood diabetes is becoming more and more common, whereas only 2 or is opening itself up to us.

3 decades ago it used to be an extremely rare disease. Recent studies showed From 1996 every July in Saint-Petersburg Russia International Scientific that almost 20% of American children and teenagers have their coronary Congress “Science, Information and Spirit” hosts hundreds of professionals and arteries affected by atherosclerosis plaques. In Scotland, the incidence of interested people from all over the world. Several workshops dedicated to GDV

autoimmune diseases among children and teenagers has grown twofold during technology are being held every year in different countries. As Professor Albert the past 10 years. In Russia, not more than only 12% of primary school Krashenjuk sad: “We can name quite a few new scientific lines which may host students and not more than only 5% of secondary school students are scientific congresses every year for 15 years”. We welcome everybody to Saint absolutely healthy. The majority of children suffer from chronic diseases. The Petersburg every July in the time of White Nights and scientific celebration.

number of children suffering from cardiovascular diseases, for example, has We appreciate any comments and updates. Please contact us via grown increased by more than a half during the period from 1989 to 1998.

www.bio-well.eu and www.ktispb.ru

Many of such these children have been disabled since their childhood.


The number of people suffering from various allergic diseases is growing fast.

The disease incidence has grown by 30-40% as compared to the previous

8 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 9

decade, and in some countries as much as a half of the whole population This situation is no coincidence. It results from the main concept of the manifests classic symptoms of allergy. More and more people are suffering Occidental Allopathic medicine – treating the disease, and not the person.

from chronic skin diseases with uncertain causes, such as eczemas and Each field of medicine concerns itself only with particular organs or systems; psoriasis, and from various smouldering inflammatory diseases of internal each physician offers his or her own special set of medicines – extremely organs, joints and musculoskeletal system, to the and irritated bowel strong chemicals that influence certain regulatory processes of the organism.

syndrome and other chronic diseases of the gastrointestinal tract. 26% of the Simultaneous prescription of several drugs without clear understanding of the USA population and 41% of the population of Great Britain manifest nature of their interaction is quite common. Official statistics tell us that in the symptoms of the digestive disorder (dyspepsia). In a significant number of USA 97,000 patients die every year due to errors in prescription of drugs.

patients, non-ulcerous dyspepsia later transforms into serious organic lesions,

“Living organisms are just incredibly complex machines”

sometimes even cancer. For many patients, the chronic course of somatic diseases is complicated with a tendency towards neurosis and depressions. In R.Dawkins. The Selfish Gene. 1993

many countries more and more patients are diagnosed as having such major This point of view, expressed by one of the leading most widely read genetic systemic disturbances as the chronic fatigue syndrome, seasonal depression, theorists of modern time, became prevalent in medicine and biology as early and the syndrome of childhood hyper excitability hyperactivity with distracted as in the end of the XVIII century, and originated from the vigorous progress attention deficit disorder.

of technical sciences based on mechanist, reductionist and chemical Until recently, not all physicians regarded the overweight or obesity problems approaches. Breakthroughs in chemistry in the XIX-XX centuries gave rise to as clinically significant diseases. Now the correlation between being overweight an illusory idea that processes within the organism can be controlled just like and having serious chronic disorders is becoming obvious evident. 30% of the reactions in a test tube.

adult population and 50% of the elderly population of developed countries The whole entire XX century passed by the motto with a goal of refining our have body weight substantially above healthy standards, and the problem knowledge of molecular processes in biological systems. New subtleties of keeps getting worse. Medical statistics of the USA say that 45% of all patients chemical processes kept surfacing, new classes of substances roused suffering from hypertension, 85% of diabetics and 35% of all ischemic heart enthusiasm of in the scientific community and the Nobel prize committee, disease patients are obese. The mortality rate of obese cancer patients is 30-and industry responded by creating more and more new classes of synthetic 50% higher than the average mortality rate of patients with normal weight, and drugs. Each year promised the general public that all diseases would be cured, for such cancer types as the rectal or prostate cancer in men and endometrial as soon as the clinical tests of yet another ‘Kremlin pill’ are completed. The cancer in women the difference associated with obesity is fivefold.

epic project for mapping of human genes played a very important part in this Thus, a typical present-day patient is chronically ill, usually with diseases that industrial and financial race. Genetic drugs have already begun their assault afflict several physiological systems at the same time. Quite often, placing a on the purses of consumers, not to mention genetically modified foods.

disease within a certain class, for example the class of cardiovascular pathology The extent of the threat that these achievements pose for the health of or diabetes, reflects only a set of the most pronounced symptoms, whereas humanity can be assessed merely by looking at the population of the most what happens in reality is the reciprocal influence of various pathologic prosperous country in the world – the United States. The number of chronic manifestations, which significantly complicates the diagnostics. The systemic childhood diseases is growing there every year, and in the USA a situation nature of chronic diseases and their polyetiology (or, most likely, uncertain when a person can no longer fits into a standard chair, or requiring an etiologies) seriously encumber both prevention and treatment of such extension of the automobile or aircraft seat belts by means of extra straps, is diseases.

now considered quite normal. The USA population has already become genetically modified in many ways.

10 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 11

The number of synthetic medicines is ever increasing, the prices keep on x

First, “all living matter is characterized, first of all, by self-induced growing, the production volume of pharmaceutical business has outdone the changes of its state, i.e. changes of state that are not caused by any heavy engineering industry, and this business has no time for the individual external factors outside said living matter.”

person, with his/her particular problems and stresses. A human being is x

Second, “in any kind of environment all living matter works against the replaced by a diagnosis based on the set of symptoms. And then the diagnosis equilibrium that should take place within given environment for the is treated, not the individual. This Any particular John Smith can only get in given initial condition of the system.”

the way of the process with his emotions. The only exception to this rule is x

possibly the infantile paediatrics, since because paediatricians monitor the Third, “upon any kind of external influence and, therefore, upon any development of a child.

change of the environment, the system must perform work that would influence the alterations of state induced by said external influence, thus Thus, until you have strongly pronounced symptoms of some disease, turning changing them.”

to the classic Occidental Allopathic medicine is pointless. No one will even listen to you.

The described principles correlate with modern ideas on self-organizing systems, developed by the schools of I.Prigozhin and G.Haken. According to Principles of the systemic approach in biology S.E.Shnol – a prominent Russian biophysicist – the following is directly related to the problems in question:


1)

thermodynamics of irreversible processes;

At the same time, in the beginning of the past century Russia became home to a new line of thought that regarded the condition of a human as a systemic 2)

information theory;

issue, and the life in Universe as a structural process.

3)

bioenergetics (ways and mechanisms of energy transformation in

“Synthetic study of natural phenomena – its natural bodies and the biological processes);

nature itself as a ‘whole’ – inevitably reveals some structural properties 4)

physics and physical chemistry of biologically important that are left out when taking an analytic approach and gives new insights.

macromolecules.

This synthetic approach is now quite popular, both within scientific and This list should also include the concept of cyclic influences of cosmic philosophic pursuits. The most noticeable result of this approach is the processes in biology, especially by the Sun. The prominent Russian scientist fading of borders between sciences – we perform scientific study of A.L. Chizhevskiy was the first to draw attention towards these issues. He problems with no regard for scientific limitations.”

developed and validated the principle of ‘cosmic determinism' – the Vernadski V.I.

dependence of terrestrial biological cycles on Earth on the cosmic activity.

“Life is an uncontainable, structured, goal-oriented process.”

“We are used to the crude and narrow-minded antiphilosophical idea Gurvich A.

of life being the outcome of a random interplay of solely terrestrial In 1935 Bauer formulated the fundamental functioning principle of biological forces. This, of course, is wrong. We can see that life is more of a systems and called it “the principle of the permanent inequilibrium.”

cosmic phenomenon than an earthly one. It has been created by the

“All and only the living systems are never in equilibrium and are using influence of creative dynamics of the Cosmos on the inert material of their free energy for continuous work against the equilibrium that is Earth. It lives by the dynamics of these forces, and every organic required by the laws of physics and chemistry under current external pulsation is harmonized with the beating of cosmic heart – the conditions.”

enormous congregation of nebulae, stars, the Sun and the planets”.

Bauer E.

Chizhevskiy A.L.

According to Bauer, this principle arises from the three main postulates, to which the living systems must conform.

12 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 13

Nowadays these issues have been extensively studied by hundreds of scientists In the Western industrial countries this process has led to the creation of new all over the world and do not longer cause such controversy as in medical trends that still have not been properly structured and sometimes do Chizhevskiy’s time. Ideas of the rhythmic of life in all its manifestations –

not even have a universal name.

from an individual person’s cycles of activity, such as neurohumoral and endocrine processes, to the macro scale rhythms of the society – have ALTERNATIVE MEDICINE .

permeated all layers of society and received public recognition. All the more, COMPLEMENTARY MEDICI NE.

we have increasing understanding that those rhythms are directly related to INTEGRATIVE MEDICINE .

our everyday life and health.

ENERGY MEDICINE.


HOLISTIC MEDICINE.

Fundamental trends of medicine of the XXI century SYSTEMIC MEDICINE.


These titles can be seen in journal captions, in names of professional It is becoming obvious that the XXI century calls for a new medical paradigm, communities, in lectures at international conferences. Although there is still a new approach towards health and treatment.

some confusion about the name of the trend, the trend itself has already grown Many physicians and researchers have been developing the principles of this mature, has manifested itself and proved its right to exist. This “novel” medicine new approach; in particular, these principles are described in the book Logic employs an overwhelming variety of methods: from acupuncture, homeopathy, of Health by the Moscow physician Anatoly Volkov, who based his book on electric and magnetic therapy, to psychosocial and informational stimulations.

years of medical practice and treatment of hundreds of patients saved from All these different approaches are united by the one main principle – the idea the most serious illnesses.

of a human as a unified system, and the concept of influencing the whole x

“Health is an optimal state of the organism that implies adequate hierarchy of processes uniting the material body, mind and soul.

reaction of the organism towards any kind of external stimuli.

A human being is neither a machine, nor a computer, nor a chemical x

laboratory – it is God’s creation, the summit of evolution of biological A human organism is a self-regulating system that may be corrected just life on Earth.

a little, but must never be regulated from outside.

This changes the whole goal setting of medicine as a practical discipline. The x

An organism that provides an adequate response to external stimuli main purpose of contemporary Occidental Allopathic medicine is to cure does not need any drugs. Therefore, medicines and drugs should only diseases. At the same time, all physicians understand that terminating a be used for emergency medical treatments.

malignant process at an early stage is much easier than doing so during acute x

Any treatment should aim at restoring the natural level of the manifestations of pathology. Many people could have been saved from heart organism’s adaptability to external stimuli, except when some functions attacks or strokes if underlying corresponding processes had been secured of the organism have been irreversibly lost. “

and understood prior to clinical manifestations. The majority of tumours discovered at early stages can be successfully treated with contemporary We can see that these ideas have a lot in common with the views of great methods.

ancient physicians, from Hippocrates, Galen and Roger Bacon to the Eastern Therefore, one of the main tasks of the XXI century medicine is the philosophers – Israeli, Chinese, Korean and Indian.

creation of a system of early diagnostics and disease prevention, in other What is happening today in the modern European world is a gradual return worlds – the transition to individual preventive medicine, a medicine of to those ideas, to a wider understanding of the nature of human beings and health. Preventing diseases rather than treating them – this is the goal our place in the Universe.

of the ‘new’ medicine.

14 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 15

Everything new is old again, the saying goes. The concept of prevention has So, the first stage of treatment in integrative medicine is the assessment of the always been the foundation stone of the Eastern medicines. In ancient China, a health condition. It must include several elements: family physician received payment only as long as all family members were x

Biochemical blood assay;

healthy. Whenever someone fell ill, the payment stopped. No wonder that x

Genetic status;

physicians went to great pains to preserve health of their patients. In contrast, in the Occidental Allopathic medicine we pay physicians when we are ill and x

Cardiac monitoring, preferably under load;

consequently… (one does not wish to draw offending conclusions). Part of the x

Blood pressure monitoring.

Eastern health system consists of meditation techniques, relaxation exercises, massage and hydrotherapeutic procedures – our contemporary medicine has Analysis of the biological energy emanations by means of the EPI method, only started to approach this. A whole complex of procedures had been with assessment of the psychological state and the level of stress.

developed for ensuring a healthy life in old age, whereas we have only started Depending on the result of these analyses, the physician may then prescribe a assimilation of such methods. Another important thing is that the methods of systemic treatment or recommend detailed examination of particular organs systemic, integrative, alternative medicine employ only natural ingredients.

or systems.

Modern synthetic drugs prove effective in the vast majority of cases, especially when saving the life of a patient or turning the tide of a health crisis. Not to The concept of a biological field

mention such drugs as Viagra. Contemporary medicine is a battlefield, when one has to save a patient’s life, without giving much thought to possible The issue of instrumental analysis is even more urgent in the field of secondary consequences.

psychophysiology. The developed methods of instrumental methods to study Natural medicines operate in a much milder way. As a rule, they do not provide of an individual’s psychophysiological state have a long ago started to appeal an immediate intense effect; they do their job over time, slowly but persistently to researchers’ history. After the first experiments of Gustav Fechner, it and successfully. Plant-based medicines can cure chronic illnesses or prevent became obvious that psychology is inextricably linked with physiology, that them from arising in the first place. Small doses of such medicines do not cause body and soul form a continuous and inseparable entity, a unified system that addiction or dependence, while functioning in an efficient manner over long-defines this particular human being as an individual in his/her social term periods. Apparently, natural substances have something that chemists just interactions, psychological and physical realities.

cannot synthesize. It might be the systemacity, the complexity of When we accept the idea of a multilevel structure of a human being that is microcomposition that disappears after they isolate the apparently active discussed in great detail in our publications, we come to understand the element.

inseparability of the psychological and the physical and the physiological parts.

We have conducted a large series of experiments, comparing the glow of We may represent this connection by means of a simple diagram: natural aromatic oils against their synthetic analogues with identical mass spectra, i.e. having virtually identical chemical composition. In the majority of Soul => Brain => Nervous system => Physiology cases the glow dynamics of natural oils and their synthetic analogues differed.

or, in other words:

Therefore, natural products do contain some elusive element that chemists Spirit => Consciousness => Soma

cannot determine, that gives the natural apple its flavour and provides flagrance to the blossoming rose. Maybe it is a good thing chemists cannot Only when a person lives for his/her soul, enjoying the company of friends find it. Or we would be eating paper smelling like steak. Having McDonald’s and relatives, enjoying his/her occupation, he or she can truly appreciate life, everywhere is already quite enough, thank you very much.

in all its fullness and perfection. That is why the concepts of spirituality and

16 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 17

metaphysics inevitably penetrated the contemporary Occidental science and What is Consciousness?

stimulated profound discussions at professional scientific forums.

“Psychophysiologists should not try to avoid the concept of a soul. Soul

“I sent my Soul through the Invisible,

incorporates intellect and mind, as well as the most important thing –

Some letter of that After-life to spell:

the experience obtained from phenomena of the world around us… In And by and by my Soul return'd to me,

other words, the difference between a professional and a specialist lies And answer'd “I Myself am Heav'n and Hel”

in the ethical core of the individual.”

Omar Khayyam (1048-1131)

V.A.Ponomarenko, M.D., Professor,

Member of the Russian Academy of Education.

‹”•–•–‡’‹•…‹‡…‡‹•–‘‰‹˜‡ƒ†‡ˆ‹‹–‹‘Ǥ‡‘’Ž‡‘ˆ–‡ƒ”‰—‡ˆ‘”

The accumulated experience of the past years supports a conclusion that the

Š‘—”•ƒ„‘—–…‡”–ƒ‹–‘’‹…•ǡ†‡ˆ‡†‹‰†‹ˆˆ‡”‡–’‘•‹–‹‘•ǡ„—–‹

concepts of spirituality and physiology can be usefully reflected by studying of

”‡ƒŽ‹–›ǡ–Š‡›ƒ”‡–ƒŽ‹‰ƒ„‘—–†‹ˆˆ‡”‡––Š‹‰•ǣ‡˜‡”›‘‡‡‡’‹

the biological field. Following the use of this term after by A.G. Gurvich, we

‹†Š‹•‘”Š‡”‘™—†‡”•–ƒ†‹‰‘ˆ–Š‡–‘’‹…Ǥ ‘Ž‡–—••–ƒ”–

use the concept of biological field not as a metaphysical abstraction, but as a

™‹–Š †‡ˆ‹‹–‹‘• ‘ˆ ™Šƒ– ™‡ —†‡”•–ƒ† „› –Š‡ –‡”

measurable psychophysical object. The Electrophotonic Imaging (EPI) ǲ‘•…‹‘—•‡••ǳǤ

method is one of the several possible ways of studying a biological field.

The history of attempts to build a rigorous, not intuitive definition of For the time being a reasonable approximation would be to view the aura as consciousness is rooted in the distant past. Moreover, all these attempts an energy field, more properly a field that can be represented by a stress-are inevitably based on an a priori division of the whole of nature into conscious and unconscious: the definition should only formally draw energy tensor which is not in Einstein-Minkowsky space-time; it is to form this border exactly where expected. Depending on this, the authors of structures in physical reality but only partly in physical space-time.

the concept make statements about the adequacy of the specific Numerous publications by scientists from different countries have shown that wording. Definitions based on this division, are subjective and, biased, the analysis of Electrophotonic images allows registering the radiation activity most often in favor of Homo sapiens. With this approach, avoiding from the biofield of any organism. The biofield emitted by the organism has logical tautology is not possible in principle.

a holographic structure, but it does not represent a constant, rigid formation Furthermore: being the foundation for experiments, such an approach

– rather, it is a living, fluctuating, breathing cloud, concentrated in a particular to the definition of consciousness inevitably leads to incorrect results.

area of space, but not limited by any rigid borders. The glowing halo around Thus, in the well-known experiment the experimenter removes the bell the body of an individual or his/her particular organs, for example an EPI-from the entrance to the wasp nest, and the wasp completes a new one.

gram taken from a finger, remains constant and stable for a certain period of Further, he makes a hole in the tube bend before the bell, and the wasp time and, therefore, two images taken with only a small delay will look almost builds both the tube, and the bell. “Aha!” says the experimenter, “Now the same. But now the individual starts thinking about how an upcoming you see, the wasp has no reason!” But if aliens, as an experiment, make meeting is going to take place – and the glowing image of the EPI-gram a hole in somebody’s trousers over and over again, the person will first changes, it shivers and a gentle wave passes throughout the structure, touching try to patch them, then he will buy new pants, but eventually he will its every section. They are like clouds – on a gloomy day clouds are stable, but throw them out of the window, swearing and pounding his feet. “Aha!”

we can detect changes even within this stability. Therefore, the biological the alien will say, “Now you see, Man has no reason!”

energy of humans reacts to ideomotor images and mental pictures, and an The reason here is that we assume a priori which behavior is reasonable EPI-gram can be useful for psychophysiological diagnostics of an individual’s and which is not. Experimenting not on ants and wasps, but on a man state.

working on an assembly line, you would find just as strong evidence that he is no more than a biorobot. The entertainment industry and a TV

18 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 19

program guide can provide us with even more impressive indication of Sheldrake “Dogs That Know Their Owners are Coming Home”

the total lack of human reason.

(1999). Seven experiments demonstrated that dogs were able to predict In our studies we use the following definition: their masters’ return and were waiting near by the door. We know many stories about conscious behavior of dolphins and elephants, not to Consciousness is a property (ability) of natural objects to form abstract mention monkeys and crows. All mentally healthy people have this representations of the outside material world, suitable for use in level of consciousness, albeit to different extents. Š‹Ž†”‡ ’‘••‡••

purposeful activity through sensory perception.

–Š‹•Ž‡˜‡Žƒ––Š‡ƒ‰‡‘ˆ–™‘Ǧ–Š”‡‡›‡ƒ”•Ǥ

In more simple form:

‹–Š–Š‡•‡ˆ‹”•––™‘Ž‡˜‡Ž•ǡ™‡ƒ›ƒ••‘…‹ƒ–‡–Š‡‘–‹‘‘ˆGroup Consciousness is the ability of a subject to react to environmental Consciousness. Š‹•‹•–›’‹…ƒŽˆ‘”ƒ‹ƒŽ•ǯ‹‰†‘ǡˆ”‘„‡‡•

information and change its behavior in accordance with this

ƒ†ƒ–•–‘ wolves, buffalo and deer. Same as it is typical for first stages information.

of human organization on tribal level. Group Consciousness allows them had better chances for survival in a hostile wild environment, and From this point of view, every living organism possesses consciousness: for most of these species, it is impossible to subsist without the group.

all animals, large and small above ground and under, in the air and in But this is very conservative rigid structure, which does not presume water; plants; microorganisms and every cell of our body. At the same further development.

time, inanimate subjects do not possess consciousness: stone may be warmed by the sun, but it will not move or change its color to avoid Next level of consciousness is the ability to generate new ideas, overheating.

exchange these ideas with others, transmit them to next generations and manifest them in objective reality.

But how about robots – in accordance with this definition the best of them samples possess consciousness?

Only humans possess this ability. Ants build their huts in the same way for millennia, as do bees, birds and many other animals. We cannot From our point of view, robots replicate elements of the consciousness explain how they achieved this ability, who taught them, but they never of their creators. Living beings are able to modify their features in case changed the structure of their constructions. Very rarely do they of rapid changes in circumstance even at the cost of death of part of the introduce new elements acquired by random trials. For humans, population. Of course, to some extent: out of millions of years during creativity is the basis of the development of civilization. Artists, poets, the kingdom of dinosaurs only crocodiles were able to survive. Robots architects, scientists, and many other creative people have advanced our may behave in accordance with a program, designed by engineers, and civilization, and the whole of today’s modern world is created only their ability to modify is quite limited. At least, within the limits of through the constant generation of new ideas. Some people generate known technologies.

new ideas, others turn them into reality. Many smart people reach this All discussions above are related to the first, basic levels of level of consciousness in their work, which allows them to take everyday consciousness.

decisions, based on knowledge, experience and intuition. All successful Next level of consciousness is the ability of a subject to predict future business people, politicians, teachers, engineers, builders and many events, remember past events, plan and modify its behavior to meet other professionals have to generate and use new ideas in their everyday future situations in accordance with their experiences.

practice. It is so common, that people often do not pay attention to this process. But only in this way can humankind develop and create new This level is characteristic of for higher animals and humans. All owners steps in our civilization.

of cats and dogs know that their pets may be very smart when it comes to not only their favorite food, but often to their relationships with their masters. Interesting examples were presented in the book by Rupert

20 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 21

A high level of consciousness is the ability to generate ideas, which are We do not need to mix Spiritual Teachings with human institutions, not based on the existing level of social development and knowledge Religious organizations are social structures, organized by particular and which transforms society, moving it to the next level of civilization.

people in specific socio-historical periods. They were initially designed All known and unknown to us geniuses of human civilization at this to help people in their everyday needs, to help them survive harsh level. They were creating in different fields: art, architecture, music, conditions, explain spiritual ideas in understandable words, but soon science, and we can easily distinguish outstanding names in every they were transformed into social institutions and have been used in the epoch. Their achievements were connected with the previous level of Power Games of Rulers. We know how many crimes have been the development, but did not follow logically from this level.

conducted under the name of God, millions of people have been Presumably, they did it by connecting to the Universal Information tortured and killed by religious fanatics, in religious wars, and this Field. Every one of them was creating something correlated with the process is not over yet.

particular level of civilization development, but much ahead of their All we discussed above is related to individual consciousness, but we, contemporaries. So very often they were not fully praised in their times.

humans, also possess a Collective Consciousness. We are the only Antonio Salieri (1750-1825) had much more successful career than creatures on Earth, which have both individual and collective Mozart (1756-1791); many of the impressionists died in poverty; consciousness. This is our powerful tool for development, for the Russian mathematician Nikolai Lobachevski (1792-1856), the creator creation of Civilization. We join our individual minds as neurons in the of non-Euclidian geometry, was ridiculed during his life; Dmitri brain, thousand times increasing group intellectual power. Formation Mendeleev (1834-1907), the creator of the Periodic Table of the of civilization became possible only when people started living in big chemical elements, was not elected to the Russian Academy of Science.

groups, when they formed first cities, generating extra products, which We may give multiple examples of this kind, but now their names are allowed more and more people not to be involved in the everyday written in the Golden Book of Human Geniuses.

struggle for survival. Combining their brains, their abilities, people were able to make the next steps in civilizational development. We’ll discuss And, finely, the highest level of Human Consciousness.

this topic in the following chapters.

Ability to accept direct information from the Higher Planes of Consciousness and convey this information to other people.

Of course, our definitions are only some of the possible way to discuss consciousness. You may find many different approaches in modern We can name particular people in known to us history, who was able science. Our aim was to give definitions, which we may use in our to reach this level. First of all, these are Great Spiritual Teachers, like research, developing experiments, which may help us to understand Moses, Zarathustra, Buddha, Jesus and Mohammed. They were able some enigmas of human existence.

to give people new understanding of their lives; formulate spiritual laws, which govern millions of people for thousands of years. In different The more we perceive the world around us, the more it startles us by words, in different languages they were speaking about the same things its complexity. The boundaries of our knowledge are continuously

– about human life, human soul and the role of humans in the moving aside, making the process of cognition in the ongoing race, Universe. Now we understand, that all religions give the same message, beyond the horizon. On this way, many obvious and universally they all have the same spiritual content, same deep meaning. Great accepted theses periodically become paradoxical and ambiguous; many Teachers were able to present people complicated spiritual ideas in representations die or radically change. The true way of all science goes simple, understandable words. In A short time their teachings have through crises and paradigm shifts to new crises. This path is endless, been accepted by millions of people, because they allowed every convoluted and tortuous, but there is no other way.

individual to reach new levels of spiritual development. Moreover, all A direct mechanical transfer of representations from the ant-hill to these teachings have existed for thousands of years, they do not die and human society is impossible; however, the study of these “parallel they transform in accordance with the development of society.

22 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 23

worlds” can give the same long-anticipated push for a new round of We did not mention such notions as “unconsciousness”, scientific development predicted by many scientists of the planet.

“subconscipusness” and “superconsciousness”, obligatory in modern Consciousness is the ideal category, the basic imperative along with psychology. You may find thousands of books discussing these topics.

Matter and Information. In modern sciencewe do not have – either in We presume that readers understand their meaning. The reason is medicine or in biology - the notion of consciousness; we only take the these are descriptions of brain functioning, interrelations between first steps in understanding this concept. Obviously, even just a different parts of the brain, in particular, left and right hemispheres, in transition to micro or macro-world is accompanied by changes in ideas the processing of received information. It is well known that we take in about what consciousness is, as it is difficult to talk about any expected much more information, than we are aware of. The brain processes all behavior. From a bird's eye view, people’s behavior on the streets of a the information and presents to our attention only a small part of it. This city, observed in time lapse is strangely reminiscent of an anthill or a process depends on a person, the situation at the time and the importance of the information. Intuitive people may process much more beehive.

information from the environment compared with less intuitive ones. In A worker on an assembly line, at first glance, behaves in the same way our definitions, this is related to activity at different levels of as an ant. However, this is only a superficial similarity. The assembly consciousness. I would say, they describe inner mechanisms of line for a worker is only one of his numerous functions: he can also be informational processing, while in our definitions we are focused on the the caring father of a family, an angler, a collector, a reader of novels, a outcome of this process.

spectator, or a member of a political party. When conditions change, In addition, it makes us look differently at the definition of the concept the worker can respond irrespective OF to his work program, and even in spite of it. The worker can go on strike and demand change in his of “consciousness”. This notion is a key in the area of sciences related conditions. We know nothing about the strikes of ants. Therefore, it is to man. The basic concepts of any scientific theory are primary, i.e., are beneficial to replace the worker with a robot, whose behavior is fully not defined in terms of other previously introduced concepts, but are consistent with the ant psychology.

introduced intuitively. They define the whole future course of possible arguments; a good example is to recall how different is the geometry of It is noteworthy that the rigid structure of a collective, being surprisingly Euclid and Lobachevsky- Riemann, with different primary definitions.

stable for ants and having ensured their survival for hundreds of millions of years with all the changes in the environment, turned to be totally These arguments inevitably lead us to a contradiction: an intuitive unsustainable for the human society; even being forcibly established and introduction of a term suggests that its meaning is equally understood guarded, it spontaneously disintegrates in an historically short term. We by all who use the relevant theory. The concept of consciousness is may see in history that any Empire exist about 1000 years, and then complex enough already to demand that it expresses itself (I cannot but disintegrates, being replaced by a new Empire. We observe this pattern recall the famous theorem of Gödel's incompleteness of formal throughout all human history, regardless of nation or continent. Some systems, which establishes the impossibility of judging the properties of social formations exist for much shorter periods, just seconds from an a system by means of the system).

historical perspective. The socialist system existed for 70 years, and At the same time in everyday life, we define the concept clearly enough.

quietly broke up without any pressure from outside. It is obvious that We say:

with the suppression of the Individual Conscience in the name of the

•

“a conscious man” about the individual who understands the Collective in human society, the fundamental laws of life of the nature of his actions and their possible consequences. From this noosphere, the laws of the stability of a complexly organized system are perspective, neither a drunkard, nor a criminal can be called conscious violated. The Communist model of the structure of a society is perfect people. Their behavior is contrary to the moral standards of society.

for protozoa and insects; however, all attempts to introduce it for people, Thus, we see that the term “conscious” has a moral and ethical

- beings with a more complex organization,- are not viable.

24 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 25

connotation and refers to people who understand and control their the particular part of the body, even one as powerful as the brain, but behavior in society. At the same time:

on the system as a whole. We may attribute some level of consciousness

•

to every cell of the body or to the particular organ, but to achieve high an “unconscious behavior” is the state when a person acts without level of consciousness we need coordinated activity of all the cells, all controlling his actions and does not understand their consequences.

the organs. Quantum electrodynamics operates with the notion of a A whole range of states can be between these two extreme situations.

system, consisting of many elements, that is why it may be applied to One popular option is when a person is aware of all that happened, but the construction of the theory of consciousness. You may find many acts in a completely unexpected way, both to him and to others. For papers, published on this topic, and, without being a mathematician, it example, spouses during a family quarrel can say things to each other, is absolutely impossible to understand their importance and meaning.

for which they will be very embarrassed. In a crowd of fans a man can Interested readers may refer to the works of Mari Jibu, Kunio Yasue, cry, fight and smash benches, although in real life he is quite a peaceful Emilio Del Giudice, Giuseppe Vitiello and some other prominent citizen. Another extreme is the phenomenon of “out of body theoreticians. Good luck and I praise you if you will be able to experience” when a patient being on the operating table under general understand their content. We may only believe that at some stage they anesthesia, watches everything that is going on though detached from will be able to construct a self-consistent theory of consciousness. I will the event.

let you know when it will happen…

Thus, to avoid all these difficulties, in modern science it is customary Fig 1 presents main ideas on the Levels of Consciousness. Group to speak of a “normal” awakened consciousness and various deviations consciousness is typical both for human and for animals, in particular from this state. Thus, the “normal” consciousness is the individual's ants, bees, termites, fish, etc. At this level, individual elements cannot ability to perceive events and respond in accordance with the level of exist without group and group behave as a separate organism consisting socio-cultural environment.

from many separated particles, bound together by collective bonds.

Hence, is consciousness associated with the level of social Tribal system is organized on this principle as well.

development? Yes, of course. For the man of XIII the appearance of a Collective consciousness (collective unconsciousness after Jung) is living dragon would be perceived as something natural, though with driving force of human civilization. Here every individual has his/her fear. We can assume that in those times dragons were common wild own highly developed consciousness, but only combining their animals, like wolves or bears. These dragons crawled in those times, consciousness by the Informational Field, we create conditions for the and now they preserved only on the island of Komodo. For a modern development. By the Informational Field we understand all possible man the appearance of a dragon will be perceived as a hallucination, or means of informational exchange: verbal, printed, transmitted by as part of Disneyland. In this context, the above definitions of electromagnetic fields and via Internet, transferred by quantum effects.

“consciousness” should not be viewed as an attempt to constructively identify this philosophical category, but as a way to agree on the meaning embedded in the concept. It can be understood as the coordination of intuitive ideas, a sort of “check of the clocks”.

To introduce consciousness into scientific framework we need develop a theory of its operation, which would be able to explain different levels of consciousness and predict some new phenomena, such as distant healing, mediums and out-of-body experiences. Now the most promising seems to be theories based on quantum electrodynamics.

We need to accept consciousness as a system effect, depending not on

26 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 27


Part I

General Principles of Electrophotonic

GDV Analysis


Ignorance is the curse of God,

Knowledge the wing wherewith we fly to heaven.

William Shakespere

Henry VI, IV, 7


The glow from different types of objects in high intensity electromagnetic fields was detected over 200 years ago, and since then has attracted the attention of researchers (a literature review can be found in our previous books [Korotkov, 1995; 1998]). But it was only with the creation of gas discharge visualization (GDV) systems in 1995 that research into these glows gained scientific status. Since then, the physical mechanisms which make up the glow have been studied in detail [Korotkov, 2002], serial production of the devices has been established, and a system of software programs for applications in medicine, biology and research into materials has been created

{Korotkov et al., 2001-2005]. It has been shown that the characteristics of the glow of a person’s cutaneous covering depend primarily on the activity of the autonomic nervous system, with special consideration of the system of adaptation levels. Many research results are published annually in the materials of the St Petersburg Congresses on Bioelectrography Science, Information, Spirit (please, see www.korotkov.org). In parallel with GDV the term E

EPI – Electrophotonic Imaging – is also being used to name this technology.

EPI/GDV bioelectrographic systems have had practical applications in the following main areas:


28 General Principles of Electrophotonic Analysis Energy Fields Electrophotonic Analysis 29

Medicine

–

clarifying the difference between natural and synthetic oils [Korotkov et al., 2004];

–

analysis of a person’s physiological state;

–

assessing the quality of cosmetics [Vainshelboim et al., 2005]

–

analysis of a person’s psychological state;

–

researching human hair [Vainshelboim et al, 2004];

–

monitoring the body’s reactions during therapy;

–

researching homeopathic remedies [Bell et al., 2003];

–

assessing the probability of organic systemic abnormalities;

–

researching precious stones and their influence on people

–

the presence of altered states of consciousness;

[Vainshelboim et al, 2005];

–

assessing the risk of allergens according to EPI parameters of the glow

–

researching geoactive zones and their influence on people [Hacker et of blood samples.

al. 2005].

The GDV system is certified by the Ministry of Health of the Russian Federation as a medical technical device. Recently, the number of Such a wide range of applications is dependent on the high sensitivity of the publications on the medical aspects of EPI analysis has increased.

EPI method to changes in the emission parameters of the objects under study, Review of published papers on medical applications of EPI technology may when stimulated by a high-intensity electromagnetic field. These parametric be found in the book by E. Yakovleva and K. Korotkov, available from changes are evaluated with information theoretic analysis, structural statistical www.Amazon.com and www.bui-well.eu.

assessments, and artificial intelligence methods.


Research in EPI Bioelectrography continues actively. Each year Ph.D. theses Sport

are defended, and collections of scientific works are published in many different languages [Measuring Energy Fields, 2004]. In July of each year, St Assessing the level of performance alertness of athletes [Bundzen et al., 2003, Petersburg – one of the most beautiful cities on earth – hosts the international 2005]. By order of the Ministry of Sport of Russia, an EPI system is being scientific conference Science, Information, Spirit, welcoming doctors, fitted into the practice of testing athletes. In Olympic and Paralympic Games scientists and specialists from dozens of countries. Over the last 14 years, these Saoch-2014 EPI instruments were used in the process of sport teams training conferences have been convened under the aegis of the International Union process [Drozdovski et.al., 2013,2014].

of Medical and Applied Bioelectrography (IUMAB). This Union brings The EPI Sport System makes it possible to:

together researchers from 62 countries studying the practical implementation

-

dynamically determine the psycho-physiological potential of a of the Bioelectrography methods, growing in number every year.

sportsman so as to effectively control the level of functional reserves and the quality of health during the training process; Technology

-

ensure rapid diagnosis of resilience to stress and the quality of mental and psychological energy mobilization in order to predict the success of The science and protocol for the EPI instrument was developed by a team of performance activities.

internationally renowned physicists, physicians, programmers, and

- ccarry out a differentiated rating assessment of the psychological and technicians. Currently, there are more than 70 on the staff (more than half physical potential of a group of sportsmen studied for selection and training with doctorate degrees) based in St. Petersburg, improving and expanding the purposes, for making timely corrections in the training process.

software and managing the database. The founder, Konstantin Korotkov, comes from a long line of doctors and scientists. With a dozen books to his Research into fluids and materials, including human interactions with credit, and guest lectures virtually each month, Dr. Korotkov is well known to materials

30 General Principles of Electrophotonic Analysis Energy Fields Electrophotonic Analysis 31

many, including the US National Institutes of Health, where he has presented Advantages of the EPI/GDV bioelectrography

his techniques to an enthusiastic array of doctors and scientists.

technique

The EPI system has been approved by Russian Health Authorities for general use, following clinical trials and the recommendation of the Russian Academy The system is easy to use. The analysis can be totally computer-generated and of Sciences. It utilizes almost instantaneous, non-invasive and painless the procedure does not require certification to administer. The system measurements and sophisticated interpretive software with comparisons to an automatically indicates if the images being recorded are acceptable (fingers extremely large and reliable database assembled over more than 10 years.

properly on the pad, no shaking or moisture, etc.), so the results can be This technology has far reaching diagnostic and human performance analyzed and stored.

applications.

The technology complements virtually all existing treatment philosophies and The system provides non-invasive, painless and almost immediate evaluation specialties. The EPI System is a screening tool that identifies weaknesses in which can highlight potential health abnormalities prior to even the earliest the human body and allows practitioners to more quickly and efficiently focus symptoms of an underlying condition, and suggests courses of action. These on areas of treatment, as well as providing a comprehensive method of may include identifying an area for further medical exploration, suggesting tracking success.

products that may be beneficial (such as vitamins, minerals, supplements), or evaluating energy, stress and vitality. In each case, the EPI scan can provide x screening evaluation of the psychophysiological state and functional significant information and suggestions.

activity of an individual;

EPI utilizes a weak, completely painless electrical current applied to the x noninvasiveness, safety and complete sterility of the technique; fingertips for less than a millisecond. The body’s response to this stimulus is x assessment of the anxiety and stress levels; the formation of a variation of an “electron cloud” which emits light energy photons. The electronic “glow” of this discharge (invisible to the human eye) x quantitative information on the energy homeostasis level both for the is captured by an optical CCD camera system and then translated into a digital organism as a whole and for individual functional systems; computer file.

x monitoring of an individual’s reaction towards the influence of various The data from each test is converted to a unique “Photonic Profile,” which is treatment procedures, allopathic and homeopathic medicines, and mild compared to the database of hundreds of thousands of data records using 55

informational influences;

distinct parametric discriminates, and charted so that it is available for x

discussion and analysis. A graph of the findings is presented as a two-possibility of tracking the evolution of various processes in time and dimensional image. To study these images, fractal, matrix, and various comparing structural, functional and time processes that take place in the algorithmic techniques are linked and analyzed. In addition, the system organism;

provides instant graphic representations of the data to provide easy reference x objectivity of the information – independence from the preferences and interpretation in an understandable and meaningful manner; a further and experience of the user;

graphic representation is generated, placing the indicators within the outline of the human form, for ease of explanation and discussion.

x simplicity and convenience of the method – absence of any particular requirements for the room, the environmental conditions or the qualification of the personnel; during the investigation of an individual’s state only measurements from his/her fingers and toes have to be taken; x the equipment is relatively cheap.

32 General Principles of Electrophotonic Analysis Energy Fields Electrophotonic Analysis 33

Indications for the application of the GDV

Bio-Well is not a medical instrument. It gives you an impression of your Energy Field and allows to see its day-to-day transformation and the influence technique

of different situations and stimulus to your HEF and hence, to your condition.


Friendly software makes data processing simple and convenient for non-The use of the medical technique of computer EPI/GDV Bioelectrography is experienced users. With Bio-Well you do not need to be a scientist to make advisable during screening examinations, conducted with a view to providing full-scale scientific research!

timely and controlled primary prophylactic actions. The application of the In order to use your Bio-Well device, you also need an accompanying technique is also expedient for monitoring the functional state of the organism subscription. While the Bio-Well device captures the scan images, the during treatment and rehabilitation, for preventing the side effects of various subscription is the bread and butter of the system. It allows access to our therapies, for determining additional indications for allopathic, non-drug and complex algorithm that transforms your scan images into truly meaningful homeopathic treatment methods and providing a more objective assessment results. You may take images being off-line, of their effects.

and being on-line, you will get all the


information. You can choose from three levels Material and technical support

of subscription depending on your needs.


Download free software from www.bio-well.eu

Now we have available 3 different types of GDV/EPI instruments: or www.bio-well.com and view demo accounts.

x GDV Bio-Well instrument;

Bio-Well subscription ($10 per month) allows x GDV Pro camera; and

you to make scans, see Energy Fields, Chakras, Balance, compare your scans, x GDV Express camera.

print report and get free updates. Demo accounts: login: demo; password: demo.

Bio-Well is a revolutionary, non-intrusive way to measure human energy field Bio-Well subscription Plus ($15 per month) allows to use Sputnik sensor using a specialized camera and software system. Bio-Well has been developed together with all abovementioned information. Demo accounts: login: by the team of Dr. Konstantin Korotkov and brings the powerful technology demoplus; password: demoplus.

known as Gas Discharge Visualization (GDV) technique (www.ktispb.ru) to Bio-Well subscription Pro ($25 per month) gives access to all the information.

market in a more accessible way than ever before. The product consists of a Demo accounts: login: demoPro; password: demoPro.

desktop camera and accompanying software, which allows a user to quickly With Bio-Well device you may scan Energy Field. The image, which we and easily conduct human energy scans. When a scan is conducted, a weak create in Bio-Well instrument, is based on ideas of Traditional Chinese electrical current is applied to the fingertips for less than a millisecond. The Medicine and verified by 18 years of clinical experience by hundreds of object's response to this stimulus is the formation of a variation of an "electron medical doctors with many thousands of patients. The scanning process is cloud" composed of light energy photons. The electronic "glow" of this quick, easy and non-intrusive… do it daily for best results! Get real time discharge, which is invisible to the human eye, is captured by the camera feedback on what factors - positive and negative - affect your energy state. View system and then translated and transmitted back in graphical representations each scan in a variety of interesting ways with up to 7 result display options.

to show energy, stress and vitality evaluations. Each scan returns a wealth of With the BioWell accessory pack add-on, measure environment and object meaningful information to provide you with a truly holistic view of the state of energies too!

your wellbeing.

GDV Pro camera together with all options available with Bio-Well, allows to test different subjects like water, liquids, plants, gemstones and etc. Main

34 General Principles of Electrophotonic Analysis Energy Fields Electrophotonic Analysis 35

parameters of the camera may be adjusted in accordance with the properties K.G., Matravers P, Orlov D.V., Williams B.O. Application of of a subject under study.

Electrophoton Capture (EPC) Analysis Based on Gas Discharge GDV Express camera was designed for big centers and clinics; it allows to take Visualization (GDV) Technique in Medicine: A Systematic Review.

Bio-grams of all 10 fingers of a person simultaneously. It is very convenient

“All randomized controlled studies (RCTs) and systematic research reports and impressive-looking instrument.

(SRRs) were evaluated using Scottish Intercollegiate Guidelines Network and All GDV instruments may operate via Internet or with software stored at the Jadad checklists. The search yielded 136 articles addressing four different computer. For more information visit www.ktispb.ru www.bio-well.eu and fields of medical and psychophysiologic applications of EPC (GDV). Among www.bio-well.com.

them 78 were rated ‘‘high’’ on the two conventional checklists. 5303 patients with different problems were compared to more than 1000 healthy Scientific Evaluation

individuals.


EPI has been used as the basis for significant research and in each instance, Conclusions:

the reliability and value of the entire system has been confirmed.

1. The software and equipment EPC/DV-complex is a convenient and easy-x

The EPI system has been presented at the USA National Institutes of to-use device, easily allows examining patients with various pathologies and, Health to an audience of 27 world-class scientific investigators therefore, offers a wide range of applications.

participating with Dr. Wisneski and Dr. Korotkov. This represented a 2. The GDV method has shown itself to be very fast (i.e., it is an ‘‘express-diverse group of recognized experts from the US government and method’’ for studying states of the human organism).

academic institutions.

3. Our review has revealed that GDV method can be implemented as an x

A Penn State study was conducted by scientists from the National express method for assessment of treatment procedure effectiveness, Institutes on Aging, which validated that EPI can be used in high evaluating emotional and physical conditions of people, and in many other volume venues and accurately offer a consumer-friendly assessment of fields.”

health status.

In 2000-2014 more than 200 papers were published in per-review Russian x

EPI has also been the basis of graduate doctoral dissertations in various and international journals and 130 papers in the Proceedings of different countries, which included research both in medical and technical fields.

conferences.

Short descriptions and analysis of published papers can be found in Appendix 1 of this book.

What does the GDV method measure in physical x

Dr. Korotkov has hosted a series of annual international scientific terms?

congresses in Russia during the last 14 years, at which scientists from 46 countries have participated in and presented their research The EPI method is based on the stimulation of photon and electron emissions outcomes in a variety of research areas, utilizing EPI protocols, from the surface of the object. The stimulation is provided by transmitting including some significant studies involving early cancer diagnosis.

short electrical pulses. In other words, when the object is placed in an x

The meta-analysis of papers published in English or Russian language electromagnetic field, it is primarily electrons, and also to a certain degree from 2003 to 2007 was presented in “The Journal of Alternative and photons, which are ‘extracted’ from the surface of the object. This process is Complementary Medicine”. January 2010, 16(1): 13-25. Korotkov called ‘photo-electron emissions’ and it has been thoroughly studied with

36 General Principles of Electrophotonic Analysis Energy Fields Electrophotonic Analysis 37

physical electronic methods. The emitted particles accelerate in the on light energy, and organic compounds serve as the working material for the electromagnetic field, generating electronic avalanches on the surface of the conversion of this energy. The basic ingredients for all conversions are water dielectric (glass) plate. This process is called ‘sliding gas discharge.’ The and air [Korotkov et al., 2004].

discharge causes glow from the excitement of molecules in the surrounding gas, and this glow is what are being measured by the EPI method. Voltage Consequently, we are all children of the Sun, living on the light of the pulses stimulate optoelectronic emission, while intensifying this emission in world, and we ourselves emit light!

the gas discharge, amplified by the electric field created.


Yet the registration of ‘biophotons’ – spontaneous photo-emission – is an Can this emission take place without an electric extremely complex procedure requiring special conditions, the most field?

important of which is total darkness. Until the measurement begins, people being tested spend an hour in a room illuminated with a dark red light, after which they are put in a totally dark chamber, where they will remain for a Yes, this emission can happen without an electric field, and such an emission further 10 minutes in total darkness until the measurement starts. This is called ‘spontaneous.’ Measuring a spontaneous emission of electrons in the elaborate process should eliminate any ‘secondary luminescence’ from the air is nearly impossible – it can only be done in a vacuum. Spontaneous cutaneous covering following radiation by the sun or artificial light. The emission of photons can be measured with the aid of a highly sensitive measurement process itself takes up to 45 minutes [Edwards et al., 1989]. So photomultiplier. This emission was measured for the first time by Professor the process of measuring spontaneous photo-emission is very complex and Alexander Gurvich in the 1930s. He proved that the exchange of ultraviolet long. Such measurements require a special and unique device, and can be photons is the method used by biological systems to regulate information.

accomplished only under specialized laboratory conditions.

Currently, the area called ‘biophotonics’ is researching extremely weak photon emissions from biological objects. Much of the research done has The data obtained when measuring extremely weak ‘biophotons’ is invaluable shown that photons are emitted by any biological object: plants [Kobayashi, scientific information, highlighting the role of electro-photon processes in the 2003], blood and water [Voeikov, 2001], human skin [Cohen, Popp, 1998].

functioning of the body. These results are part of the scientific basis for the The quantity of photons emitted by the human head in a relaxed state and justification of the physical processes of EPI Bioelectrography.

during meditation varies, and these variations are statistically reliable! [Van Wijk, et al, 2005]

In the EPI/GDV method, we excite or stimulate electron and photon emission, and then intensify the resulting glow a thousand times. This Therefore, it has been categorically proven that all biological objects makes it possible to take measurements under normal circumstances, emit photons, and these photons participate in the processes of with normal lighting, without special preparation of the objects.

physiological regulation, and most importantly in oxidizing restorative chain reactions. In other words, all biological objects, including All the information in the EPI method is obtained through computer humans, are glowing both day and night!

processing of images and mass data. Without the methods of computer processing and specialized software, registering the glows of biological objects Biological life depends on using the energy of photons from the sun. This would be of no practical significance.

energy is converted into electron energy by photosynthesis in plants. Through a series of transformations in complex chains of albuminous molecules this light energy is converted into our body energy. Thus, biological life is based

38 General Principles of Electrophotonic Analysis Energy Fields Electrophotonic Analysis 39

Therefore, EPI software is an integral part of the EPI system, and only by using EPI software is it possible to obtain complete information about the biological object carried by electrons and ‘biophotons.’


What does the EPI method measure in biophysical terms?


So EPI measures the stimulated optoelectronic emission of a biological object.

During the measurement process, an electric current flows through the circuitry of the EPI device. Controlled by the design and construction of the Fig.1. Time dependence of EPC signal from human finger.

device, the current is a pulsed current and is very small – micro amps. This is Some of these belong to molecular albuminous systems, and in accordance why the current causes no substantive physiological effects and is totally safe with the laws of quantum mechanics, these electrons are dispersed among all for the human body. But what kind of current is this in biophysical terms?

the molecules. It is as if they are ‘collectivized’ between groups of molecules, An electric current can be dependent on the conveyance of electrons or ions.

so in principle it is impossible to say where an electron is at a given time. They When voltage pulses lasting longer than a few milliseconds are transmitted to form a so called ‘electron cloud,’ occupying a specific area in space. We can the cutaneous covering, tissue depolarization takes place and ions are see similar clouds in the blue July sky, and when a drop of rain falls on you, conveyed. For many electro-physical measurement methods, such as you can never tell from which part of the cloud the drop fell.

electroencephalography or electro-acupuncture, tissue polarization due to So the electron current in biological tissues is a transfer of electron-overlapping of electrodes poses a major problem and is resolved by using stimulated states along chains of albuminous molecules

special pastes or gels. The EPI method uses very short pulses, so Rubin, 1999

depolarization does not occur and ionic currents are not stimulated.

Other sources of electrons in EPI processes are free radicals which form in the blood and tissues. There is a widely-held view that free radicals are the Where does the electronic current in the body come worst enemy of health, and that they should be fought in every way possible.

from?

Yet the body converts 70% of inhaled oxygen into free radicals, to be able to use them straight away. Why is this process necessary? Over millions of years of evolution, could nature not have managed to change a mechanism harmful Let us look at the time curve of the EPI signal of the skin (fig.1). A typical to health? Clearly, since the process of formation of free radicals was retained, curve initially falls, and shortly after the beginning of the measurement it stays it is necessary for biological functioning. Indeed, as has been demonstrated at a relatively stable level, with occasional fluctuations.

recently, free radicals are one of the sources of electrons and during free There are two phases in this process. The initial stage is the extraction of radical reactions; energy is transferred and converted [Voeikov et al., 2003].

electrons located in the outer layers of the cutaneous covering and the Consequently, blood is one of the main substrata of the electron current.

surrounding tissue. The number of these electrons is limited, which is why the If we look again at fig.1, we can see that, in the second phase, with the current constantly decreases. In the second phase, electrons from the deepest establishment of a quasi-stable current, mechanisms for the transfer of tissues in the body are included in the current flow. These electrons have electrons are engaged along the albuminous molecules mainly in the several sources.

connective tissue, and along the circulatory system. In other words, the


‘electron storehouse’ of the body is engaged.

40 General Principles of Electrophotonic Analysis Energy Fields Electrophotonic Analysis 41

When the body is functioning normally, electron clouds are distributed What is energy?

among all systems and organs. Active transfer of oxygen to the blood takes place and all tissue consumes oxygen, using it in a cascade of biochemical Energy (from the Greek enérgeia – action, activity), is a general quantitative conversions. Among the main consumers of these processes are the measure of any type of movement, activity and the interaction of all types of mitochondria, which use electrons to convert ATP energy molecules. In this matter. Energy in nature does not come from nothing and does not disappear; case, the active transfer of electrons to the tissue is ensured, as is the free it can only be transferred from one form to another. The concept of energy radical mechanism of transferring electrons to the blood, which is evident in binds together all natural phenomena.

the quasi-stable current during EPI stimulation.

Just as there are different forms of the movement of matter, there are different In cases of imbalances and dysfunctions, immunodeficiency, or an forms of energy: kinetic and potential, mechanic, electromagnetic, nuclear abnormality of the micro capillary blood circulation, the transfer of electrons and so on. These divisions are generally well-known. So chemical energy is to the tissue is hindered. Free radical reactions do not flow in full volume, the made up of the kinetic energy of the movement of electrons and the electrical

‘electron storehouse’ of the body is not full, and the stimulated current is energy of the interaction of electrons amongst themselves and with atomic either very small or is very irregular in time. Fig.2 shows a dynamic curve for nuclei. Internal energy is equal to the sum of the kinetic energy of molecular a patient with such abnormalities. As is clear when comparing Figures 1 and movement around the centre of body mass and the potential energies of the 2, the patient’s dynamic curve has much higher variability.

interaction of molecules amongst themselves.

The theory of relativity shows that the energy ȿ of the body is inextricably linked to its mass m as in the equation E = mc2, where c is the velocity of light in a vacuum. This means that in any amount of mass we have huge energy potential. The best prove is an atomic or nuclear bomb where from little mass we directly extract energy.

Any body possesses energy, and this energy can change from one type to another. Human body has tremendous resourse of energy, which may be used for physical, emotional or mental activity. We accept this energy from food, water and light. These are the main resourses of life.


Fig.2. Time dependence of EPC signal from human finger.

According to classical physics, the energy of any system is constantly changing and can assume any value. According to the quantum theory, the energy of Therefore, the lack of glow on the EPI-gram is an indicator of the micro particles, whose movement occurs in a limited area in space (for impeded transfer of electron density to the body’s tissues, and an example, electrons in atoms), adopts a discrete series of values. Atoms radiate abnormality in the flow of free radical reactions. This is an indicator of electromagnetic energy in the form of discrete portions – light quanta, or an abnormality in the energy supply of organs and systems.

photons.

It now makes sense to come to grips with the concept of energy itself, and how From a biophysical standpoint, the energy of systems and organs is this concept is linked to the body’s state.

determined by the level of mitochondria ensured by free electrons, i.e. by the character of electron transport. The capacity of mitochondra to produce ATP


determines the possibility of accomplishing the work for the processes of

42 General Principles of Electrophotonic Analysis Energy Fields Electrophotonic Analysis 43

physiological activity. But the possibility of accomplishing work is also called provide the process of oxidative phosphorylation, i.e. the energy supply for energy.

functioning of a local system. Thus, the organism forms an electron “energy depot,” supporting the current functioning and being the basis for work, at The EPI method measures electron densities in human systems and organs, some moments requiring great resources or rapid flowing under conditions of as well as the character of the stimulated electron currents. These electron extra-high loads -- typical, for example, of professional sport.

densities are the fundamental basis of the physiological energy, so we can say with confidence that the EPI method makes it possible to measure the body’s Stimulated impulse emission is also developed mainly by the transport of potential energy reserve.

delocalized ›-electrons, realized in electrically non-conducting tissue by way of the quantum electron tunnel mechanism. This proposition allows an What is biological energy?

assumption that the EPI technique provides indirect judgment about the level of energy resources at the molecular level of functioning in structural-protein complexes. (see Korotkov K., Williams B., Wisneski L. Biophysical Energy The main reservoir of free energy in biological processes is electron-excited Transfer Mechanisms in Living Systems: The Basis of Life Processes. J of states of complex molecular systems. Communities of delocalized excited ›-

Alternative and Complementary Medicine, 2004, 10, 1, 49-57).

electrons in protein macromolecules are the basis of this energy reservoir.


Specific structural-protein complexes within the mass of the skin provide channels of heightened electron conductivity, measured at acupuncture points What does the GDV/EPI method measure in

on the surface. These excited states are continuously supported at the expense physiological terms?

of electron circulation in the biosphere. The main "working substance" is water and the energy source is the sun. A part of these electron excited states is The working of all the organs and systems is regulated by the central nervous expended for the support of current energy resources in the organism. A part system (CNS) and the autonomic nervous system (ANS).

can also be reserved for the future, as it happens in lasers after the absorption of the pump pulse.

It is possible to draw an analogy between the working of the body and the playing of a symphony orchestra. The finest movements of dozens of people The flow of impulse electrical current in non-conducting biological tissues in the orchestra are in total harmony, they are following the same part and might be provided by intermolecular transfer of excited electrons, using the respond sensitively to the tiniest direction from the conductor. You could mechanism of quantum tunnel effects, with the activated jump of electrons single out the viola or oboe part, and they would sound like part of one between macromolecules in the contact area. Thus, it can be assumed that the beautiful melody.

formation of specific structural-protein complexes within the mass of epidermis and dermis of the skin provides channels of heightened electron It is the same in the body: each organ and each system plays its role, but they conductivity, which are experimentally measured as electrical conductance at are all following one rhythm, one autonomous control.

acupuncture points on the surface of epidermis. Such channels can be But then one of the violins loses the rhythm, falling out of time with the overall theoretically present within the mass of connective tissue, which can be control system. This goes unnoticed by the untrained ear, and only an associated with “energy” meridians. In other words, the notion of “energy”

experienced listener will hear the wrong note. The melody will sound, but the transfer, characteristic of the ideas of Eastern medicine and alien to most greater the number of instruments which fall out of line with the control people with a European education, might be associated with the transport of system, the stronger and more noticeable the dissonance will be, until finally electron-excited states through molecular protein complexes. When physical even the most uneducated listener will start to wince and slowly creep out of or mental work is done in certain systems of the organism, electrons the concert hall.

distributed in protein structures are transported within their given place and

44 General Principles of Electrophotonic Analysis Energy Fields Electrophotonic Analysis 45

This analogy can be applied to the working of the body. As long as all systems the circuit fails and de-synchronization occurs, reflected in the functional and organs are working in harmony, in unison, following the same program, abnormalities at all of the most vital levels.

the body is at its optimal functioning level. Control and direction are ensured Therefore, the autonomic nervous system enters into the first circuit of by two fundamental mechanisms:

control, and the early signs of potential problems appear mainly at the level of ANS activity.

-

autonomic control by the nervous system (ANS), including neurohumoral regulation of activity;

-

electron control through active forms of oxygen in the blood.


It could be said that this control is the base level, making it possible to detect all external impacts and react to them instantly, supporting Homeostasis and the relative constancy of the body’s internal environment.

If a person runs about and makes a few sudden movements, and the ANS

increases the frequency of the heart’s contractions, then breathing speeds up, increasing respiration. More oxygen gets into the blood, and this oxygen is more actively conveyed to the tissues, with some of the by-products of the increase in respiration coming out in perspiration through the skin.

The reaction takes places almost instantaneously, and the whole body, all its systems and organs, are engaged by this reaction. This is evidence that all the organs and systems are working in a synchronised way under the control of a single commanding system. Everything happens as in a well-tuned orchestra.

This rather simplified diagram of fig.1.3 shows the general character of the body’s reactions and the development of diseases.

When autonomic regulation fails and that synchronization is lost, the organs and systems stop working in harmony and functional abnormalities appear. In There is much experimental data which proves that the EPI method measures the first phases, these abnormalities appear as a bad state of health, disturbed the activity of the autonomic nervous system. This is demonstrated by sleep and digestion, and abnormalities with perspiration and so on. Continued statistically significant correlations with the results of the measurements of the dysfunction leads to abnormalities at the level of the organs, although the area variability of cardiac rhythm [Cioca et al., 2004], of systolic and diasystolic of abnormality depends on the type of load and genetic predisposition.

pressure [Alexandrova et al, 2004], perspiration through the skin [Rizzo-Roberts, 2004], and the stress level [Bundzen et al, 2002]. The findings about Reacting to commands coming from the CNS and the surrounding the link between EPI data and ANS activity were first made in research on environment, the ANS and blood send information control signals to the adaptation and homeostasis during work [Drozdov, Schatsillo, 2005] and body’s systems and organs. These signals are ‘processed’ both at the subsequent results confirmed these findings.

physiological level of systems and by engaging the endocrine and immune systems. Information is transferred to the controlling organs, forming a There is clearly justification for affirming that the parameters of EPI Biological Reverse System (BRS). In this way, a closed circuit of control is images reflect the activity of the autonomic nervous system and the formed. When there is an abnormality in any one of the information links, balance of sympathetic and parasympathetic sections of this system.


46 General Principles of Electrophotonic Analysis Energy Fields Electrophotonic Analysis 47

What is the sensitivity of the GDV/EPI method 1997; Milton, 1996]. This shows that the processes of consciousness are apparent on the physiological processes measured by the EPI method.

based on?

We do not intend in this book to discuss the philosophical aspects of the process of researching consciousness. That could be the theme of an entirely The autonomous nervous system is the main indicator of the body’s reaction separate, specialized book. Let us look simply at the opinions on which our to external and internal impacts – ranging from changes in the weather, work is based. We support the idea that consciousness is a category of a chemicals in food and the efficiency of oxygen absorption to emotional different space-time continuum which does not belong to the material world.

worries. All of these processes are managed by the sympathetic and These principles of working on consciousness are to a large extent modeled parasympathetic nervous system and are reflected in the parameters of the on the quantum mechanics paradigm, but clearly this is only a superficial skin. The electrical resistance of the skin changes, both as a whole and at analogy. We are still a long way from understanding the working mechanisms electro-puncture points, the capillaries can narrow and widen, organic of consciousness, taking into account not only its individual manifestation in molecules are emitted through the skin pores, and the character of electron each person, but also its collective processes [Korotkov, 2001]. Human transfer in the connective tissues also changes. All of these processes influence consciousness is a process of interaction between a person and a collective the emission of electrons from the skin and the development of electron field, through which new ideas are formed, and the field is the place to which avalanches, which are reflected in the parameters of the EPI-gram.

they return, making a contribution to the collective mind of humanity.

Many years of research into the physics and biophysics of the visualization With physical devices we measure physical processes, i.e. processes of the processes have made it possible to discern optimal conditions for the material world. This is connected to biology as much as to physics and development of all processes, which now make it possible to obtain sensitive chemistry. That is why we can only measure the influence of consciousness and well-reproduced EPI images.

on physiological or physical processes. This influence is conveyed along several channels, primarily through the cerebrum, which takes an active part The influence of mental, emotional and spiritual in thought and emotion processes. The brain produces a cascade of chemical processes on BIO-grams

substances which influence physiological processes, and also the central nervous system models the work of the autonomic nervous system [Wisneski, Anderson, 2009].

An interesting aspect of EPI applications is the research into consciousness processes. Many years of experimentation have made it possible to identify We have already left behind the idea that the brain produces consciousness bioelectrographic correlates of altered states of consciousness (ASC) like the liver produces bile. The brain is better presented as a receptacle which

[Bundzen et al, 2000; 2002]. These are particular states, which a person enters reacts to the signals of the surrounding space, including signals from the during meditation, mental training, religious ecstasy, or when under the collective field. Hairs can act as the antenna of these signals, as they react to influence of drugs, psychedelics or anesthesia. For many years we have been the external field and transmit these signals to the cutaneous covering, possibly measuring Russian extrasensories, Candamblier priests in Brazil, participants with some intensification. The numerous results of our experiments testify to of the Ayahuasca ceremony in Peru [Korotkov, 2002, 2003], Chinese Qi-gong this process with human hair [Vainshelboim et al, 2005].

masters, and healers in Germany, the USA, and Slovenia [Measuring Energy The heart is another organ which takes part in the processes of consciousness.

Fields, 2004]. And almost all of these observations we obtain signs This is not merely a pump for blood, but an organ which regulates the blood characteristic of ASC. Similar results, using the most diverse devices and flow and, accordingly, oxygen, in all areas of the human body. There is data methods, were obtained in the laboratories of different countries [Radin, showing that after a heart transplant, a person takes on many behavioural

48 General Principles of Electrophotonic Analysis Energy Fields Electrophotonic Analysis 49

characteristics of the donor. So we can conclude that the heart, at least, has a memory, i.e. it takes part in consciousness processes.

Part II

The experimental observations measure the influence of consciousness on physiological processes. In this regard, the EPI method is very sensitive, because it reacts to subtle changes in the working of the ANS. These sensitive Practical Basis of Electrophotonic GDV

measures make it possible to register subconscious and emotional processes.

Analysis

Another method is the registration of the influence of human consciousness on physical sensors. One of the most recent is water, or specially constructed


systems. Many experiments have proved that such an approach is highly


effective [Science of Whole Person Healing, 2004].

If it were now to die,

Modern science has only just begun to research consciousness. Following the Twere now to be more happy; I fear

remarkable insights of Fechner, Helmholtz, Jung and Freud, a significant My soul hath her content so absolute

process was set in motion to study the brain’s neuron mechanisms, especially That not another comfort like to this

using modern methods of computer mapping. Yet we are still only in the early Succeeds.

stages of the process of researching consciousness, and the most important William Shakespere, Othello II, 1

thing at the moment is the set of experimental data. Their meta-analysis at a specific stage will provide an awareness of new concepts and lead us toward a The basic principles of GDV/EPI analysis of the person’s energy condition new understanding.

are as follows:


x

Information must be taken from the 10 fingers with and without filter.

x

The fingers must not be washed before the EPI images are taken. If there is dirt, moisture or sweat, wipe with a soft cloth. In the case of heavy perspiration, wipe every finger just before the EPI images are taken.

x

Any strong drug, medications (in particulary hormones and anti-depressants), alcohol change the energy of the body. Ask patient before measuring.

x

Different EPI programs provide different information about the energy because they use different principles for processing the information, therefore a full analysis requires processing in all programs. It allows for several types of analysis:

x

The image of the energy field provides a general image of the distribution of energy, it does not allow for a detailed analysis, although it shows basic regions requiring attention. The program Energy Field is very convenient for monitoring the condition during successive measurements of the same person.

50 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 51

x

The health status and energy status diagrams are very convenient, proposed by Dr. Peter Mandel in Germany [Mandel, 1989], based on the practical and reliable method for analyzing the person’s conditions.

ideas of traditional Chinese medicine about energy meridians. In the 1990s x Assessing the stress level, energy level and left-right balance, both of this map was modified with reference to the EPI device and all sectors were the energy field as a whole, and of different organs and systems of tested in medical institutions in Russia on the basis of major clinical material.

the body.


x Identifying the zones requiring attention (without and with filter, All sectors used in the Diagnosis Map have been verified through both right and left hands).

significant clinical trials.

x Compare the conditions when taking EPI images in different moments; after carrying out a procedure, exercise, or intervention Mandel’s and Korotkov’s maps differ significantly.

and so forth.


x Accomplish a detailed analysis of the energy condition of the organs EPI images with and without filter

and systems by assessing the various sectors of individual fingers.


The EPI filter is a specially made polyethylene film that is placed on the glass The sector analysis of fingers is the most detailed one, it reveals the particulars electrode plate of the EPI camera at the time of taking EPI images. Its role of the condition of a given system or organ. Other programs give additional can be explained by means of a simple example.

information.

Let us suppose that we put on a thin surgical glove and take EPI images of the fingers. They will give a similar bright glow. The glove phyically isolates the The sector analysis of individual fingers is the final phase of EPI analysis of surface of the cutaneous covering – with its perspiration and secreted skin the person’s condition.

gases. With the skin surface processes separated from the glass electrode plate, the images will only reflect the particularities linked to the conditions of IMPORTANT NOTE

the body as a single system. In other words, we remove a significant part of The EPI analysis is not currently certified as a method of medical the influence exerted by the autonomic nervous system.

diagnosis of specific disease. It is intended to provide guidelines to qualified healthcare professionals with full knowledge of patient history The EPI polyethylene filter plays the same role as the surgical glove. It and concerns to assist in their design of an appropriate healthcare eliminates the direct influence of the cutaneous covering on the EPI images.

program. EPI makes it possible to analyze the energy state of a person With the polyethelene filter in place, electrons penetrate inside this film and and his/her autonomic status, i.e. to assess the condition of the body multiply there giving an impression of a more smooth and continuous image.

from the point of view of the functioning of the autonomic nervous These way only areas with strong defects will be presented in the image. So system.

we can tell that the film filters out details related mostly to psychosomatic activity. In most cases EPI images with filter (F) are stronger than EPI images Using the data from this analysis, as well as other instrumental measurements without filter (wF).

(such as ECG, blood analysis, ultrasound, visual checkup, genetic data, etc.) the doctor or competent specialist can make a diagnosis as well as prescribe a treatment.

The analyses considered above were based on the use of the Diagnostic Map, which shows the correlation between the separate sectors of the fingers and the energy state of the organs and the system (fig. 1.4). That map was first

52 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 53


Fig. GDV/EPC images of the right hand without filter and with filter.


Clinical research demonstrated that when we compare the pictures taken with and without filter we get information about the balance of the sympathetic/parasympathetic parts of the autonomic nervous system. When we analyze the person’s psycho-physiological conditions it is essential to take the EPI images with and without filter.


EPI images without filter carry information about the current conditions of the energy organs and systems in a given moment in time. They reflect the particularities of the autonomic status, that is, effects of both physiological and psychological processes. Repeatability and reiteration of the EPI images without filter is determined by the stability and lability of the nervous-psychic processes, that is, by the type of the person’s constitution. From this relationship with psychic lability, the characterization of EPI images without filter [Korotkov, 2001] correlates well with the characterization of psychological types both according to Western principles, and Oriental systems, such as Ayurveda.


We can say that the EPI images without filter reflect the person’s current psychological-physiological condition, his nervous-psychic state and EPI images with filter reflect the body’s base somatic level of energy.


EPI images with filter carry information about autonomic control at the level of stable physiological processes. In other words, EPI images with filter reflect Fig. Diagnostic Map after Korotkov

the level of physiological energy that ensures the functioning of the body at a base and organic energy level. This level is very stable, it ensures long term body functioning and remains present throughout psycho-physiological

54 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 55

changes. This energy reserve is constantly replenished through the basic well to the high anxiety level. The state of permanent anxiety without energy metabolism, with the participation of electronic processes in the tissues relaxations may be the reason for serious problems.

and the blood’s oxygen. When the organ function is normal, the EPI images Activation coefficient in range 6-7: there are at least four possible situations: with filter are very stable and reproducible, and their changes are evidence of pathological processes at a deep energy level, generally linked to organic x

Reaction to a previous stressful situation (unpleasant conversation, processes. EPI images with filter reflect the physical condition of organs and illness, car driving under stressful conditions, etc.). In this case it is systems.

absolutely necessary to calm the patient and repeat the measurement after half an hour.

The stronger the autonomic deregulation or imbalance is, the stronger x

Heightened nervousness, accumulated during long term stress, will be the divergences between images with and without filter.

emotional tension and autonomic disorder.


The evaluation of this divergence can easily be carried out with the program x

People with special type of psyche, capable of switching rapidly from GDV Diagram (fig.2.3). The program reflects the standardized logarithmic high excitement and nervousness to a calm state.

values of the EPI images area, divided into sectors in accordance with the EPI x

Athletes in the moment of competition, actors at the performance, diagnostic table. According to the contrast between EPI -diagrams with and students at exams, etc.

without filter, we can calculate the activation coefficient which is an evaluation of the stress level of a given person. This is the approach we established in x

Children in a state of nervous excitement.

2000; it was tested on a significant number of people alongside various Activation coefficient in range 7-10: very high stress level, peak of emotional psychological tests. For example, in the case presented at fig.2.3 the level of excitement.

stress A = 9.65, which is very high on a 0….10 scale. We found high coefficients of statistical correlation between values of the EPI activation Pay close attention to perspiration on the hands: wipe every finger with coefficient and levels of anxiety, physiological activation and stress, all being a tissue and repeat the EPI images taken for each finger separately. In determined by different tests [Kondratiev et al., 2003]. Thus the significance any case, perspiration on the hands is a sign of autonomic imbalance.

of the EPI approach for identifying the level of psycho-physiological stress was If a patient with activation level 8-10 appears calm, this could indicate a proved in numerous independent psycho-physiological experiments.

dangerous situation: the person is on the verge of a nervous breakdown, so be The scale of the S

Stess or A

Activation coefficient can be easily interpreted: aware and exercise caution.


Activation coefficient in range 0-2: absolutely calm and totally relaxed person, Note that the EPI method makes it possible to measure the level of it could be for several reasons: deep meditation, complete inner peace; the physiological stress, that is, the activation level of the autonomic nervous effects of psychedelics; deep sleep in the peaceful phase; at the same time it system, which does not always coincide with the level of psychological stress, may be the case of chronic depression or severe disees; we’ll discuss this in or llevel of acknowledged psychological tension. For example, a person who the next part of the book.

suffers an intense psychological trauma – loss of a close person, a difficult Activation coefficient in range 2-4: normal, calm condition.

divorce, traffic accident, etc. – may have quite a calm appearance and react Activation coefficient in range 4-6: excited state, characteristic of active work, adequately to external stimulus, but the level of physiological stress will be very emotional excitement and tense activity. This state is typical in high level high.

managers, militaries and people with responsible jobs. It may be related as


56 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 57

Parameters of EPI-grams used for the analysis Fig. The spectrum of BIO-gram.

Energy


The common image processing application packages can not be used for Energy of light in Joules. Calculated both for the whole image and for every processing EPI-grams, because the tasks are specific. Diagnostic hypotheses sector of a finger as follows: E(corr) = E x 360/a, where E is energy of a must be taken into account, and processing should be done on the level of sector, a – width of this sector in degrees.

decision-making systems. Therefore, a software Normalized area

environment was developed for processing and the ratio of BIO-gram area to the area of the inner oval analyzing EPI-grams, oriented towards the work in Entropy coefficient

different problem domains. Adaptation for

the ratio of BIO-gram external contour to the internal contour particular assessment is performed through a x Measure of chaos in regulation of biological and physiological combination of optimal operations from the library functions;

for the given problem domain, selection of

x Level of deregulation;

corresponding procedures, and (or) selection of x Level and velocity of wear processes in organism (velocity of aging); optimal threshold values.

x Level of tolerance to external influences.

Area

Form Coefficient

Amount of light quanta generated by the subject in computer units - pixels.

is calculated according to the formula: FC = aL2/S, where L is the length of (the number of pixels in the image having brightness above the threshold).

x

the BIO-gram external contour and S is the BIO-gram area, characteristic of Level of adaptation of organism to inner (psycho-physiological) and the complexity of contour of the image.

external (stress, food, ecology) influences; x multicircuit control of physiology regulation; x Character of metabolism;

x

x

The higher FC, the more regulation systems are involved in the Adequacy of functional reserves; vital resources.

process.

x Depends on quantity of electrons in avalanches, ionizing air gap; x The more electrons, the higher level of metabolic rate; Inner noise

x

Amount of light in the inner contour of the Bio-gram – characteristic of the Area of glow is in proportion to quantity of electrons.

organism activity.

Intensity

Stress coefficient

Level of quantum activity of a subject. The spectrum of Intensity is x

presented in computer units.

Level of organism involvement in state of stress-adaptation; x “Level of stress”;

x Balance of activity of sympathetic and parasympathetic nervous systems work.

The next set of calculations is based on transformation of the initial image from the spherical coordinate frame into the Descartes system of one-dimentional curves with Euler equations, according to the brightness and vector equidensities (fig.2.5). The image can be represented as a function F(x) of some argument x of the angle within the limits [0-360o]. Maximal length of the image radius, median's length, brightness or average values along the radius can serve as the function F(x). As a rule, the function F(x) is heterogeneous and changes quite chaotically. It can be interpreted as a part of an unlimited probabilistic variable and mathematical principles can be applied

58 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 59

for describing statistical dependencies, enabling the calculation of a number 2. IInverted image – inverted gray color palette is used, containing 256 shades of parameters.

of gray (from black to white). Particular small details and thin streamers are better seen in this palette than in the initial image.

Fig. Linear presentation

3. IIntensity palette – image points are colored in one of eight colors. The of a BIO-gram

brightest glow points are colored in the shades of blue, less bright points are Length of image outer

colored in the shades of red. Points are colored in yellow when the intensity countour

is higher than the noise level, but lower than the base noise level for the given length of envelope of

frame. All image points removed by noise filtration are shown as white the image contour.

background.

Emission

coefficient

(EC) characterizes the

4. S

Solid palette – all image points removed by noise filtration are shown in power of small

black color, the rest of the points are shown in a monotonous bright color.

fragments deleted from

Use this palette for analyzing a sector’s glow area and glow area of the whole the BIO-gram and is measured in pixels.

image, in order to avoid optical illusion, which can occur if some points are not seen well, as the coloring is similar to the coloring of “noise” points.

Fractality coefficient (FrC) is calculated according to the algorithm of Mandelbrot as a ratio of lengths of perimeters of the image glow, obtained in 5. B

Blue palette – color palette containing 256 shades of blue (from black to different scales of BIO-gram. Form and fractality coefficients show the degree bright blue) is used. Points with minimal intensity of glow are shown in dark of irregularity of the BIO-gram external contour.

(almost black) shades, points with maximal intensity of glow are shown in Integral area coefficient JS is a characteristic calculated in BIO Diagram bright (almost blue) shades. This palette displays the glow similar to the way it program according to the formula:

can be seen in the instrument’s electrode by the naked eye.

'


S

S

JS ln

/ ln

6. E

Energy palette – the image points are colored in one of the nine colors.

'

S

S

1

1

The brightest glow points are colored in blues, the less bright ones are colored S

'

where S í BIO-gram background area, 1 í inner contour area, S í area in reds, oranges and violets. All image points removed by the noise filtering

'

S

algorithm are displayed as white background.

of ideal image, 1 í area of the inner contour of an ideal image.

Specially designed programs allow for easy calculation of EPI-gram For evaluation of the functional state of particular functional systems and parameters. The main indices used are as follows: total area, normalized area, organs, these parameters may be calculated for the whole BIO-gram or for length of image perimeter, average intensity, emission coefficient, form the sectors of particular projection zones.

coefficient, fractality coefficient, entropy, and integral area coefficient; along The following main algorithms are included in the library: with dispersions of all these listed parameters.

Pseudo-coloring. For visual estimation of the image, there are several For evaluation of the functional state of particular functional systems and algorithms of pseudo-coloring, oriented towards marking out several organs, these parameters may be calculated for the whole EPI-gram or for the peculiarities of EPI-grams. The following types of pseudo-coloring are sectors of particular projection zones. All parameters may be saved in Bio-provided in the programs (fig.1.7):

Well programs as an CSV file for further processing in statistical programs.

1. Original image – image as it was obtained from the video camera and saved in an AVI-file. A gray color palette containing 256 shades of gray (from black to white) is used.

60 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 61

Scientific principle of Energy evaluation

GDV/EPI Software Design

Sensitivity of a CCD camera in [http://ellphi.lebedev.ru/20/pdf18.pdf]] was evaluated as follows:

The GDV software complex consists of the following main blocks: a) The library of operations, where the main functions for processing and analysis of BIO-grams are realized in the form of completed software modules: preprocessing of images (software discretization; deletion of noise; where W – relative energy of a light source [J/cm2]; I – amplitude of a signal; pseudo-coloring); segmentation of BIO-grams (creation of an inscribed E –energy of a light source [J]; s – illuminated area of a CCD element [cm2]; ellipse; image sector division); image scanning; calculation of various P – power of a light source [Wt]; t – exposure time [sec]; T – filter coefficient ; parameters of an image; classification of BIO-grams; d – diameter of illuminated area of a CCD element [cm]; s = ›d; W = E /s

= P × t ×T / s .

b) The subsystem for synthesis of procedures, where a general procedure for processing and analysis of BIO-grams is projected in an automated mode, on For ɉ = 424 nm sensitivity of CCD element was experimentally evaluated as the basis of results from previous training by test problems. In the process of 4*10-10 J/cm2 and it was increasing with decreasing of wavelength. It is clear synthesis of a procedure, an interactive mode is provided, aimed at taking into that this parameter depends on the type of CCD and optical system being account specific requirements of image analysis; used. So we have made an experimental evaluation of the GDV instrument using standard lamp with tungsten filament having power P = 10 W with c) The graphical user interface represents a complex of programs, providing relatively uniform field of illumination. For this lamp the area of illumination interaction of the user with the software-hardware complex; in GDV programs was S = 61000 pxl with intensity specter (J) from 55 to 255

d) The system procedures are developed on the basis of the library of with max at 160 and average 220.

operations (a): observation of the EPI signal in real-time scale; initial loading From this the equivalent power of the light source may be evaluated as follows: and saving of images with inner data compression; statistical processing of the parameters obtained and creation of histograms; synthesis and printing of P (W) = S*I**10 /61000*200= S*I*8*10-9

conclusions in the required form.

GDV image of a healthy person may have parameters S = 10000 pxl, Iaver =

All the above-mentioned procedures are united in the EPI software complex 80 => P = 640 mW. GDV image of a un-healthy person may have parameters working in the Microsoft Windows and Apple environment. Every program S = 4000 pxl, Iaver = 60 => P = 19 mW. Energy ʔ (J) = P (W) * t (s) has a Manual with detailed description of operations, so we will give only a GDV impulses with t = 10-4 s follow with frequency 1000 Hz for 0.5 s. So the brief overview here.

time of signal accumulation at the CCD element is equal to s, from this E =


5*10-2 P. Equation for the Energy of Illumination in GDV case may be The G

GDV Energy Field program is designed to process GDV images and to presented as follows: ʔ (J) = S*I*4*10-8

build a model of the human energy field using the information obtained from 10 GDV images of human fingers. The creation of the energy field is based Using this equation, we may present both results of GDV-grams processing on a diagnostic map. The GDV Energy Field shows the human energy field and the dynamic data in the units of the Energy of Illumination.

as an image around the human contour and represents it in tables and diagrams in numeric form.


The G

GDV Virtual Chakra program is designed for graphical display of the GDV-parameter distribution among energy centers of the human body –

62 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 63

chakras – based on processing of GDV-images of ten fingers. The calculation Health Status

of the energy of GDV-chakras is based on the ideas of Ayurvedic medicine.

The H

Health Status window is designed for analysis of the functional state of For each chakra the program produces the value, asymmetry and the human body, by calculating the integral parameters of energy distribution interpretation of chakra energy in compliance with the Ayurvedic concepts.

in the body and in organs and for their comparison with reference parameters In Chakras evaluation, both position and size are significant. Chakras analysis of a practically healthy person formed according to the database.

usually is more related to psychological and spiritual condition of a person The obtained data is displayed in a graphic form as circle diagrams.

then to physical. For example, for the image below we may tell that this person is very well grounded (Chakra N1 is strong and centered), have an active The typical energy level corresponds to the green ring in the middle. The emotional life (heart Chaka N4 is strong), but her spiritual development is inner circle is the area of energy deficiency (hypo-energy state). The outer ring very chaotic (upper Chakras N 6 and 7 are small and out of order). Some is the area of energy excess (hyper-energy state). The diagrams are divided problems with reproductive system (Chakra N2). Together with Energy Field into the sectors related to a certain part of the human body. When you move analysis this type of analysis may give you good evaluation of a person’

the mouse cursor over the graph the program will highlight the current sector.

condition.

Click the left mouse and the screen corresponding to the particular finger will appear.

IMPORTANT!

To have the correct processing in the Health Status program, images should have the appropriate calibration, i.e. the camera should be calibrated in an appropriate way. Without calibration interpretation of diagrams S may be incorrect.

Energy Status

The E

Energy Status program is designed for analysis of the functional state of the human body, by calculating the E

Energy parameter of the particular organ.

The obtained data is displayed in a graphic form as circle diagrams.

The typical energy level corresponds to the green ring in the middle. The inner circle is the area of energy deficiency (hypo-energy state). The outer ring is the area of energy excess (hyper-energy state). The diagrams are divided into the sectors related to a certain part of the human body. When you move Pressing C

Create music button allows generating specific for the particular Bio-the mouse cursor over the graph the program will highlight the current sector.

gram music file. It may be saved in the computer and played using both from Click the left mouse and the screen corresponding to the particular finger will the computer and any music player. Used for the Energy correction together appear.

with the special B

BioCorr device.

In Ayurvedic texts you may find description of different properties associated Balance

with Chakras. Some materials are presented in the Report, generated by the This program presents same information as Energy Status, but in different Bio-Well program.

way. It shows energy parameters for different organs and systems for both right and left hand. This allows seeing not only the level of energy, but right-left Balance as well.

64 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 65

Screening

Energy

Demonstrate the level of energy for the particular person both in Joules and This program allows to see particular sectors of different fingers related to in %% related to the Database of apparently healthy people, measured from body systems as well as to different organs. Numbers indicate the level of 0 to 100%.

energy (in Joules). Colors have the following indication: 0 – 20% - low energy (may be related to energy deficiency, as well as to Optimal

Energy

Energy

Hyper


meditative state);

condition

deficiency

blockage

Energy

30% - 70% - typical energy;

70% - 100% - high energy.

Fingers

Balance

Characteristic of left – right balance of the body. Important characteristic in This screen allows seeing Bio-grams of all 10 fingers divided to sectors. Click evaluation physical and mental conditions.

with left mouse button on the particular finger allows seeing informational 0 – 50%

- very low balance – indication of serious mis-functioning; screen.

50% - 80%

- low balance – indication of functional disorder; You may see all the image or just particular sector 80% - 100%

- typical.

Spectrum screen presents the spectral distribution of the Bio-gram and related Report

Preparation of printout for the customer. All information may be corrected.

parameters. Intensity of light is measured in relative computer units from 0 to Pressing S

Save button allows to save document as PDF file.

255. This corresponds to the wave-lengths from 480 nm to 800 nm Export to CSV

(depending on the CCD camera used in the instrument).

Allows to save all parameters for the processing in Excell, MathLab or any Isoline screen present sweep by degrees of Bio-gram inner and outer contours other program.

(see image above) as well as inner glow width.


Information screen present quantitative parameters for the whole Bio-gram IMPORTANT NOTE!

and different sectors.

Experience shows that modern computers can be unreliable, they are subject to virus attacks and irreplaceable breakage of hard disks. How Specific interpretation may be attributed to every Bio-gram as well as to many users have been terrified by the loss of all their materials, worked every sector:

out through years! To react with a smile to the next trick of your Smooth and homogeneous


passive state

computer or a "love-present" from the Internet ("I Love You" virus, Smooth and wavy


active state

having meanly damaged the disks and the spirits of thousands of people Bright and homogeneous


energy excess

all over the world), you should periodically copy all valuable Blocks


lack of energy

information and store it on stable memory media such as CDs, DVDs Several lines (beard-like)


acute problems

or external drives.

Tree-like structure


acute problems


Porous and cloud-like


energy deregulation


Separated dots


hidden infections

Space from the bottom line


old chronic problems

Complete block


ASC (external influence)


66 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 67

L-R symmetry

A huge amount of work has been devoted to the issues of functional features of the right and left halves of cerebral cortex, a short analysis of them and their application to EPI -graphy is examined in the book [Korotkov, 2002].

The observation of the L-R symmetry with regard to the body’s axes is of great significance when analyzing the person’s condition. At first sight, the way our The symmetry of EPI images turned out to be a significant indicator when bodies and faces are constructed appears to be symmetrical, but the similarity researching the psycho-emotional condition of military personnel, in the work between right and left is quite relative. Try to compare two right and two left of colleagues in Moscow at the State Scientific Research Institute of Military halves of a person’s face (in a mirror reflection) and you will get two new faces Medicine of the Russian Ministry of Defence under the direction of Professor having only a relative similarity with their owner. A method of psychological Igor Ushakov and the Ph.D. M.D. Vladimir Sen'kin.

testing was developed on the basis of this effect, giving reasonably good results.

x

“The difference of the integral glow area in the right and left hand A various sets of organs in our body are symmetric but their functioning fingers proved to be sensitive and significant in terms of prognosis relative to condition always differs.

EPI -parameters. The relative size of the image area (JS paameters) of the right When analyzing EPI -grams, we look closely at symmetry; this can be done and left hands, found during pilot’s background examination and after both with individual fingers and with the EPI diagram. The general rule is as loading, constitutes a telling bioelectrographic criterion for stress tolerance.

follows:

x

Good tolerance of pilots to load was characterized by lower JSR values

-

Pathologic signs manifest in one finger and absent on the in right hand in comparison with left hand (JSR<JSL) during background corresponding finger of the opposite hand have a clear functional value.

examination. The detected right hand functional asymmetry proved to be a

-

Pathologic signs having R-L presentation in the EPI images without valuable indicator reflecting the existence of high functional reserves.

filter are indicators of system functional weakness requiring correction.

x

Low tolerance was distinguished by negative JSL dynamics in the left

-

Pathologic signs having R-L representation in EPI images with filter hand, at minus 0.5–0.6, with increased asymmetry and lower JSL values in left show evidence of a pathologic process.

hand in comparison to right hand (JSR > JSL) during background examination.

Note that in the EPI images with filter, sectoral presentation can be deceptive; it depends on the severity of the pathologic process. We will later examine x

In accordance with the principles of evidence based medicine, a this question in greater detail.

diagnostic efficiency assessment was performed, including an estimation of the operative characteristics of the bioelectrography method compared to ‘the In EPI images without filter:

totality of traditional indicators of pilot overload tolerance as a reference. It was established that sensitivity of the bioelectrographic approach is at 86%,

-

The rright hand, when analyzing processes linked to psychological specificity is at 82%, and the prognostic value of positive and negative results particularities and conscious activity, carries information about the left is at 38% and 98% respectively; equal accuracy 83%.

half of the cortex of the cerebral hemispheres and says more about the person’s physiological condition.

x

The bioelectrography approach makes it possible to put into practice one of the most important ultimate aims of scientific and practical military

-

The lleft hand carries information about the right half of the cerebral medicine: to make a prognosis of the result of the body’s response to a hemisphere and says more about the emotional condition.

stimulus with the aim of diagnosing functional reserves, preventing unjustified or damaging effects, selecting individual doses of restorative treatment, creating an objective basis for drawing diagnostic conclusions.”

68 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 69

Analyzing Human Energy Field

Healthy strong condition

Human Energy Field (HEF) – is the most sensitive reflection of physical, emotional and, in some cases, spiritual condition of a person.

We take measurements from 10 fingers of both hands and using sophisticated software create an image of HEV. The principle is based on connection of fingers with different organs and systems of the body by Chinese energy meridians. This idea was firstly proposed by Dr Voll in Germany, later developed by Dr Mandel either in Germany, and then clinically verified and corrected by a team of Dr Korotkov in Russia. Therefore, the image, which we create in Bio-Well instrument, is based on ideas of Traditional Chinese Medicine and verified by 15 years of clinical experience by hundreds of medical doctors with many thousands of patients.

This field is uniform, without brakes, holes, strong out-bursts, of the optimal Bio-Well is not a medical instrument. It gives you an impression of your size. This is an apparently healthy person in a good mood state. This Energy Field and allows to see its day-to-day transformation and the influence condition was achieved by a person after two weeks of exercises and of different situations and stimulus to your HEF and hence, to your condition.

meditation. Her initial condition was not as good.

The E

Energy Field program is designed to process GDV images and to build a model of the human energy field using the information obtained from 10

GDV images of human fingers. The creation of the energy field is based on a diagnostic map. The Energy Field shows the human energy field as an image around the human contour and represents it in tables and diagrams in numeric form.


Let us see what is good and what is bad in Energy Fields.


Same person two week before. As you see, this Energy Field is not as strong, but still, it is quite uniform. Please pay attention to strong out-bursts in the coccyx area – this is clear indication of a strong problem in the lower part of the spine. After series of exercises, this problem was practically reduced (see previous images).

At the same time, we understand that it is not so often you may find people having absolutely no health problems. These problems may be compensated

– with appropriate diet, life style, medications, but anyway they will be

70 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 71

presented at the Energy Field. We may consider these people as apparently Health problems

healthy, with appropriate treatment all their problems would be balanced and people would have an active healthy life. Please see a couple of examples of this kind below. Arrows indicate the areas of attention.


As you see from these images, there are many holes in the Energy Field, the overall contour is uneven, a lot of jiggering in the head area. This person has many health problems, which need attention of a doctor. In particular, please, pay attention to the solid blue band in the lower leg area. This is an indication of the bad condition of the vines on the legs. Experienced person can make detailed analysis from the images of Energy Field, but this needs a special training.

Another example.


72 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 73

As you see, the difference between Energy Fields of apparently healthy people and people having chronic health problems is very faint. Only specialist having special training can give health analysis based on the Energy Field images. For this, he or she needs to use a lot of information from other programs. The aim of the Bio-Well instrument – is to give an impression of your Energy Field and follow up its development in the course of different exercises and treatment.

For example, you may take your image before and after sport exercise, meditation, pray, musical performance and see the effect of this process to your condition.

Below you may see transformation of the Energy Field of an orchestra conductor before and after symphony performance. As you see, artist spent a lot of energy for the performance.


As you see, the image is very disordered and hollow. This has nothing to do with health condition, but permanent stress and anxiety may have very negative implication to health.


Stress Level evaluation


Stress is a complex factor that has both an emotional component (anxiety) and Another example of much-stressed person. After seeing this image, she a somatic component that results from prolonged exposure to permanent understood that this condition might have very negative effect. She started a anxiety. Stress has very strong impact on the Energy Field. Images look very course of meditation and special anti-stress therapy. In half a year situation specific. Let us see several examples.

changed dramatically (see below).


74 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 75


Being relived by the effect she proceeded with therapy and half a year later improvement became even more clear (see below).

Seeing this image, he decided to change his attitude to business situation and take care of himself spending more time in sport club. In three months, result became clear.


This is a good example how you may follow up transformation of your condition under the influence of different treatment.

Another example of an Energy Field of a yang man who had serious problems with his business in the moment of analysis.

From many years of experience in using Energy Field analysis, we may conclude that the aim of any therapy, exercise or treatment should be improvement of the Energy Field image. This is a clear indication of the positive effect of a therapy. This may take some time – we should not always expect immediate effect, but in long run Energy Field should become uniform and balanced.

76 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 77


At the same time, very big Energy Field is not always an indication of good health. As any health related parameter, the Energy Field should be in some range. This situation may be tricky – only specially trained professionals may detect serious health conditions like cancer, cardio-vascular problems and the like. A system of Internet-based health analysis is under development.

Altered State of Consciousness

This is a very specific condition of a person originated from several situations: from one hand, deep meditation, pray, highest level of creativity, and, from the other hand, the influence of psychedelic drugs, narcosis, hypnosis, external mental influence and possession. In most cases, Altered State of Consciousness has specific representation on Energy Field. Let us look at some examples.


As we see from these examples, in ASC images are strongly distorted, left and right side is not balanced, the overall appearance is clearly different from the normal conditions. Altered Sate of Consciousness is a topic of special consideration of neurologists and psychiatrists.


78 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 79

Heightened Awareness Zones

The area of the vertebral column.


From the analysis of the condition of ‘apparently healthy’ people, it is clear, A sedentary way of life, jolting in a vehicle, micro traumas, knocks and that specific problem may detected in every case. This is a typical situation, contusions lead to spinal curvature of the column and damage of the cartilage which arises in the vast majority of the population during analysis. The fact is between the discs. In many people this manifests itself in occasional pain, to that many functional abnormalities cannot be diagnosed using the methods of the extent of acute episodes, while others only experience mild discomfort.

clinical medicine, which focuses mainly on organic abnormalities. Somatic However, even minor damage can lead to severe consequences. The vertebral condition of the particular organ may be quite normal, but functioning may column is a basic organ for the control of autonomic activity, and in Ayurvedic be suppressed. Patients with autonomic control disorders are considered medicine it is the area where we find the energy centres: the Chakras. A apparently healthy, however they can experience a whole set of uncomfortable deformation of the vertebral column leads to abnormalities of nervous symptoms which impede their ability to work, increase tiredness and worsen control, that is, to disorder of the combinatory work of the systems and organs.

their quality of life. A visit to a conventional doctor will probably not give any Most often affected is the area of the coccyx, which is linked to the work of all results, because the values of all the standard analyses are within the the organs of the small pelvis. This leads to the poor functioning of the prescribed limits. And the psycho-emotional dimension has a strong impact, stomach, bowels and the urogenital system.

leading to the high variability of conditions over time, which can be seen from In the EPI images the vertebral column is represented on fingers 2L and 2R.

the diverse examples above in EPI images without filter.

Severe abnormalities are displayed both in the field image and the EPI diagrams; however the final conclusion must be based on the information By identifying energy deficit zones, the EPI method makes it possible from the fingers. Because the EPI makes it possible to get information about to detect areas of increased risk. Among these are the zones in EPI the functional condition of the systems, which is primarily linked to the activity images without filter situated in an energy deficit area (or energy excess of the autonomic nervous system, the visibility of the signs will depend on the in middle-aged people and the elderly), in particular those repeated for current condition at that given moment. But in case of existing dysfunction, both hands.

the visibility will be displayed differently – depending on the severity of the condition. Let us illustrate this thesis with an example.

Pathological processes may not necessarily develop in these zones, but under load or stress this is nevertheless the most likely course of events. This can be Example 009

avoided by appropriate control and prophylaxis.

Let us examine the EPI images of a person’s index fingers, taken at different For example, in the case of an energy deficit in the area of the cardiovascular points over some years. During the years 1996-1999 this person suffered from system, good health can be maintained well into old age with a specific diet increasingly severe episodes of radiculitis which were managed by only the and relaxation regime. Unfortunately, practice has shown that in many cases administration of hydrotherapy and special gymnastics. After the year 1999

people did not pay attention to warnings given after EPI analysis, and went on the episodes did not recur, although the patient periodically experienced to develop severe problems.

unpleasant sensations in the area of the vertebral column, to the extent of pain.

We can identify several zones highly likely to attract attention when analyzing These pains were removed by rubbing the affected areas with peppermint and EPI images in the majority of middle-aged people with a European lifestyle.

doing exercises. In 2000-2004 this person survived a severe immunity crisis.


All the EPI images presented were taken without filter.


80 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 81

1999: clearly visible defects in the internal areas of the fingers. Period of strong radiculitis pains. We paid attention to the overall energy deficient character of the EPI -grams.

October 2000: immune inflammation; area of the vertebral column relatively stable, although evident small emissions.

March 2002: immune inflammation, clearly visible emissions in the area of the vertebral column and the bowels.

May 2002: holidays in the Crimea: sudden energy boost, small defects in the area of the coccygeal bone.

August 2002: defects more strongly apparent.

September 2002: severe immune inflammation.

November 2002: relative stabilization of condition.

September 2003: unstable condition with depressed energy and periodic immune inflammations.

May 2004: gradual improvement of condition.

August 2004: strong physical activity, reproduction of radiculitis pains which were removed with massages using peppermint. Pronounced defects in the projection of the vertebral column.

January 17 2005: holidays by the sea, general energy boost.

January 27 2005: strong physical activity, evident reaction in the projection of the vertebral column.

January 28 2005: special exercises lead to practical disappearance of the pathologic signs in the area of the projection of the vertebral column.

This example shows that the expression of defects in the area of the projection of the vertebral column can be different depending on the overall condition, however in case of problems, this indicator will always be apparent to some degree. At the same time, on the EPI images with filter, the given problem will be presented in periods of crisis; when the condition is normal it will not appear. This is linked to the fact that in the given example the illness does not affect the organ tissue level and appears as a functional abnormality of autonomic control.


It is advisable to pay attention to the energy condition of the vertebral column and apply the methods of osteopathy and manual therapy in the earliest stages of condition correction.

82 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 83

The next area requiring attention in a population with a European diet is the

-

urogenital tract: fingers 4L and 4R. Pay attention to the impossibility of projection of the gastrointestinal tract (GIT).

analyzing this zone in women during the menstrual period. In men defects are It is present in the internal side of fingers 5L and 5R; the external side of the manifested in this zone in the case of prostate inflammation.

fingers 2L and 2R and in one of the sectors of fingers 3L and 3R. Typical

-

Projection of liver and kidneys: lower sector of fingers 3L and 3R. It European eating habits are plagued by a host of deficiencies: excess fat, should be noted that all the organs which deal with food and excretion work carbohydrates, sugar, refined food, and lacking cellulose, raw vegetables and as a single system. A dysfunction in one organ will inevitably be linked to fruit. This situation is exacerbated by the intake of preservatives, dyes, functional abnormalities in the others. As a result of a reaction of these stabilizers, antibiotics, hormones and lately also genetically modified products.

systems to the nature of the food, load and stress, the defects observed in these In the USA these factors have reached a stage which has increasingly severe projections are very labile: in EPI images without filter, they can change in the consequences for the American population. A good saying is: “the longer the course of a few hours.

life of a product is the shorter the life of its user will be.”

Let us illustrate this thesis with an example (Fig. 010).

All this means that the GIT in people with a standard European diet is in a Data presented by V. Yakovlev and N. Priyatkin.

condition of almost continuous dysfunction, and the person experiences a huge amount of inconvenience and discomfort, to the extent of functional and Example (Fig. 010)

organic abnormalities.

Woman, 45 years old, Russian, chronic kidney disease, dysfunction of liver, Therefore, in most of the people examined in Europe and the USA, we stones in the urinary bladder.

observed defects in the area of the GIT projection, which attested to Three consecutive EPI images were carried out without filter at five-minute functional insufficiency. Evidence of these defects is determined by the genetic intervals. In the zone of the lower sector, clear defects, especially strong in the status (there are some people who can eat nails washed down with gasoline) zone of the right kidney projection. During subsequent EPI images, the energy and the character of the food itself. As a rule, it can be said that all GIT

loses power. This process is linked to the overall energy deficit and the problems can be eliminated by choosing a sensible diet.

exhaustion of the energy system when electronic flows are stimulated. A Pay attention, too, to the fact that the condition of the GIT is in direct change of the parameters of the EPI must be evaluated quantitatively because correlation to the condition of the nervous system. Therefore, defects in GIT

visual assessments are deceptive and not reliable. Use the assessment the EPI projection will be more strongly displayed in EPI images without filter.

Scientific Laboratory program, loaded with the finger images (bmp files). For finger 3R the calculations make it possible to obtain this following set of The thyroid gland.

parameters (Table 2).

The thyroid gland is related to the area of projection of the lower sectors in Table 2. A change in time of the parameters of the EPI images prior to EPI images of fingers 1L and 1R. The presence of aggressive defects in this therapy (T=00, T=00+5, T=00+10 and after the therapy session T=1, zone without filter unambiguously indicates functional damage. Conventional T=1+5, T=1+10)

Ɍ

medicine has well-developed procedures for correcting abnormalities in the EPI images

=00

Ɍ=00+5

Ɍ=00+10

Ɍ=1

Ɍ=1+5

Ɍ=1+10

taken

thyroid gland, when detected in a timely manner.

Area (pixels)

11358

9106

7008

18872

18707

13814

Among the zones requiring heightened awareness during analysis are: Form coef.

16.09

18.68

26.09

12.07

11.74

12.01

Entropy

1.91

2.19

3.02

1.09

1.07

1.34

-

the cardiovascular system: fingers 5L, 5R and also 3L and 3R;


84 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 85

remained apparently unchanged (table 2), which shows evidence of the overall increase of energy, although at the third capture they somewhat worsened.

This is not surprising, however. The condition of the patient was quite severe; she had a chronic illness apparent at the level of the organs. The EPI images with filter are evidence of this.


Stability of data


The repeatability of values of the EPI-parameters during daily monitoring was studied, at the St.Petersburg Federal Medical University, establishing baselines with practically healthy individuals and patients suffering from bronchial asthma (BA). For healthy individuals average amplitude of variations in the EPI-gram parameters showed a daily average of 4.1%, and the 10 minutes average amounted to 6.6%. For the BA patients these values amounted to 8.6% and 7.7%. For several individuals (about 10% of the entire group of the people studied), where some were healthy, some had BA, the daily variability of the EPI-grams parameters was considerably higher – up to 18%. All these individuals had pronounced liability in their psychological status, as well as vegetative instability. Statistically significant correlation coefficients (r>0.5, p<0.05) were discovered between the indices of the vegetative balance and the EPI-grams’ parameters, which confirms the fact that the autonomic nervous system plays an important role in the system In the picture the 3LF EPI -gram is presented having an area of clearly regulation mechanisms of an individual. Good repeatability and apparent defects in the lower sector. After the treatment (Fig. 3LF after) the reproducibility of the EPI-gram parameters was observed for the absolute intensity of the defects decreased although they remained.

majority of examined healthy individuals and individuals with BA (in 90% of cases). High sensitivity of the EPI-grams toward changes in the As is clear from the data in this table, during successive measurements before psychoemotional state of patients should be taken into account.

treatment the area of the images falls while the shape’s form coefficient and entropy rise.

Considering the stability of the instrument itself, variation of EPI-gram parameters taken with the titanium calibration cylinder was less than 1% at A course of restorative therapy was carried out on the woman with a massage night and less than 3% in the daytime, providing calm environmental of acupuncture points, aromatherapy and herbs. After the treatment her conditions.

energy level rose dramatically (the area increased from 7000-11000 to 18000), and the form and entropy coefficients decreased. This testifies that the course When the body is functioning normally, that is, when there is a good level of of treatment definitely had a positive effect. At the same time, the defective autonomic control, we can observe fluctuations in the energy level in images image remained, which is obvious from the third capture after therapy without filter from one day to the next, in a number of cases and over the (T=1+10). During the first two successive shots after therapy, the parameters course of several days. This is linked to the physiological cycles (clearly

86 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 87

presented for women) and CNS and ANS reactions on the changing having diagram curves in the hyper-energy zone – this may be a very environmental and stress conditions. You can observe this process in the troublesome indication.

measurements of the EPI images without filter.

Fig.2.14 gives an example of diagrams for the same person as in fig.2.13 before Depending on the homeostasis level and age, a person’s condition changes to having severe inflammation of the bladder. You may track the transformation varying degrees. These fluctuations are reflected in the EPI images without of state for this person by processing EPI images in EPI programs from the filter. They reflect the level of regulation of the functional systems of the body

“011” folder on the CD.

by the ANS.

In an apparently healthy person with fluctuation of parameters without Filter, the parameters with Filter remain practically unchanged over a long period during a change in environmental conditions. A change of the parameters with filter is evidence of severe changes in physiological conditions.

For a mentally stable and healthy person of middle age the EPI parameters are quite stable. As an example, you may see several diagrams taken during the year. As you see, they are quite repeatable.


FIG. Several diagrams of a person taken during 4 months period.

1 – measurements taken just before the inflammation.


Recommended procedures for recording BIO -

grams:


Fig. Diagrams taken during the year.


1.

Calibrate the GDV device at least four times a year, or if conditions The change of a diagram is an indication of some processes occurring at either change, e.g. moving the camera to another site, change of computer, severe the psychological or the somatic level.

change in atmospheric conditions. Calibration must also be performed if Typically, a decrease of parameter values in the diagram without filter

‘unusual’ results are obtained.

– transition into the deficiency zone – represents mental and 2.

Check the capture parameters in the GDV Camera (in accordance with psychological frustration, which may then have a negative influence on the device instructions) and the processing parameters in programs. Changing the body at the somatic level.

the processing parameters leads to distorted results.

An increase of diagram parameter values (both with and without filter) 3.

Take BIO-grams of the patient at least 2 hours after the consumption

– transition into the hyper-energy zone – may be an indication of of a large quantity of food, without alcohol or strong medicines. Some developing somatic problems. We should be very attentive to patients medicines (in particular, hormones or anti-depressants) will have an effect on

88 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 89

the nature of the energy. It is advisable to empty the bladder and bowels 14.

When the state of the individual is monitored by periodically taking the before image capturing begins.

BIO-grams, the measurements must be taken at the same time of day, by the same physician, in the same room with constant optimum temperature, 4.

The examination of the patients may be conducted during all the day, humidity and gas composition of the air, maintained by means of the but preferably before any medical diagnostic procedures and the intake of ventilation and heating systems.

drugs, at least two hours after the latest intake of food and smoking, and at least 24 hours after the latest intake of alcohol. The intake of certain drugs Statistical distribution in BIO-grams’ parameters influences the psychophysiological state.

5.

The fingers must not be washed or wiped with alcohol before the GDV Bio-Well program based in Internet allows to make statistical analysis registration. If the hands are very dirty, wash and wait a further 15 minutes.

of different parameters of the Bio-grams collected in different experiments.

6.

In the case of sweaty hands (excessive perspiration), wipe each finger For the moment of this analysis it was 8500 measurements of human fingers individually and then take BIO-grams.

in the database, of both gender in the age from 25 to 100 years. Some 7.

Before taking BIO-grams it is advisable to allow the patient to relax for people were tested multiple times. Analysis was done on all database without 15 minutes, drink water (but not tea or coffee) and sit in pleasant surroundings separation by age or gender.

with relaxing music.

Fig.1 presents histogram of GDV parameter Human Field Energy.


8.

Some people, particularly children and the young, may demonstrate a 350

‘medical reaction’ which manifests itself as a stress reaction on the Energy

measurement process.

300

250

9.

Before each measurement, the optic lens of the GDV device must be wiped clean.

200

10.

If unusual BIO-grams are obtained, repeat the measurement of the 150

patient and be sure that the results are precise.

100

11.

It is necessary to use a new filter for taking BIO-grams of ten fingers of 50

each patient. Ensure that the filter is accurately stored, straightened out and 0

does not become crushed during the measurements.

10 18 26 34 42 50 59 67 75 83 92 100 108 116 124 133 141 149 157


12.

Repeated image capturing may lead to varying results. Decreased clarity Fig.1 Histogram of GDV parameter Human Field Energy based on 8500

with repeated measures testifies to weak energy. Uneven changes of the BIO-experiments. Abscises axes represent energy in Jouls, ordinate axes –

grams indicates deregulation of adaptation levels. In such cases, it is necessary amount of measurements with particular level of energy.

to carry out a series of repeated measurements and draw conclusions accordingly.

As we see from Fig.1, histogram has two distinct maximum. Detailed analysis demonstrated that the first maximum is typical for people having different 13.

Psychologically and physically comfortable conditions must be deceases or increased level of stress, this we may define as slight energy provided for the individuals under study, and any random influences deficiency. Second maximum is typical for people having high level of inner (psychological, physical, etc.) must be excluded.

energy: athletes, politicians, businesspersons, public presenters.

90 Energy Fields Electrophotonic Analysis Energy Fields Electrophotonic Analysis 91

Similar appearance had the histogram of energy distribution for every single As we see from Fig.3, most of measured parameters belong to the diapason finger.

higher than 90%.

Based on these data we have chosen the range of energy, typical for Based on these data we have chosen the range of Balance index, typical for apparently healthy people as E = (40 – 70) Jouls.

apparently healthy people as: ʦ = {90 – 100%}.

Fig.2 presents histogram of Stress Index distribution.

Histograms of parameters distribution for different fingers look identical.

600

Below we present examples for the right thumb (R1). From these data it is Stress

clear that in statistical processing of data we need to use non-parametric methods of analysis. And the more the diapason of the particular parameter 400

variation, the more it should be sensitive to the evaluation of different human states and may be useful for the research process.

200

400

Intensity

300

0

1.4

2.4

3.3

4.2

5.2

6.1

7.0

8.0

8.9

9.8


200

Fig.2 Histogram of Stress Level GDV parameter based on 8500

experiments. Abscises axes represent Stress Level in the scale from 0 to 10, 100

ordinate axes – amount of measurements with particular level of stress.


0

As we see from Fig.2, histogram has well-presented maximum, but there are 38

56

74

92

110

128

146

164

182


many measurements with high level of stress up to the maximum values.


Based on these data we have chosen the range of stress index, typical for 400

apparently healthy people as: Str = { 2 - 4}.

Radius of inner countour

Fig.3. presents histogram of distribution of the Balance parameter.

300

1500

̯̌

Balance

200

̨̭̯

ˋ̌

1000

100

0

500

10

18

26

34

42

50

59

67

75


0


48

52

57

61

66

70

75

79

84

88

93

97


Fig.3 Histogram of Balance GDV parameter based on 8500 experiments.

Abscises axes represent Balance parameter in the scale from 0 to 100, ordinate axes – amount of measurements with particular level of balance.

92 Energy Fields Electrophotonic Analysis Energy fields electrophotonic analysis in humans and nature 93

1500

OuterContourLength

Part III

1000

The Concept of Homeostasis Levels in

500

Electrophotonic Bioelectrography

0

412

871

1329

1787

2245

2704


500

Outer Contour Radius

There is something in this more than natural, 400

if philosophy could find it out.

William Shakespere

300

Hamlet II, 2


200

Homeostasis: any self-regulating process by which biological systems tend to maintain stability while adjusting to conditions that are optimal for survival. If 100

homeostasis is successful, life continues; if unsuccessful, disaster or death ensues.

0

The stability attained is actually a dynamic equilibrium, in which continuous 16

30

43

57

71

84

98

111

change occurs yet relatively uniform conditions prevail. [Encyclopedia Britannica, 2005].


Homeostasis in physiology: a relative dynamic constancy of the composition and 6000

Outer Form Coeff

the properties of the internal environment, and stability of the basic physiological 5000

functions of the body of a person, animals and plants.

4000

Homeostasis or homoeokinesis is the property of an open system, especially living organisms, to regulate its internal environment so as to maintain a stable 3000

condition—by means of multiple dynamic equilibrium adjustments controlled by 2000

interrelated regulation mechanisms. [Principia Cybernetica Web: http://pespmc1.vub.ac.be].

1000

The concept of homeostasis—i.e., that all living things maintain a stable internal 0

environment—was first suggested by Claude Bernard, a 19th-century French 0

37

73

physiologist, who stated that “all the vital mechanisms, varied as they are, have only one objective: that of preserving constant the conditions of life.” The term was coined in 1932 by Walter Cannon from the Greek roots homo- (same, like) and sta- (to stand or stay).


94 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 95

As originally conceived by Bernard, homeostasis applied to the struggle of a x

The removal of metabolic waste, called excretion. This is accomplished single organism to survive. The concept was later extended to include any by the excretory organs such as the kidneys and lungs.

biological system from the cell to the entire biosphere, all the areas of the Earth x

The regulation of body temperature. This is mainly managed by the skin.

inhabited by living things.

x

The regulation of blood glucose level. This is mainly managed by the The concept of homeostasis is also applicable to associations of living bodies, for liver and the insulin secreted by the pancreas.

example, the preservation of constancy of specific composition and number of individuals in the biocenosis of an ecosystem is also called Homeostasis. Genetic Levels and Zones of Homeostasis

homeostasis is the capacity of a population to maintain the dynamic equilibrium of genetic composition, which ensures the highest possible degree of viability.

From a systemic point of view, we can describe the body’s condition as a set of The term ‘homeostasis’ is also employed in cybernetics to denote any self-discontinuous homeostasis levels (otherwise called adaptation levels). During regulating mechanism. We can apply the principles of cybernetics and the theory vital functions, physiological parameters are constantly fluctuating, which is of non-linear systems to a description of the functioning of a body.

clearly cyclic in nature in a healthy body. In the morning we need time to ‘get In real life many people have a condition that is characterized by various lapses moving’ and connect with activity. Then comes the time to get active, which has in optimal functioning. These lapses are characterized by numerous different its own peaks and troughs. At 5 or 6 pm we often start to lag physiologically, and physiological parameters, which make it impossible to evaluate them from the this then gives way to a surge in the evening. These phases are manifested in point of view of a single system. Many doctors agree that an elaboration of different ways in different people, and they depend on the character of the load, complex methods is required to evaluate the conditions of the body. One of the diet and stress reactions. Throughout this time techniques for the comprehensive description of different conditions is the the body fluctuates within several homeostasis principle of the homeostasis level.

levels, whilst remaining within the limits of one


zone.

Properties of homeostasis

All the physiological parameters are within the Mechanisms of homeostasis: feedback.

norms, within the limits of one homeostasis

Homeostatic systems show several properties: zone. A vivacious and energetic person

actively deals with a viral infection and changes x

They are ultrastable;

in environmental conditions. This is the state x

Their whole organization, internal, structural, and functional, contributes of health, and such a state should be natural to to the maintenance of equilibrium;

everyone.

x

They are unpredictable (the resulting effect of a precise action often has This principle can be presented in the form of a conventional graphic. It is by its the opposite effect to what was expected).

very nature a graphic in a multidimensional space of signs. Let us present it in a three-dimensional space. Along one axis of the abscissa lies the quantity of the Main examples of homeostasis in mammals are as follows: overall entropy of the body, along another axis is the quantity of the Fractality.

x

The regulation of the amounts of water and minerals in the body. This is The axes of ordinates conventionally reflect the quantity of the balance of the known as osmoregulation. This regulation is managed in the kidneys.

sympathetic and parasympathetic sections of the nervous system.


96 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 97


sudden change to the next, pathologic, homeostasis zone. As a rule, this zone is linked to organic abnormalities and dysfunctions.

The levels of the homeostasis are coordinates of the condition in this space of signs, and during vital function these coordinates constantly change within set Therefore, it is possible to speak of the existence of several conditional limits.

zones of homeostasis, within the limits of which the person’s body As an axis of the graph we can choose other parameters that characterize the functions. A transition between zones is carried out as a result of sudden functioning of the body, for example, the systolic-diastolic pressure, blood PH or changes, but inside every zone there is a discontinuous set of quasi-sugar level. The main thing is that these parameters are sufficiently continuous levels. The transition between them requires very little energy comprehensive and reflect the body’s work as a single entity. For example, the expenditure.

axis of ordinates can reflect the level of information exchange between different organs and systems and the autonomic nervous system. When there is optimal At a high level of homeostasis, the sympathetic-parasympathetic balance is sympathetic-parasympathetic balance and active information processes, a optimal and close to 100%, the level of entropy is close to the minimum for a continuous transmission of information from each organ to the autonomic given age, which corresponds to the maximum production of negative entropy nervous system takes place in the body and a systemic regulation is carried out by the body. Let us call this functional homeostasis zone with the letter H, for throughout the whole body. When the information channels are blocked, this Health. This is the zone of optimal functioning for a given age, although within process is repressed or entirely cut off.

its limits a constant fluctuation occurs at a level of homeostasis.

When there is a lapse in physiological parameters away from the normal level, a Fluctuations of the sympathetic-parasympathetic balance take place during the displacement takes place in the homeostasis level. At some point, an functioning process, leading to a discharge of supplementary energy when the accumulation of unfavourable factors provokes a non-linear effect, and the body balance is diminished, and energy expenditure as the balance is restored. In other suddenly jumps to another homeostasis zone. The person gets tired quickly, words, the downward motion along the axis of ordinates does not require sleep is restless and does not allow the person to recuperate fully, and the impact supplemental energy, whereas upward motion requires an expense of energy, of viruses in the body leads to diseases. However when this occurs the person is causing an increase in entropy, and this can only be compensated at the expense still considered apparently healthy. The physiological parameters are close to the of an exchange of energies and entropies with the environment.

borders of the zone’s norm, which in traditional medicine is categorized as an A classic example is the stress reaction of Selye. According to Selye, any apparently healthy condition. The person can remain in that state for an sufficiently strong external stimulus (stressor), physical or psychological, unlimited length of time, especially if non-specific therapies and periodic rest are provokes a condition of stress, which appears in the set, non-specific response maintained. Genetic predisposition is an important factor for determining (i.e. irrespective of the nature of the stressor) in the mammal body. He called this resistance of systems to non-optimal function.

the overall adaptation syndrome – OAS. OAS is the totality of the defense In additional variations, many people have pathologic lapses in their health, mechanisms of the human or animal body under stress (mainly with the which may be compensated by the body, but which inevitably have an influence endocrine system). Three different stages make up the adaptation syndrome: on the overall function.

alert (mobilization of defense mechanisms), resistance (adaptation to a difficult Finally, while continuing to function in a mode of load and stress, or where situation), eexhaustion (intense stress of long duration, which can cause death).

unfavorable factors are permanent in effect (chemical contamination from food, The concept of stress is wider than the adaptation syndrome which can be water and air, nervous-psychological load, being overweight, etc.) the sometimes viewed as a clinical manifestation of stress; so in people with abnormal compensating possibilities of the body may be insufficient, and it moves with a


98 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 99

function of the endocrine glands, (and rats with removed adrenal glands), stress can also be observed. This is shown by the high values of the RMS indicators, is possible without the adaptation syndrome. The basic mechanisms of stress are expressed in the Bio-grams in brackets.

hormonal. The main morphologic sign of the formation of the adaptation One particular example of the HS homeostasis zone is elderly people with a syndrome is the so-called ‘classic triad’: enlargement of the adrenal cortex, string of chronic illnesses compensated at the autonomic level, which allows them reduction of the thymus and stomach ulceration. Selye also described the local to function relatively normally when energy expenditure is minimal.

adaptation syndrome (inflammation, for instance) arising in organs and tissues in response to strong or destructive stimulation.

When total loss of autonomic control occurs, the body unevenly moves to a homeostatic pathology zone P. Here, as a rule, a critical process develops. In the Thus, the adaptation syndrome arises in response to the stressor, i.e. the factor early stages it might not have pronounced symptoms. A specific example of this causing the abnormality (or the threat of abnormality) of the balance of the body’s is the condition of cancer patients in the early stages of development of the illness, physiological systems, i.e. the relative constancy of its internal environment, or when there are no external signs that a pathologic process is developing actively.

homeostasis.

As will be shown below, the EPI-graphy makes it possible to detect characteristic In the state of alert, all the physiological processes are activated, which means it signs of these conditions, linked both to the energy level and its form of is possible to view stress as a positive process which helps to mobilize internal organization.

resources to find a successful solution to the problems which arise. A shift The A

ASC homeostasis zone is linked to the A

Altered States of Consciousness

upward takes place at homeostasis levels, which does requires extra resources (ASC). The whole body changes the character of the energy provision and from the body. When these resources are lacking in the problem-solving process, switches over to a special mode in which a whole set of specific effects may or when there are negative emotions, the stage of exhaustion develops, leading appear. Above all this is evident in the characteristic activity of the brain’s network to abnormalities of autonomic control and a transition to lower homeostasis of neurons, and in the specific character of both internal sensations and external levels.

signs.

When the process of entropy compensation cannot cope with the production of These conditions are also linked to a specific type of EPI images.

entropy by the body, an uneven transition takes place to a lower adaptation zone which can be designated as H

HS ((Health + Stress). In this condition, a quasi-stable The concept of the homeostasis zones and their EPI bioelectrography level of autonomic control sets in, which is not optimal and accordingly requires correlates is key when carrying out EPI analysis. Complete mastery of higher energy expenditure with high entropy production. At this adaptation level, these concepts means it is possible to analyze the patient’s condition and, the person is considered apparently healthy; however, the state of health is in many cases, provide a prognosis of its development.

unstable: the immune system does not work effectively and the person is prone to infections and tires quickly. Digestion is sluggish and the excretion systems enter a state of flux.

On the Bio-grams , the HS homeostasis levels are characterized by energy deficit conditions without filter, and by good energy with filter. This is most pronounced in the EPI diagram where the curve without filter remains in the inner area, while the curve with filter is near the lower limits of the optimal middle zone. Another important sign is the asymmetry in the right and left hands. As a rule, increased dispersion of the parameters of the EPI diagram for different systems and organs


100 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 101

Particular features of EPI data for different homeostasis levels


H (Health) homeostasis zone


In Bio-grams the H homeostasis zone is characterized by a high general energy level. Bio-grams without filter are equal, powerful and without particular defects, Bio-grams with filter are even. On the EPI diagram both curves are situated in an optimal zone close to each other. There is a high degree of symmetry, the dispersion of the parameters for different systems and organs is small, that is, the line of the EPI-diagram is close to the circumference. Separate sectors with energy deficit may appear for one hand only. They are functional in character and disappear after a while.

The H homeostasis zone is optimal for vital functions: “the person is full of strength and energy, thinks clearly, is vivacious, active, strong, sleeps well and wakes without difficulty. Such a person entirely corresponds to his psychological character and age.”

Example H 1, Man 47 years, practically healthy This person is healthy, but in the course of his life he had some health problems and had to use both conventional and integrative medicine. He works hard, eats healthy food, and from time to time has a drink with friends. Typically his condition is very well: energy field is strong, parameters are in most favorable zone, Energy Diagram is stronge than Health Diagram, BIO-grams look like perfect rings. However, if compare parameters during a yerar, we see month-to-month variations, which somehow correlate with the biorythmes (in particular, energy changed from 49.18 to 89.45). This shows, that measuring parameters on the regular basis, it is possible to see real everyday condition and organize activity accordingly: regulate loads and relaxation, spend more time at nature, make excercises and meditaitons.


102 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 103

HS (Health + Stress) homeostasis zone


The HS homeostasis zone is characterized by the presence of energy deficit zones on the Bio-grams without Filter and reasonably dense compact images with Filter. The activation level is higher than optimal, but lower than the stress level, within the limits A = 3-6.

Another sign of the HS homeostasis zone is the inconstancy in time of Bio-grams without filter. Taking them on different days, or even during one day, we can observe significant fluctuations of parameters of the Bio-grams in a number of cases, and a full change of their aspect.

This is a manifestation of instability of the autonomic control and the abrupt reaction of the body to changes in external conditions. As a whole, the HS

homeostasis zone is characteristic for most of apparently healthy people. Bio-grams are generally very convenient for analysis and allow not only to detect weak zones of the autonomic control but also to make a prognosis of the condition.

This is quite a typical case for the work of doctors practicing holistic medicine. A low level of the autonomic control leads to autonomic imbalance, manifested in the so called ‘vegetosis.’ These concepts are being actively developed in modern medicine.

In accordance with Bio-grams of the H and HS homeostasis zones, it is possible to analyze the energy condition, or in other words, the level of the autonomic control of different systems and organs in conformity with the EPI diagnostic table. In the lower subtotals of the HS zone homeostasis this becomes impossible, that is, the autonomic imbalance is too strong. However, it is then possible to analyze the level of energy reserves in the Bio-grams with filter.


Example HS-1, Man, 51 years old, apparently healthy.

This is typical example of a person, having some health issues. His Energy Field is quite strong, but have defects we pay attention to.


104 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 105


His Health Diagram is mostly in deficiency zone, but Energy Diagram is stronge compared with the Health Diagram, which indicates that he has good energy We pay attention to throat / thoroid gland area at 1R, 1L; sacrum and coccix potential.

zones at 2R; colon system at 2L related to respiratory system at 5L; liver zone at 3R; uro-genital zone at 4R. All these zones correlate with problems this person has. At the same time, his energy level is normal 52.87 J, and stress level is 3.12

so we consider him as apparently healthy.


Example HS-2 woman, 64

Clinically this woman is apparently healthy, although she is overweight. Not having particular health complaints, at the same time she periodically experiences autonomic discomfort: unpleasant sensations on the back, constipation, gases, bad sleep, migraines, etc. We can confidently affirm that if not corrected properly, the physiological condition of this woman will deteriorate.

As we see, her Energy Field is quite low and energy level is only 27.6 J – below normal range, although Stress leve is normal – 3.36. At the fingers we do not see any specific marks, but Health Diagram is much stronger compared with Energy Diagram. This is an indication of a weak energy reserve.


Energy condition of different organs and systems we may analyse from the Bio-Such people can have an array of chronic illnesses, and conventional curative grams of fingers.

medicine is almost unable to cope with a similar situation, and these patients go from one specialist to another. Life is somewhat listless and wages are spent on pills and tablets.


106 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 107

Furthermore, it can go as far as obvious symptoms or organic lapses, and the person could spend the whole of her life in the HS homeostasis zone, with no idea of how inefficiently his body is working. As a rule, the functional condition has an effect on the psychological: people in the HS homeostasis zone have to pay more attention to their health, which uses up a lot of emotional energy.


BIO-grams without filter reflect the basic weak zones of the body, or the risk zones. At high adaptation levels the systems and organs work together, with high energy, and energy deficit zones are not visible. When the adaptation level decreases, due to fatigue, stress or overload, the energy deficit zones are identifiable. They reflect the ‘weak links’ in the body. These are the zones in need of closest attention, since they are significant in terms of prognosis.

When it is frequently said that the GDV/EPI method makes it possible to detect illnesses in the early stages of development, that means this precise feature. From the autonomic point of view, different systems have different levels of functional tension which can be seen in their reaction to stress.


The stronger the level of functional tension of the system, the more active the reaction to stress will be, and the more pronounced it will be on the BIO-grams without filter.


If the system stays under functional autonomic load for a prolonged period, there is a high probability that pathological organic processes will develop.


108 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 109

The detection of the ‘risk zones,’ together with prophylactic and preventive Cholelithiasis is a systemic disease with a complicated set of generative causes, measures makes it possible to maintain the system in a condition of high energy affecting several functional systems of the body. At the same time it is usually not and efficiency, i.e. to maintain excellent health.

life-threatening. By indications, a relatively simple surgical operation is carried out, generally laparoscopic, and afterwards the condition of the patients improve and they return to normal life.

It should also be borne in mind that psycho-emotional tension is no less significant for the body than the influence of the external environment. The Let us observe several cases of cholelithiasis with Bio-grams before and after the emotions have a direct influence on the ANS through the CNS, and ANS

operation.

reactions are reflected on the Bio-grams without filter. Later, we will look in more Example HS 3. Woman, 54 years old.

detail at the issue of researching the psychological state of the person using the EPI method. In most real-life cases, it is impossible to isolate the influence of a The initial condition before the operation shows on the BIO-grams an energy particular factor, and this can only be done within a specially organized deficit condition in a number of systems, especially in the right hand. During experiment. In real life w

we observe the systemic reaction of the autonomic cholelithiasis we look first of all to the lower sectors of fingers 2 and 3, because nervous system to the impact of factors in the surrounding environment as well the area of inflammation is in this zone. BIO-grams in the initial condition are as psycho-emotional fluctuations.

distinguished by their strong heterogeneity, . though some density is observed in the area of organs of the small pelvis. The Bio-grams may be considered as having Let us observe a set of EPI data for cases of cholelithiasis in the HS homeostasis aggressive signs. After surgery signs became much less aggressive, Energy zone. The clinical cases observed below were helpfully presented by D.M.

Diagram moved to the positive zome, Energy coefficient increased. Stress level Shirokov, Ph.D., M.D. and E.U. Strukov, Ph.D.,M.D. (Military Medical after surgery increased, which is quite understandable.

Academy, St Petersburg).

At the same time you may not notice these chenges at the images of Energy Field.

Cholelithiasis, (from the Greek chole – bile, and lithos – stone) is a human This is an argument that you always need to take into account information from disease which is characterized by the formation of stones in the gallbladder and, all the programs.

more rarely, in the bile duct. By composition we can distinguish homogeneous (i.e. either cholesteric, pigmentary, calcareous, or albuminous) and mixed stones.

It is important to monitor the reaction of the body to the impact, in this case, of The number of stones, their weight and shape vary widely. Gallstones form when surgical operation. Immediately after the operation we can see an increase of the the main constituent parts of the bile are deposited and become crystallized, diagram in the right hand (brown curve), yet the day after, the R diagram returns which is determined by damage to the stability of the colloidal system which is almost to the initial state, while the L diagram actually decreases. This the bile. A more frequent formation of choleiths happens as a result of damage characterizes the overall activation reaction after operation with a return to the to the metabolism, through genetic predisposition and particular food habits (rich initial level after remission. Clearly, the operation to eliminate gall stones from foods and those high in cholesterol). Quite often, cholelithiasis is combined with the gallbladder does not eliminate the causes of the disease. Therefore, on the other metabolic diseases (obesity, gout, pancreatic diabetes, familial diagrams with filter, the process of bodily reaction to the operation is hardly hypercholesteremia, etc.). The course which cholelithiasis takes depends on the reflected. It is important that in this case the operation performed was not highly additional presence of infections, the intensity and the length of the obstruction traumatic.

(obturation) of the biliary tracts, as well as damage to the liver, pancreas, heart, etc.


110 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 111


112 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 113

Example HS 4 – Cholelithiasis, woman, 25 years old.

BIO-grams before the operation have intense emissions and heterogeneities in the area of lower sectors of the fingers 2 and 3. After the operation the intensity and heterogeneities in these sectors strongly decreases. At the same time on the Diagrams we can observe a clear reaction to surgical intervention, especially in the right hand. As with the preceding case, a dramatic increase is observed straight after the operation and a decrease on the following day (not shown on the graphs).


Example HS 5 – Cholelithiasis, man, 39 years old.

Initial EPI diagram of the energy deficit on both hands. On the initial BIO-grams there is a clear deficit in the lower sectors of all the fingers, with streamer defects on 2R and 3R. Similar defects in the lower sectors of 1R and 1L, 5R and 5L show the excited state of the endocrine system. At the same time, EPI F in the initial state are fairly even, this shows the lack of strong pathological organic disturbances immediately after the operation. improve dramatically, the defects shown remain. On the Energy diagrams there is a clear reaction by the body to the operation, showing the body’s healthy protective mechanism and the presence of energy reserves.


114 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 115


The use of examples again illustrates the idea that different Bio-Well programs carry different information. The Energy Diagram gives a representation of the overall energy of separate systems and the body in general, whilst reviewing the details of these processes requires the use of the BIO-grams of fingers. Bio-Well programs allows to analyze sectors relating to the systems in detail.

The cases reviewed here are typical for apparently healthy people who have undergone a change in their physiology and energy due to various factors, and are likewise typical of mild and moderately serious illnesses. Changes in parameters of the BIO-grams reflect the fluctuations of the functional condition and the energy of different systems and organs. The activation coefficient reflects the level of functional tension as well as the stress level. The therapy being carried


116 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 117

out leads to an improvement in the overall condition which is reflected on the We see unfovarable signs in the lower sectors of every finger. Together with the BIO-grams.

Energy Field, Energy Diagram and Balance programs, it allows us to define areas of attention:

Example HS 6, woman 36 years, apparently healthy, but having many complains x

Health Diagram is in favorite zone and lower than the Energy Diagram, which is Endocrine system, in particular, thyroid, mamary and adrenal glands; a good indication, but on the Energy Diagram we see strong ejections, which x Spine, in particular, sacrum and coccix areas; indicate hypo activity of the particular organs. Stress level higher than norm and x Colons, in particular, sigmoid colon and rectum; balance is at the lower end of a norm level. On the Energy Field, we pay attention x Urino-genital system.

to sevral areas, for detailed analysis we switch to fingers BIO-grams.


Health Diagrams


Energy Diagrams


118 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 119

We see complex of problems, accumulated in years. They are reflected in The problem is that the GDV instrument do not give good images when there is multiple symptoms: hypertension, diabetes of II type, constipations, irregular heavy perspiration on the fingers. In a state of rest, this is one of the signs of monthly circle, and spine pains. In cases like this classical medicine may offer autonomic imbalance, although such a scenario can also be observed in atheletes variety of medications, without informing patient about possible side effects.

during training or in obese people after even gentle physical exercise. It goes Much better solution – to use integrative approach, pay attention to life style, without saying that these various situations should not be confused.

relaxation, food, water regime, and regular check-up.

In the low levels of the HS homeostasis zone, characteristic ‘palm-like’ streamers In cases like this, we discuss with a patient the overall situation, health complains, can be observed. Their nature is evidently linked with the release of salt through psychological situation. As a result, we may recommend person a list of necessary the skin, although this has not been thoroughly studied. In the earlier Kirlian analysis and life style transformations. It was many cases when people were photography, diagnostic methods were developed which were based on the coming back in a year with gratitudes and their condition changed dramatically.

appearance of similar characteristic streamers [Milhomens, 1997] and their relation to illnesses. In EPI bioelectrography such a practice does not exist It should be borne in mind that in the HS zone of homeostasis, chronic illnesses because we lack a database of such cases. We would be grateful to all of our may not show up on BIO-grams. This is linked to the phenomenon of colleagues in other countries if they would send such BIO-grams along with a compensation, when specific systems or organs compensate for the inefficient detailed description of the patient and situation. This will allow us to create a function of other systems. For example, in the case of the right kidney or right database of characteristic streamers, and possibly draw some fresh conclusions.

ovary being removed, the counterpart left organ takes on its physiological functions, and the BIO-gram shows a normal picture without visible defects.

In Bio-Well system this is very easy. You need to press one button (see below) and send it to login CASES. To check differnet BIO-grams collected at this At the same time, when burdened (by stress, unfavorable environmental account you need to use login and password CASES. This account allows to see conditions, bad water or food), compensatory possibilities are insufficient, and all the information, but does not allow to take measurements.

the BIO-grams show clear defects.


For people in the HS zone of homeostasis, timely monitoring of the condition is strongly advised.

In the low levels of the HS homeostasis zone, the BIO-grams without filter hardly register any image, only individual sparklets (see case HS 5). The Bio-grams with filters, meanwhile, may look perfectly normal. This illustrates the strong imbalance of sympathetic and parasympathetic parts of the autonomic nervous system, which may be related to strong physiological stress.


NB:

If you have obtained BIO-grams similar to Figures of case HS 5, which seem to be different from the usual, you must repeat the measurement, wiping the finger each time with a dry cloth and proceeding immediately to the capture. In this case, after each finger has been registered, it is necessary to wipe the optical lens of the device.


120 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 121


the problems is slagging of vessels or arteriosclerosis, which leads to a whole array of cardiovascular illnesses.

Prolonged presence in the HS homeostasis zone under additional stress, both environmental and psychological, can lead to intermittent transition into the P

Therefore, loss of autonomic regulation is the cause of the most serious homeostasis zone – i.e. to the loss of autonomic control.

illnesses.


P (Pathology) homeostasis zone


In the BIO-grams the P homeostasis zone is reflected in a quite specific way. The BIO-grams without filter may have an almost ideal appearance. They become Transition to this level is related to staying for prolonged times in the low even and round. At first sight it is practically impossible to distinguish them from sublevels of the HS homeostasis zone, with a dramatic shift in the entropy of the the Bio-grams of the H homeostasis zone. The EPI diagram without filter lies in body or under severe stress. Provoking factors, such as harmful chemical the middle zone or higher and practically coincides with the EPI diagram with substances, carcinogens, radiation even in small doses and pathological micro filter.

organisms are constantly in effect. At some point the so-called ‘bifurcation shift’


takes place, and the body loses its autonomic regulation. The systems and organs In some cases the EPI diagram without filter is bigger than EPI diagram basically work, each fulfilling its task, but without any tight overall control.

with filter (see fig.3.5). This may be a troublesome indication!!!

At first glance it appears that nothing unusual is happening. It could be compared to a high-level orchestra, whose conductor suddenly has to go and call home, and How do the Bio-grams for the H and P homeostasis zones differ?

the orchestra rehearsal continues without his participation. Each one of the musicians knows his part perfectly and has the sheet music before him, but after H homeostasis zone: Bio-grams with and without filter are the same in density about 15 minutes the viola player starts to discuss yesterday’s football match and and evenness. Any defects can be seen in the Bio-grams without a filter; with filter loses his place, and the second harpist decides that actually everything sounds there are no defects and heterogeneity.

perfectly all right without her and slips out on the quiet, rushing off to the


hairdresser’s before her evening date. A well-preened set, once it has lost its In the P homeostasis zone Bio-grams without filter may have a different direction, gently slides into a state of chaos. You can see what it leads to in appearance, while in Bio-grams with filter characteristic defects show up.

Fellini’s The Orchestra Rehearsal.


It is the same in the human body. At first glance, everything continues to function, As a rule, they have a cloudy image, are ‘spongy’ in form and are situated in but within the system the source of danger is already increasing. A group of cells, separate sectors. In this connection it may be that there is no link with the when the body’s control is removed, begins to grow and develop, and creates its localization of the tumor or inflammation. This scenario is better illustrated by own blood circulatory function; it constantly increases in size, thereby creating its examples.

own autonomous system within the body system. This process has no symptoms, and for a long time goes unnoticed by its host. When a tumour is detected, the Example P 1 man, 45 years old, stomach cancer.

group of cells has already reached an advanced stage of development. This is second or third stage oncology.

The initial Bio-grams without F (2000-11-21) consist of ‘partial-continuous’

emissions from all fingers. Bio-grams with F in the initial condition have ‘cloudy’, In a ‘luckier’ scenario, serious inflammation develops around the ‘risk zone.’

spongy defects in the lower sectors of fingers 2, 3, 4 and 5. Such signs are typical This might be a cancer, renal insufficiency, colitis or many other things. One of


122 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 123

of oncology patients and are characterized by the presence of specific defects in Bio-grams with F. For several days following the operation, a transformation can be noticed in the Bio-grams. In the Bio-grams of the fingers, an improvement in parameters can be noticed, appreciable both with and without filter, defects in the lower sectors remain, even though they are less pronounced.

The degree of severity of the illness on the ASA scale = 2, operation poorly tolerated, 6 days in intensive care, 17 days in clinic.


Let us remember that the EPI method reflects the body’s level of autonomic regulation. Oncology patients are in the P homeostasis zone when that regulation has been all but destroyed, which shows up on the diagrams in the positive energy zone. Defects may appear both on Bio-grams without filter (wF) and most important, on Bio-grams with filter (F). They may, however, show up not only in the direct inflammation zone, but also in related zones. For this reason it is important to be extremely accurate during analysis of the P homeostasis zone in the organ sectoral analysis.

Example P 2, man, 73 years, stomach cancer.

The Bio-grams without F in the initial condition are quite dense, clearly defined cloudy defects in the low sectors of 5L and 5R. As noted previously, when there is serious autonomic loss and oncology in particular, the low sectors more clearly show defects. A similar scenario can be seen in Bio-grams with F in the initial condition. The clearly cloudy emissions in 5R\2 are linked to the stomach; similar defects in 2R\4,5,6; 2L\3,4,5; 3L\2,3; 4L\3; 5L\3,4. All of these zones are to some extent linked to the gastrointestinal tract. After the operation Bio-grams without F assume the ‘partial-continuous’ character significant to us. This could be interpreted as the appearance of elements of the autonomic regulation in response to operational stress. Paradoxically, in this case, as is often the case


124 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 125

during corrective treatment, when the main cause of illness is removed (in this case a stomach tumor), the body switches on its autonomic regulation system, which can translate into an exacerbation of symptoms. We may see this both on Diagrams and on parameters. It is important to mention, that in this case Energy Diagrams were much lower compared with Health Diagrams. This is one more indication of the severity of this case.

This patient’s case was severe, the degree of severity of the condition on the ASA scale = 4, after the operation 2 days were spent in intensive care and 10 days in clinic. Bio-grams changes show how poorly the body tolerated surgical intervention.


Health Diagram


Energy DIagram


126 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 127


Example P 3, man, 73 years old, cancer of the colon.

The initial Bio-grams without F have the characteristic ‘partial-continuous’

appearance, Bio-grams with F have clearly apparent cloudy defects in sectors 2R\5,6; 2L\3,4,5,6; linked to the bowels. At the same time emissions and defects can be observed in 4R\5; 1L\4; 3L\1; 1L\7; 5L\3. This testifies to the general severity of the condition. Immediately after the operation Bio-grams acquired clearer defects in sectors 2L\3,4,5 and 4L\4. On the day following the operation Bio-grams defects were more clearly apparent, and 2L became energy deficient.


Diagrams demonstrate energy deficiency, with Energy Diagrams being much lower compared with Health diagrams.

The patient died on the following day.


128 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 129

Example P4, woman, 62 years old, cancer of the rectum.

By the initial Bio-grams without F it is impossible to say something about the nature of the deceise, not ot mention cancer. In the rectum zone (2L\3) emission is observed which does not differ in nature from those in other sectors. On Bio-grams with F in lower sectors of all fingers the typical ‘cloudy’ spongy defects can be observed. Good indication is much less size of Energy Diagrams compared with the Health Diagrams.

Immediately after the operation character of BIO-grams practically does not change, but the Enegy decreased, which is a negative indication. As was shown in a big research project, when energy increases immediately after surgery, this is an indication of good reaction to the operational stress. 7 days after surgery Energy Diagram increasing slowly, which was a good sign.

The degree of severity of the illness on the ASA scale =3, the operation was poorly tolerated, 3 days in intensive care and 34 days in clinic.


130 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 131

The operation was badly tolerated, 9 days in intensive care and 18 days in clinic.


Health Diagram


Energy Diagram

Example P 5, man, 24 years old, acute appendicitis.

The initial diagrams (green curve) are energy deficient, which distinguishes this case of a severe inflammation from a cancer case.The initial Energy Diagram was smaller that the Health Diagram, after the opearion parameters decreased, which is a negative indication. Initial BIO-grams without F have a clear defect in the zone of the lower sectors 2R and 2L. The example given clearly indicates that sector 2R\7 corresponds to the appendix, and in this case, this sector is relatively calm, but a defect is clearly apparent in the neighbouring sectors 2R\4, 5, 6. A similar scenario can be observed on BIO-grams with F with a clearly apparent defect in zones 2R, 2L. On the day following the operation these defects continue to appear as without F as well as with F.


132 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 133

Example P 6, man, 73 years old, stomach cancer.

The initial BIO-grams without F have a typical partial-continuous appearance with apparent defects in the lower sectors. The same applies to BIO-grams with F. On the next day after the operation, the defects apparent on BIO-grams without F in sectors 3R, 4R, 2L intensified. The patient did not tolerate the operation well. On BIO-grams with F that day, the quantity of pathological defects decreased, however emissions appeared in other zones. On the 5th day BIO-grams became more even, although there were still defects in the lower sectors. On the fifth day the patient was in intensive care, emissions were still apparent on BIO-grams in sectors 5R\3 and 5L\3, which are linked to the respiratory system. On the eighth day in intensive care (the partial-continuous character of BIO-grams increased, with clear defects in all zones.

The Health Diagrams with out F were bigger than the corresponding Energy Diagrams, with little changes during these days, while on the Health Diagrams with F we can see increase after surgery.

On the following day, the patient died of pneumonia.

From the above analysis it would be imposible to predict this outcome.

All of the studies of cancer cases involved a patient undergoing surgery with stage 3 or 4 cancer, i.e. when the autonomic control regulation was almost completely absent. Cancer patients in remission present a different EPI image.


134 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 135


Health Diagrams


Energy Diagrams


136 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 137

Example P 7, 49 years old, uterine cancer.


Surgery. Chemotherapy, restorative treatment with natural remedies and diet.


Feels well within self (generally weak).

In the initial condition prior to beginning the restorative treatment, Bio-grams without F were weak, with clear defects in the uterine area 4L\4, endocrine sectors 1R\4, 1L\4. On Bio-grams with F defects can be observed in low sectors of practically all fingers. After three weeks of treatment, Bio-grams without F

retained their character. After a further two weeks in the left hand, Bio-grams without F show clear emissions in the lower sectors. These emissions are typical of energy deficiency in the thyroid gland, which is in need of separate attention.

Thus, in this case it may be said that there is good remission after the final treatment. Pay attention to the difference between Health and Enrgy Diagrams.


Health Diagrams


Energy Diagrams


138 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 139

ASC (Altered States of Consciousness) homeostasis zone In this condition there is a crossover to a fundamentally different principle of autonomic regulation.

In the ASC homeostasis zone the nature of Bio-grams changes completely, and they take on a number of characteristic signs, which can initially be split into 3

groups.

‘Double rings,’ which usually appear as a second ring around the Bio-grams, mainly in the lower sectors, although also in the upper sectors in a number of cases. Often the double ring is not fully formed, and is presented as separate Fig. “Blotches” defects.

emissions.

The third group are branch-like emissions, both individual and multiple, situated over the whole circumference of the


Fig. Double rings defects

Fig. “Brances” defects.

The next group are blotches which stand apart, sometimes ‘hanging in clusters’

These characteristic signs can appear on all of the fingers at the same time, as from the finger, sometimes at some considerable distance. Dynamic well as on individual fingers. As a rule, signs of one group can appear measurements have shown that these blotches are very stable and exist instantaneously. On the whole, this can be seen in Bio-grams without F, although throughout the entire measurement, which could be tens of minutes.

also in Bio-grams with F in some cases the diagrams acquire a characteristic starry character, and the images of the field become almost empty. Diagrams in ASC

have typical star-like character.


140 The concept of homeostasis levels in bioelectrography Energy fields electrophotonic analysis in humans and nature 141

Part IV

The Refinements of Electrophotonic

GDV Analysis


How many things by seson seson’d are


To their right praise and true perfection.

Bio-grams for the ASC homeostasis zone in individual fingers are quite common.

William Shakespere

This is an indicator of the active energy processes in corresponding zones, as a The Merchant of Venice V, 1

rule linked to specific pathologies. Moreover, in the majority of cases this is the particular condition of the psyche. These conditions appear most clearly in the Noise level

so-called aaltered states of consciousness – ASC ([Bundzen et al., 2000]). People transit into these states through meditation, momentary training and under the The ‘noise level’ is an important indicator of state. It characterizes the degree of influence of psychedelics and hypnosis. Mapping the brain’s activity with the help clarification of the EPI image when compared against the background.

of modern technology has made it clear that in an ASC, the brain switches over Background radiance is formed on the basis of two main factors: to a special status: the activity in the Į frequency range decreases, the activity in

-

Electronic noise of the CCD matrix

other frequency ranges rises, and this activity is distributed from the frontal lobes

-

Dispersed glow of the investigated item (finger).

of the hemisphere of the cerebrum to the periphery, gradually enveloping the whole cerebrum. EPI measurements show that changes take place not only in Electronic noise is an inherent property to any optical electrical device, and one the brain, but in the whole energy system. This shows in a specific type of BIO-of the ways of combating it is to cool the device. In EPI systems, the signal level grams which we rank at level IV. Therefore, when registering such Bio-grams, it significantly exceeds the noise level, and cooling is not needed. Isolating the is necessary to explore with which ASC processes they may be linked. In many images from the background is done by computer-processing the image with a cases this may be psychic deflection which does not appear in behavior. It could choice of the determined level of noise or level of refinement.

also be linked to drug use, particularly in young people. Branch-like emissions in The second important conclusion from studying the example is that the noise individual sectors are indicators of acute pathological states in the given system, level depends on the activity of the physiological system. It characterizes the level especially if they appear in symmetrical sectors on the L and R hands. In the case of dispersed bio-photon emission from the cutaneous covering. The more active of the EPI-gram of the ASC homeostasis zones, a sectorial diagnosis is not the system, the stronger the level of this background emission. It can be possible.

characteristic both of the activity of physiological systems and the stress level.


142 The refinements of EPI analysis

Energy fields electrophotonic analysis in humans and nature 143

Example, woman 49 years old, leikemia.

Looking at the field image, we can see strong glow, particularly on the right side of the body, linked with the left half of the brain. This picture corresponds to the strong noice of the 2R,3R,5R and 5L Bio-grams. We pay attention to very uneven Diagrams, quite different for Health and Energy Diagram.


This woman died 2 days after the analysis. You would have never told this from her Bio-grams. Maybe, of course, it was last increase of energy before the death, which is often happening with cancer patiens. At the same time this is another indication, that GDV analysis is not a “magic mirrow” and we claim not more than 80% of correlation between GDV/EPI analysis and xlassical diagnostics.


144 The refinements of EPI analysis

Energy fields electrophotonic analysis in humans and nature 145

Stress Examples


High level of stress is clearly understandable form the GDV analysis. It may be measured both from 10 fingers and from 2 fingers. If you see Stress parameter more than 6, sectoral analysis is not aplicabale. You may see interesting information in the Balance program. Ask person to relax for 20 minutes, drink warm tea and repeat the measurement. Address psychological literature for stress management. BioCor device is very efficient in stress relieve treatment. Herewith we give seeval examples of stress.


Stress = 10.0 Energy = 24.66 J


Stress = 7.33 Energy = 24.14 J


Chakras Alignment = 89% Alignment*Size = 17

146 The refinements of EPI analysis

Energy fields electrophotonic analysis in humans and nature 147


Sectorial analysis of EPI-grams


The idea that different fingers and toes carry information about the functional state of organs and the body has been well-known in Oriental medicine since ancient times. In traditional Chinese medicine, all the fundamental energy meridians begin and end with the fingers and toes. Acupuncture points on the fingers and toes can provide information about the working of the body, and can influence its conditions. In traditional Korean medicine one of the most important methods is correction of the body’s state through the fingers. This method, called ‘Su Jok’ became famous in the West thanks to Professor Park Jae Woo. In bioelectrography, the first table showing the links between the glow of sectors of the fingers and the systems and organs of the body was put forward by Peter Mandel in 1986 [Mandel, 1986]. Since then, this principle was further Stress = 6.36 Energy = 37.08 J

developed as the ‘principle of sector analysis.’


In accordance with this principle, tthe fingers and toes reflect information about the physiological state of various organs and systems of the body. The transmission of this information may be well founded from the point of view of two distinct systems: traditional Chinese medicine (TCM) and classic neurophysiology. In accordance with the principles of TCM, the fingers are

‘linked’ with the organs by energy channels or ‘meridians.’

There have been many attempts to make the understanding of meridians well-grounded in terms of Western science, while specific point on the skin, having very low resistance, became well-known. In innumerable experiments it was, however, shown that changes in the physiological state of individual organs leads to a change in the electrical resistance of the corresponding acupuncture points.

In the early 1960s, Korean anatomist Bong Han Kim proposed the existence of a circulatory system that could be the anatomical basis of classical acupuncture points and Meridians. Henceforth the corpuscle-like structures corresponding to acupuncture points were referred to as Bonghan corpuscles (BHC). These initial observations used only relatively simple bioanalytical methods and light microscopy, they were not confirmed by US scientists, and Bong Han Kim, being under high negative pressure, commited suicid. In the beginning of XXI century his results were confirmed by a group of South Korean scientists. They’ve found threadlike structures (NTSs) on the surfaces of the internal organs of rats and Chakras Alignment = 73% Alignment*Size = 29

148 The refinements of EPI analysis Energy fields electrophotonic analysis in humans and nature 149

rabbits The ultrastructure of the NTSs revealed by cryoscanning electron Obstetrics and Gynaecology, to analyze the state of the female reproductive microscopy and high-voltage electron microscopy showed that (1) there were cell-system, the lower sectors of the 4th fingers were used [Gimbut, 2000]. In research like bodies and globular clumps of matter inside the sinus of the channel with at the St Petersburg Military Medical Academy, most of the material showed that thin strands of segregated zones which is a microscopic evidence of the liquid the state of the digestive organs was reflected in the 2nd fingers [Polushin et al., flow, (2) the sinuses have wall structures surrounded with extracellular matrices 2002]. In studies on osteopathy, it was shown that the 2nd fingers reflected of collagenous fibers, and (3) there exists a cribriform structure of sinuses.

information on the status of the spinal cord [Vestnik, 2001]. In work carried out

[Baeckkyoung Sung et.al. 2008; Jungdae Kim et.al. 2008]. This is scientific over many years under the direction of Prof. P.V. Bundzen, the majority of confirmation of the existence of energy meridians.

atheletes tested have shown that the psycho-emotional reaction is most clearly reflected on the Bio-grams of the 4th fingers [Bundzen et al., 1998, 2003, 2005].

From the point of view of neurophysiology, the sensor zones of all organs are That is why these particular fingers are used for dynamic tests when the body is located in one region of the cerebrum, together with the sensor zones of fingers showing reactions to different stimuli. A large quantity of experimental data to and toes. So the brain presents a unified system, and information which excites substantiate the sector analysis was published in the Proceedings of «Science, the nerve unit in a particular area of the brain can influence the nerve units in Information, Spirit” conference carried out between 1998 and 2009.

neighbouring regions of the brain. Theoretically the fingers and toes are not only able to pass sensorial information to the brain, but can also receive it.

It should be noted that sector analysis is systemic in nature. This means However, all of these arguments would have remained speculative if they could that systematic autonomic dysfunction usually reflects well on BIO-grams not be clinically proven.

of the fingers for patients with I and II level Homeostasis.


Nearly all sectors used in sector diagnostic charts of the EPI method of Heterogeneity and defects of BIO-grams characterize mostly the autonomic bioelectrography were substantiated during medical trials. There were imbalance of specific systems:

considerable discrepancies, however, between the EPI bioelectrography x

the gastro-intestinal tract;

sartorial analysis charts and Peter Mandel’s tables.

x


the cardiovascular system;

Work on substantiating sector analysis took over 10 years, with the x

the nervous system;

participation of specialists from Russian and US medical institutions. Hundreds x

the endocrine system;

of patients were studied in many different areas. Some of the data was published x

the urino-genital system;

in articles and reports, and many of the conclusions were formulated in the x

the spinal cord;

context of regular EPI seminars. The substantiating of the sectors was not an end in itself; it was, however, a natural consequence of the clinical research being x

the liver, kidneys and prostate.

performed.


It is hard to list all the work accomplished, so only a few will be mentioned here.

As far as individual organs such as the eyes, ears, teeth, parts of the gastro-The major series of studies in the Department of Bronchial Asthma at the St intestinal tract or parts of the heart are concerned, the nature of the information Petersburg State Medical University, carried out under the direction of R.A.

presented on the fingers is far more complex. In a number of cases, there are Aleksandrova, M.D., Ph.D., showed the link between the lungs, bronchi and clear signs in the corresponding sectors, although it is not always possible to endocrine system to the corresponding sectors on the 4th and 5th fingers distinguish them from the general picture. The analysis requires more experience

[Aleksandrova, 2002]. In work accomplished by the Rostov Institute of and intuition. We would ask you to exercise the greatest accuracy when carrying

150 The refinements of EPI analysis

Energy fields electrophotonic analysis in humans and nature 151

out such an analysis. It is far more reliable to remain at the level of system In particular, we pay attention to liver and kidney areas 3R/4,5 and 3L/2,3; analysis.

respiratory zone 5R/3 and 5L/2,3; colon system 2R/6,7,8 and 2L/1,2,3; spine 2R

and 2L; cardiovascular system 2L/1. Energy Diagram is less than the Health At adaptation levels P and ASC, sectorial analysis does not work. Pathological Diagram, which is understandable is this situation.

signs may appear on any finger, regardless of the organ in question. Clearly, this is linked to the loss of the information link between organs and fingers. All that At the same time Chakras are well balanced – she was attending church all her can be observed in these conditions is that there appears to be a general level of life and now lives just opposite the church so she may have blessing from the systemic abnormalities. These situations were described previously, during the priest every day. I ma sure that her high spirit and positive attitude to people is discussion of homeostasis adaptation levels.

one the main source of her long life.

In all Eastern systems, the information is reflected in the fingers and toes. In Peter Mandel’s photographic system, gas-discharge photographs are taken simultaneously of the fingers and toes, which are then subjected to visual analysis.

The fingers carry information about the body’s main systems and organs, while the toes supplement this information. In EPI only the fingers are used, which makes it possible to obtain the basic information required. The EPI+ setup makes it possible to obtain Bio-grams of the toes, although the law of analysis for this information has not been perfected clinically. This problem may be solved in future research.


Example HS 7. Woman from Greece, 101 years old From the Analysis we see that Energy is low, stress level little above the norm, but balance is very good. This is confirmed by the Energy Filds pictures: they are quite uniform, but very dense, with many disturbances. Increased stress may be explained by the fact that BIO-grams were taken when this woman was visiting her son. All her life she lives in a little Greek village nearby the see. She was very healthy during her long life, but after 80 health issues were coming one after another. As we see from the Balance, Diagrams, Fingers and Report, she has many systems with low energy, which correlates wih her condition.


152 The refinements of EPI analysis

Energy fields electrophotonic analysis in humans and nature 153

Example HS 8, man 57 years old

This person is having many health issues, which is impossible to solve by the conventional medicine methods. Stress level is slightly elevated (4.11), Energy is not high, but in the normal range (46.94), Energy Diagram is bigger, than the Health Diagram. From this we can make a conclusion, that this is not a severe deciese. Chakras are well balanced, so this is not stress, but physical problems.


Helth Diagram


At the Energy Fields, there are many disturbances, reflected on fingers’ BIO-grams.


Energy Diagram


154 The refinements of EPI analysis

Energy fields electrophotonic analysis in humans and nature 155

In the analysis, we use both Diagrams and Organs Energy program, which allows to check details.

In ccardiovascular system strong deterioration indicate to the overall condition of the vascular system. This may be one of the main reasons of the health issues.


In respiratory system, we pay attention to the throat area. We may suspect tharoid gland, which we conform at the Endocrine system.

Health Diagram


Energy Diagram


156 The refinements of EPI analysis

Energy fields electrophotonic analysis in humans and nature 157

In Musculosceletal system, we pay attention to Sacrum.

We need to recommend to this person a set of analysis: Arterial pressure – every 2 months

Biochemical blood analysis – every year

Analysis of feces - every year

Colon test - every 3 years

Hair analysis for microelements – every 3 years Electrocardiogram – every year

Fluorography – every year

PSA test – every year

Dentist – at least once a year


Mild physical activity with pulse control on the level 100-120 beats/min (walking at least an hour per day, bicycle, games with children).


Regular check of arterial blood pressure, level of cholesterol.

Digestive system need attention and treatment, same as urino-genital Regular Detoxification of liver and body.

system.

Regular meditation.

As a result, for this person we have to conclude that his situation is related Exercises like Qi-gong, Tay-chi.

to the overall mis-regulation of the energy system complicated by the Spine massage with essential oils, osteopathy.

deficiency in spine and blood circulation. Complex treatment with Exercises for eyes - "Palming", eyes movement, deep blinking, massage around methods of integrative medicine would be the most efficient.

eyelids.

It is interesting, that at the moment of the GDV analysis this person had Balanced diet

Eating Well - Healthy Foods Instead of a Diet.

all his biorhythms in the lower position. In this situation all the problems Eating a healthy diet is another part of the healthy lifestyle. Not only can a clean are presented at the most.

diet help with weight management, it can also improve your health and quality of life, as you get older. You can use these tips for simple ways to change how you eat:

Sneak in more veggies. Have salads every day. Add veggies wherever you can --

a tomato, peppers Switch off salad dressing. Use only non-refined veggie oils of different kind. You may find a big variety of them in any healthy store. Add lemon juice.

Eat more fruit. If you do not have a special diet, you may eat up to four different fruits a day. Eat low-fat or fat-free dairy.

Make some substitutes. Look through your cabinets or fridge and pick foods you eat every day, the next time you're at the store, find lower-calorie substitutes for just those items.

Write down the nutritional content of your everyday food.

Most of your grain and cereal products should be made from whole grains, not from refined flours. This part of your list includes whole grain breads, whole grain pastas, and whole grain breakfast cereals. Whole grains are important for vitamins, minerals, and for fiber, which is often lacking in modern diets. Read

158 The refinements of EPI analysis Energy fields electrophotonic analysis in humans and nature 159

labels to look for 100% whole-grain or 100% whole-wheat to be sure you are Basic rules of EPI analysis

getting whole grain products.

Your protein and meat choices should consist mostly of fish, poultry and lean In order to correctly analyse the physiological state, i.e. the level of energy of the meats. Eggs, nuts, seeds and legumes are also good protein choices. Choose organs and the systems (or in other words, the level of autonomic regulation, in fresh and frozen unbreaded meats and fish. Avoid breaded, deep-fried accordance with the adaptation levels) it is necessary to take the following steps: convenience foods. They are high in fats and sodium.

Control salt and sweets.

Different EPI programs reflect different aspects of a person’s energy status. Bio-Preparation of food in a healthy way - Zepter cooking stuff and the like.

grams must be processed in all programs and it is advisable to print out the Avoid deep fried, breaded foods.

following:

Mediterranean type of eating, macrobiotic type and the like are beneficial for health.

x

Bio-grams of all fingers without filter;

Special Wait Loss Diets may be specially selected.

x

Bio-grams of all fingers with filter;

Please, avoid preserves, canned food, fast-food, sweet drinks. Read labels and x

chose foods wisely. Avoid frozen pizzas, pocket-sandwiches, deep-fried Health and Energy diagrams;

appetizers, battered, breaded and deep fried foods. Processed lunch meats, hot x

Energy Field projections.

dogs, bacon, and sausages, white bread and refined pasta have a lot of saturated fat and nitrates in them you don't want in your body. Sugar is a main danger!

When classifying EPI data by adaptation level, we look at the following factors: Special attention to water - Water is Life - Good Water is Good Life. Natural x

Specific features on Bio-grams without F and with F; spring no gas water is recommended. Install filters in your home, water x

Distribution of EPI diagrams.

structurisation is optimal. Add gem stones, silicon, shungit, etc to silver jar and let water stay for an hour.

The H

H homeostasis zone is characterized as follows: Glass of water in the morning and before every meal.

x

BIO-grams without F have a small number of defects; Tea and coffee is a food!

Dietary supplements are vitamins, minerals, herbs and other substances meant x

BIO-grams with F have no defects;

to improve your diet. Choose a list after consulting with nutritionist.

x

Both Diagrams lie in the optimal zone;


x

The level of activation 0 < S ” 4;


x

Diagram variance < 0.5.

The H

HS homeostasis zone is characterized as follows: x

BIO-grams without F have defects;

x

BIO-grams with F do not have substantial defects, but are more heterogeneous than in H zone.

x

Diagram without filter lie totally or partially in the energy deficit zone; x

Diagram with filter may have energy deficit zones; x

R-L imbalance;

x

Level of activation 2.5 ” Ⱥ ” 10;

x

Diagram variance > 0.5;

160 The refinements of EPI analysis

Energy fields electrophotonic analysis in humans and nature 161

In H and HS homeostasis zones, we apply sector analysis.

The P

P homeostasis zone is characterized as follows: x

BIO-grams without F have a specific ‘partial-continuous’ appearance or are distinguished by a large number of defects on all fingers; x

BIO-grams with F have a specific ‘cloudy’ structure in a number of sectors.

The more sectors there are with this structure, the worse the condition.

x

BIO-grams with F have a large number of defects and homogeneity.

x

Diagrams lie in the upper limit of the optimal zone or beyond it.

x

The level of activation does not provide useful information.

The A

ASC homeostasis zone is characterized as follows: x

BIO-grams without F have specific defects in the form of individual blotches, branches or double rings.

x

BIO-grams with F can have the same appearance as is characteristic of H

and P homeostasis zones, while also being distinguished by a large quantity of ‘blanks-holes’.

x

Diagrams without F have the typical ‘starry’ appearance.

The sectorial diagnosis in P and ASC homeostasis zones can be applied with greater accuracy.

A high level of ‘background’ noise is typical of increased physiological activity in the body’s systems, linked to the high level of activation.


During analysis, the age and gender of the patient should be taken into account; these factors are included in the evaluations by EPI programs.

In all of the EPI programs, you may get detailed background information on the image. You need to click with the right mouse button at the back of the image, choose “View”, and you will see the separate information screen. Together with information on the parameters of the image you may check the time of capturing and appropriate calibration information.


Fig. Informational screen.

162 The refinements of EPI analysis

Energy fields electrophotonic analysis in humans and nature 163

With appropriate calibration, diagrams can give very important information. We patient. To a large extent, the accuracy of the analysis depends on the depth of pay attention not only to the energy of particular systems and organs, but also to understanding of systemic principles of how the body works, and whether it is the differences between right and left diagrams may be an indication of perceived as a unified, holistic, indivisible system. In order to work out such an troublesome information.

approach, some knowledge of the principles of Traditional Chinese Medicine (TCM) is very helpful. They are based on the idea of the circulation of energy, and these ideas are fully reflected in the practice of GDV/EPI bioelectrography.

We gauge the movement of energy through systems and organs, and in many examples we can see the direct reflection of the principles of TCM.

In addition, knowledge of these principles facilitates the development of clinical intuition, and, by placing reasonable trust in one’s own ‘inner voice,’ it is possible to make an accurate and in many cases unexpected analysis based on EPI data.

Many doctors who have used EPI over many years have indicated similar experiences.


Trust the information provided by the EPI data without concerning yourself with the outward appearance of the patient. In the case of systemic Fig. Difference between right and left diagram.

illnesses, appearance is deceptive. EPI pictures give authentic information Another troublesome sign – when all diagrams are in the hyper-energy zone.

on the person’s energy state.


A totally intuitive path of analysis was developed by M. Shaduri based on the intuitive identification of images of organs in EPI images. This path is based on intuitive guesswork, and EPI images play the same role as Tarot cards - by giving information to those with a gift – but they are not an objective means of analysis.


Fig. Troubleshooting diagram.


Following the specified practice, the EPI method makes it possible to carry out a reasonably accurate analysis of the physical and psychological state of the

164 The refinements of EPI analysis Energy fields electrophotonic analysis in humans and nature 165

Monitoring of the patient’s condition during treatment 4)

Selection of medication (for example, homeopathy).


5)

Patient holds medication in unopened packaging in left hand, BIO-grams EPI bioelectrography is a unique method for monitoring the condition of taken 10 times.

the patient during any kind of influence. The capture is non-invasive, does 6)

Patient holds medication in right hand, BIO-grams taken 10 times.

not affect the condition, and can be done without restrictions.

7)

Images before and after test are compared.


8)

The patient takes sealed bottles of clean water and holds them for 5

There are two basic monitoring methods:

minutes.


Periodic captures of all 10 fingers;

9)

Measurements (3) – (6) should be repeated with another medication if necessary.


Periodic captures of two fingers (4L, 4R) during a set period of time.


An effectiveness criterion is the disappearance of pathological indicators.


Fingers 4L and 4R reflect the condition of the endocrine system, and as shown Dynamic EPI capture

by the factorial analysis method (Bundzen et al., 2003, 2005), are most sensitive for detecting the influence of subtle interventions.

The recording of Bio-grams from the hands or other objects over a set period of After the intervention (e.g. taking of medicines, therapy, massage, Reiki, etc.), it time, without changing the position of the object on the electrode, is called is necessary to wait for another 15-30 minutes for the effect of the influence to dynamic EPI capture (DC EPI). During this process, AVI files are recorded at a register. Immediately after therapy, there is a reaction by the autonomic and frame rate of 30 frames per second. The duration of capture can range from 10

central nervous system, and time is needed for the condition to stabilise.

seconds to several minutes.

Basic changes can be observed in BIO-grams, and the most demonstrable means DC EPI is applied in a set order when examining liquids, plants and materials.

is the structure of the diagrams. It is equally important to monitor changes in the In the next section you will find the protocol and results of a number of Energy Field, as much for reactions of individual systems and organs.


examinations of materials using the EPI method.

When the correct treatment has been selected, the Energy Field pictures before DC EPI of the fingers is applied when special experiments are being carried out.

and after the treatment help the patient to validate that the treatment is effective, For this mode, it is preferable to use the GDV Pro or GDV Express instrument.

which in its turn increases the treatment’s degree of success.

DC EPI is a sensitive method for the detection of energy resources in the system.


Capturing BIO-grams of one or two fingers is a sensitive method for registration Analysis of psychological condition

of subconscious reactions to an influence. It can be used for the selection of medications, according to the following protocol: Numerous experiments on large groups of atheletes [Bundzen et al., 2003, 2005]

1)

Capturing BIO-grams of 10 fingers.

and the population of various countries [Kondratiev, 2003; Measuring Energy 2)

Determination of risk zone (for example, thyroid gland – 1L, 1R).

Fields, 2004], have shown that EPI parameters have good statistical correlation with the results of psychological tests. This then led to the conclusion that EPI 3)

Taking BIO-grams of 1R, 1L fingers 10 times. (Choice of finger depends parameters can be used to determine the psychological characteristics of a on the identified risk zone).

person.

166 The refinements of EPI analysis Energy fields electrophotonic analysis in humans and nature 167

The parameter of activation or stress is one of the most important methods for The next level of psychological assessment is linked to the analysis of the activity analysing the psycho-physiological state of a person. It makes it possible to of individual fingers. With great caution it is possible to link these with various identify the state of tension and observe correcting this state during treatment.

areas of a person’s psychological activity.


Stress is one of the negative factors in our civilization, and continual stress, The thumb: the head; characteristic of intellectual activity.

distress, worry, irritability and anger inevitably lead to the development of The index finger: ability to express oneself and influence others.

pathological states.

Middle finger: secretiveness, perseverance, self-confidence.

The activation-stress coefficient is calculated in the EPI Diagram program on the Fourth finger: emotionality, sensitivity, libido.

basis of the comparison of all 10 BIO-grams parameters with statistical Little finger: warmth of feeling, relations with other, sensitivity.

parameters of apparently healthy person. As we have seen from the analysis above, this parameter works well for H and HS homeostasis zones, and in a These correlations are very approximate and are only intended to give an number of cases for ASC zones, but is of no use for the P homeostasis zone.

indication.

This variation in use for ASC zones is connected to the fact that the activation Each level of homeostasis is linked with a certain psychological state. This is parameter reflects the level of regulation from the ANS, but in the ASC

determined by the influence of the level of energy on a person’s behaviour, which homeostasis zone, this regulation is lacking.

can facilitate the manifestation or suppression of one or another psychological Visual analysis of the field images and diagrams also makes it possible to carry quality.

out a number of psychological assessments. They are based on the H homeostasis zone – powerful, strong, consistent character, receptive to the characterization of states depending on the type of energy and the activation level, affects of others through own ideas.

and are fairly approximate. A number of characteristic indicators should be taken into consideration here.

HS homeostasis zone – person given to panic, doubts and anxiety, whose degree of influence is determined by the level of activity. It should be noted that the The activation coefficient of the right diagram and right side of the body

‘holes’ in the field picture characterise the openness of the psyche to external on the field picture is linked to the left hemisphere of the cerebral cortex.

influences and the influence of others.

The activation coefficient of the left diagram and left side of the body on P homeostasis zone – reticence, closed off when unsure inside or during fight.

the field picture is linked to the right hemisphere of the cerebral cortex.

Complicated psychological points in life.


ASC homeostasis zone – altered states of consciousness, special psychological The left brain governs logic, speech, behaviour control, business and optimism.

states including psychological denial. Influence of others, split personality, high The right brain governs emotions, feelings, subconscious perception of activities, level of emotional stress.

intuition, artistry and pessimism.


Accordingly, if there is a clear bias of R and L activity, one can boldly put the These indicators, when taken as a whole, enable us to carry out a psychological person down as having this or that set of psychological characteristics. A lot has analysis which reflects well the person’s inner world. The main advantage of this already been written describing the influence of the R and L side of the brain on approach is that psychological assessments are made on the basis of data from a person’s behaviour, and it is worth your while familiarizing yourself with this objective measurements, irrespective of the person’s desire to present him or before carrying out the analysis.

herself in a particular light.

168 The refinements of EPI analysis Energy fields electrophotonic analysis in humans and nature 169


When using parameters JS and RMS, the following points should be taken into The developed software tools and expert methods for assessing account:

psychological states make the EPI method a unique instrument for

–

The Diagram analysis carries information on the state of health only for psychological and psychiatric practice.

the H and the HS homeostasis levels.


–

It is necessary to ensure that calibration has been performed correctly.

Using EPI parameters when analysing data

Incorrect calibration completely distorts the parameters of the EPI diagram.

In various GDV programs more than 20 independent parameters are calculated.

At the same time, if you use the EPI device in the same place, with stable room The principles of their computation have been thoroughly studied and described conditions, calibration parameters hardly change at all, and it is not necessary to in articles, books and dissertations, as well as in the program descriptions. For recalculate them for every capture.

the present discussion I wish to focus on the possibilities of using EPI parameters, both for the practical work of doctors and in research activity.

An important parameter is the image surface area. Obviously it is used when comparing data from one and the same person from different points in time.

In the everyday work of a doctor, EPI parameters can be used for two purposes: This possibility has been realised in the latest version of the program EPI EF.


Express analysis of the overall condition of the patient, as well as individual Comparison of the areas of Bio-grams from different people requires great organs and systems;

accuracy, as the area depends on the size of the finger. Moreover, this parameter Monitoring of parameters during treatment.

can also be used with great accuracy in practical work. For example, in the work of Venezuelan colleagues [Olalde et al., 2005] it was accepted that a surface area Parametric analysis of the condition is done by comparing parameters of the of less than 21 000 pixels is an indicator of degenerative inflammations. This given patient with a corridor of norms (range of norms). This corridor depends criterion was used successfully when analysing treatment data.

on age and, in some cases, sex. Numerous studies have shown that the most constant EPI parameter is the JS coefficient from the EPI Diagram program. In The noise coefficient typifies the level of energy activity of the physiological accordance with calculation principles, it does not depend on the size or position systems. It is calculated during image processing and characterizes the quantity of the finger, and compares well when various types of capture and various of background pixels removed during noise removal. We have already looked at devices are used. As we have already seen from the examples cited above, the JS

the significance of ‘noise’ parameters for condition assessment above.

parameters of EPI diagrams reflect well the body’s reaction to influence, treatment and surgery, while remaining stable. The range of norms for this NB:

parameter was determined on the basis of statistical analysis of a large quantity of All EPI parameters depend on the selected level of ‘noise’ processing and data of apparently healthy people in various countries.

on the settings of the camera during capture process. Make sure that these settings are correct and constant.

These ranges are presented by way of a middle zone in the curves of diagrams.


In this particular program, another important parameter is calculated: the Entropy is a measure of diversification. High entropy signals chaos and low diagram variation coefficient RMS. It is shown in brackets displayed near to the entropy signals death. Like many of the body’s parameters, entropy values must JS value. For a normal state, this RMS coefficient < 0.35. When RMS > 0.5, we be within the range of norms. At the current time the limits of this range are being are dealing with a highly variable condition which typifies the instability of determined on the basis of a new, enlarged database. In all processes, be they autonomic regulation.

physical, chemical or biological, entropy increases. Living organisms reduce

170 The refinements of EPI analysis Energy fields electrophotonic analysis in humans and nature 171

their own entropy by using energy from the environment. It is said that living Energy fields, meridians and chakras

organisms produce negative entropy or ‘neg-entropy.’


The principles discussed about physiological regulation are based on concepts of In EPI programs, the absolute information entropy of images is calculated.

Western science and Western medicine. The disenchanted reader might Of greater practical significance is the specific information entropy relating interject, “But where is all the charm of fields, energies, meridians and energy to the unit of the image surface area. When therapy is performed correctly, channels? For all those years we studied the Kirlian effect and EPI so as to be EPI entropy reduces.

able to measure these mysterious yet appealing parameters. Has all that really been forgotten and lost?”

The intensity of glow characterizes the clarity of radiance of the whole image or Of course not. We do not intend to turn away from the axioms and catchwords of individual parts. This parameter is measured by the computer in relative units advanced in previous years. We have more grounds than ever for continuing to from 0 (totally black) to 225 (totally white). Comparing data from a single person, affirm that we really are objectively measuring the energetic activity of fields, or group participants taken in different moments in time, according to the clarity meridians and energy canals. At the same time we are also measuring the activity of BIO-grams, is a convenient and visually effective method.

of the autonomous nervous system. How do these two things fit together?

The remaining EPI parameters are mainly used when doing a statistical data For thousands of years, health and longevity have been the subject of extensive analysis. In the GDV programs, a large number of parameter sets are computed, research in all of the world’s civilizations. Doctors, practitioners and astrologers and these parameters are used for factor and correlation analysis, whose tried to penetrate the mysteries of life and death. They developed concepts trying principles of application require special training.

to explain illness and ageing, temperament and character. The majority of these have been lost in the sands of time, and only faint echoes have reached us through scraps of manuscripts. But the manuscripts which did reach us are based on principles which differ from the Western materialistic outlook. These are the principles of the Earth, the energy of trees, grass and people. During the expedition to the land of the Sierra Nevada Indians in Columbia, we spoke to them in the language of energy, and they accepted us, opened their soul and sanctuary to us. So when we speak about energy fields, about meridians and chakras, we are using a language created by other civilizations – a language which, on an intuitive level, hands down ideas which have been proved by the practice of thousands of years.


The EPI method bridges the gap between logical Western science and the intuitive science of the Orient. It makes it possible to present the same phenomenon in different languages, in different systems, and to look at the same phenomenon from different points of view.

If you are familiar with the principles of Traditional Chinese Medicine, if you accept the ideas of meridians, energy channels and energy fields, then the EPI

172 The refinements of EPI analysis

Energy fields electrophotonic analysis in humans and nature 173

method is for you – particularly since the concept of electropuncture is already well integrated into modern Western medicine. The theory of biological fields Part V

recently had its sixtieth birthday [Gurvich, 1944]. If you feel close to the ideas of Ayurvedic medicine, you can successfully use the EPI Chakra program which Environment Scan and Remote Detecting

carries additional information in comparison to the other programs. And in any language it is possible to speak of energy measurements and of the energy of Human Emotions

potential of organs and systems. The concepts set out above provide these ideas with modern Western analogies and connect them to the current scientific paradigm. We hope that the data obtained through the EPI method broadens Environment scan is designed to record time dynamic of different processes that paradigm, giving it new content and a new language.


using Bio-Well with connected supplements:

Sputnik sensor;

Water electrode;

Bio-Well instrument with “Sputnik” antenna allows you to monitor time dynamics of the Energy of the Environment. This may be interesting for several aims:

Testing different places looking for places with calm and turbulent energy.

Testing Energy situation in different places depending on the position of sun, moon, time of the year, etc.

Measuring energy in the Places of Power – both natural and man-made –

temples, sacred places, ancient cities, etc.

Testing Geoactive Zones, in particular, Geopathic Stress Zones.

Detecting the influence of emotions and focused attention to the environment.

The procedure should be as follows.

Insert Ti cylinder holder into Bio-Well window, position Bio-Well on a special stand and connect wire to the grounding jack.

Test the image in the Full Scan mode. It should look like a ring. In case of distorted images pull and position the red jack at the Ti cylinder holder.

Connect Sputnik to the Ti cylinder holder.


174 New approach to remote detecting of human emotions Energy fields electrophotonic analysis in humans and nature 175


Press “Start” button. It takes 3 minutes until the line of the graph stabilizes at some level.

It is well known that people fell differently depending on environmental situation.

In some places you sleep as a baby and wake up full of energy; in other places you have wonderful dreams and travel in beautiful places while you sleep.

However, already since thousands of years, the existence of specific locations where people do not sleep well, get sick more easily, or where performance is lower has been empirically known. What is the difference between all these places? Very little is known in Western science. It is clear that combinations of In the Geoactive zone variations of the energy may be very high. Graph below different causes compose the phenomenon. This is a combination of the demonstrate the energy variation outside and inside the crop circle in England in influence from the Earth – underground anomalies, hollows, water streams; gases summer 2006. As you see, outside the crop circle energy was quite stable, while in the atmosphere, both natural and industrial; electromagnetic background; and inside it was increasing during all the time of measurement.

the influence from the Universe, Sun, Moon and Cosmic rays. Now it is practically impossible to distinguish between all these factors, so we need a common denominator to evaluate the overall situation in the particular place.

Only rudimental evidence is available today, if such zones could be measured using accepted physical apparatus.

Bio-Well instrument gives you such an opportunity. Many years of research confirmed the idea that it allows to evaluate the Energy situation in the environment. Expeditions to different parts of the world: Peru, Colombia, India, Myanmar, Siberia, and many others demonstrated sensitivity of the instrument for evaluating environment. Scientific background has been developed and published in per-review journals, patents have been granted in several countries, and now this instrument has become available for public use.

Same way you may detect the change of energy during sunrise and sunset (see You need to take measurement for at least 30 min; the maximum time is not graph below), or coming sunder storm. In parallel, you can measure limited. In a calm, peaceful environment, after initial setting for about 5-15

transformation of the Human Energy Field – of yourself and other people. This minutes signal becomes quite stable (see the graph below).

way you will see you own reaction to the changes in environment.


176 New approach to remote detecting of human emotions Energy fields electrophotonic analysis in humans and nature 177

Every 5 seconds Bio-Well software measures time-line of several parameters and their Standard Deviation from the Sensor. To evaluate these changes you need to process data. After recording is finished press “Stop” and then “Statistics”

button and put benchmarks for the significant moments of the session (beginning of presentation, breaks, beginning and end of meditation, etc). Program calculates parameters for every marked interval and evaluates statistical difference between intervals. Data are presented as different parameters.


Another example demonstrates the influence of concentrated human attention to the signal of the “Sputnik” sensor. At the graph below arrow denotes the moment when a person concentrated her intention on the sensor sending love.

As you see, this reflected in significant increase of the graph. This experiment was repeated many times and in most cases in case of real concentration, effect was significant.

An example of time dynamics of sensor parameters.


Statistical processing of data collected during 3 h 30 min. Intervals: 1 –

Measurements conducted during religious ceremonies, yoga meditations, public beginning; 2 – Joe Dispensa starts presentation; 3 – Joe presents; 4 - break; 5.6 –

lectures, musical performances demonstrated that the signal of the Sensor meditation. Results of statistical processing are presented under the graph. Two statistically significantly changes during measurements and these changes are intervals are different if p < 0.05. Numbers in brackets indicate the number of correlated with the course of event.

experimental points in the particular interval (readings are taken every 5


seconds).


178 New approach to remote detecting of human emotions Energy fields electrophotonic analysis in humans and nature 179

Testing Water with Bio-Well

Non-local consciousness influence to physical sensors Insert standard Pt water electrode into water or other liquid and connect it to the Introduction

Ti cylinder.

The problem of Non-Local Consciousness Influence (NLCI) to the physical Take dynamic readings of water as described above. Analyze time dynamic world has been widely discussed in popular and scientific literature. A lot of process of water and see its intercommunication with environment.

anecdotic cases have been reported, from which the most interesting were the cases of influence to electronic and computer systems [Radin D., 1997]. A When water dynamics becomes stable, you may check the influence to water number of experiments have been conducted in controlled experimental from different devices and human intention. See example below.

conditions [Schwartz G., Simon W. 2007]. By the end of the XX century conceptual basis for NLCI was being created by the new scientific branch related to Quantum Entanglement, Quantum Teleportation and Non-Local Realism

[Radin D., 2006].

Experimental Results

Several experimental modalities have been developed with GDV instruments: 1) Directed NLCI of a person; 2) Directed NLCI of a group of people; 3) Non-Directed NLCI of a group of people.

In the first mode, we experimented with several people from Russia, Germany and USA involved in professional healing. After several trials, observing the real-time reactions of the instrument in the biofeedback mode, they tried to send Example of water dynamics with the influence from imprinted device (marked NLCI from the distance. All the experiments were conducted in twin-blind by arrows).

regime recording signal for three hours, during which time healer, at the time of his choice, was trying to influence the sensor for 10 minutes. In some experiments, a second similar sensor was used as a control. 16 controlled studies have been conducted from Berlin, Tokyo and Moscow to Saint Petersburg. In 12 cases, statistically significant results of NLCI were recorded. Let us present some examples.

In agreed days, five plastic 1-liter bottles of tap water were placed at 10 a.m. at the table in the experimental room of Saint-Petersburg University. Every bottle was labeled with color strip. Bottles were left intact till 4-5 p.m. when GDV

measurements of water samples from every bottle were undertaken.


German healer Christos Drossinakis performed mental influence within four days (from eight agreed days) at 12 a.m. for 10 min to two bottles from Japan and Statistical processing of the above graphs.

Germany. Researchers performing measurements were unaware neither of the


180 New approach to remote detecting of human emotions Energy fields electrophotonic analysis in humans and nature 181

influence performed no of the target bottle. In two days significant changes in GDV parameters of water drops between samples from different bottles were found. It was days of Drossinakis’ influence from Japan. In other six days no significant reproducible difference between samples was found.

Fig. 1 demonstrates dynamical curves measured on April 09, 2002. As we see from the graphs, behavior of curves from the bottles NN 1 and 2 are clearly different from three other samples: curve N 1 exponentially increases in time, and curve N 2 has much higher level of variation compared with other samples.


Fig.2. Time Dynamics of the area of EPI glow for 3 water samples before (A) and in the process of distance influence (B).


Fig.1. Time Dynamics of the area of EPI glow for water drops from 5 different bottles measured on the April 09 and April 10, 2002. Every curve is averaged on 5 subsequent measurements. Vertical bars at the upper curve demonstrate Fig.3. Time line of Area for water under the influence of V.Sochevanov. A-B

the typical level of variation.

the moment of influence.

Influence of healer Alexey Nikitin from the distance 2-5 meters resulted in Directed NLCI of a group of experienced meditators was tested during several transformation of relatively stable water dynamics into chaotic oscillations (fig.2), workshops in Europe and USA. People were asked to meditate and send their very similar effect was found under the influence of Valerii Sochevanov (fig.3).

positive emotions to the sensor being positioned in the same room. In all cases statistically significant changes of signal were recorded (see example at fig.4).


182 New approach to remote detecting of human emotions Energy fields electrophotonic analysis in humans and nature 183


Fig.5. Time Dynamics of the area of the sensor signal before, in the process and after the distance influence 2010-12-06.

Table 1. Results of statistical analysis of collective NKCI. P value of the t-test.

Form

Radius of

t-test

Area

Intensity

coeff

isoline


Fig.4. “Sputnik” sensor recordings 2011-05-07. At the graphs: “beginning” the before/intention

0.0000

0.2917

0.0002

0.0000

moment of beginning of collective meditation; “Love” – sending love to the world. Upper graph – Area, lower graph – Intensity of a signal.

before/after

0.0000

0.1805

0.0000

0.0000

A series of 5 experiments with remote intention influence was conducted 10"before/after

0.0000

0.0152

0.0211

0.0001

together with Lynne McTaggart in 2007-2010. Lynne organized big groups of 10"before/intention 0.0001

0.0296

0.1228

0.0008

people by Internet (http://theintentionexperiment.com). People were able to see the photo of the experimental setup and start their meditation at the agreed time intention/after 0.4244

0.8458 0.5498

0.6222

(marked by arrow at the graph). People were not given any special instructions on the way of meditation. Data were recorded in automatic mode, about 1 hour Analysis of data demonstrated, that in all cases of collective distance directed before the intention time and 1 hour after. Control experimental setup was set in NLCI of big groups of people from all over the world statistically significant adjusted room. First experiment in 2007 allowed to check and correct all the response of water and sensor was recorded. In many cases sensor responded 10-procedure of the experiment, and in 2008-2010 recorded responses both of 15 minutes before the agreed time, which may be explained by human thoughts water installation and sendor were statistically significant. Fig. 5 presents an of the upcoming event. Control samples demonstrated some variation of example of experimental data and in Table 1 an example of the results of parameters but not significant in most cases.

statistical analysis of the data (samples are considered statistically significantly different if p < 0.05).

A big series of experiments with Electrophotonic Sensor was conducted during workshops and conferences of the Reconnection Healing (www.thereconnectionhealing.com) in 2008-2011: 6 during conferences and 13

during workshops. Sensor was set in the conference room and operated for several hours. At all sessions Sensor responded to significant events in the room, in most cases during presentations of Dr. Erick Pearl, at the same time behavior of the graphs was different in different sessions.


184 New approach to remote detecting of human emotions Energy fields electrophotonic analysis in humans and nature 185

From the experiments it was clear that recorded variations of a Sensor was related x In 11 cases from 19 Intensity increased during session, while other both to the activity of the presenter and to the reaction of the audience. From all parameters demonstrated different behaviour.

the data the conclusion was made that during sessions of Reconnection Healing x Recording lasted from 1h40 to 10h30. The level of variations did not structurization of a space in the auditorium took place. The physical background depend on the length of a session.

of this effect needs attention and further investigation. Example of experimental x During the conferences, only some presenters stimulated the reaction of data are presented on fig. 6.

the sensor.

Control recordings in the laboratory without presence of people demonstrated variations of Area and Intensity at the level 3-7% without any specific moments.

Measurements taken with two independed sensors in parallel demonstrated very high consistency in recording significant events during workshop.

At the Reconnective Healing Workshop in Los Angeles in September 2008

consistent effects were recorded by the teams led by Dr. W. Tiller and Dr. G.

Schwartz with the equipment operated at absolutely different principles. These results are discussed in the book “Science Confirms Reconnective Healing”

(Korotkov K editor), available from www.Amazon.com.


Fig.6. Time variations of Area recorded by “Sputnik” sensor during Very special application of the Electrophotonic Sensor was found measuring Reconnection Healing Workshop 26 September 2009.

influence of music to space, listeners and performers. Here we give an example.

11-14-2009 in Brugge, Belgium a very special concert was organized by a famous Time sequence of activity :

singer Ingeborg Sergeant. During presentation singers from different nations 1 0926 – 1215

Introduction session

presented their songs. Dr Masaro Emoto took part in the performance as well.

As we see from the fig. 7 at the moments of singing parameters of sensor signal 2 1216 – 1335

Dr Eric Pearl arrives, jokes & opens Q & A to floor while were significally different from the parameters in intermissions. We may even affirming permanence of RC process.

say that performance of spiritual singers change the entropy of space.


1336 - 1447 Lunch while healng sessions are in process.

3 1448 – 1651

Session is in process.


1650 - 1715

Recess

4 1716 – 1903

Eric continues to instruct & guide to focus on observable prompts. Session concludes 1757

We may define the following moments of sensor’ reactions: x Area graphs had both ascending and descending response.

x Area variations were from 11% to 100% in different sessions.


186 New approach to remote detecting of human emotions Energy fields electrophotonic analysis in humans and nature 187

“associated with the buildup of a negative magnetic charge manifesting in the environment”. Some quantum effects may be involved as well.

We may construct several models explaining observed effects – from chemical and physical ones to quantum electrodynamics and esoteric. From our point of view, this is not important at the moment. First of all, we need to collect a big database of observations in different situations by several research groups. At any rate, without being concerned on physical explanations, it is clear that the effects of Non-Local Consciousness Influence to physical sensors are measurable and reproducible. This allows devising a line of experimental exploration of these effects. It may have a strong implication to our understanding of physical reality and the role of consciousness in the world. Measurements may be done in a theater, concert hall, church, lecture auditorium. It is interesting to take Fig.7. Time dynamics of Intensity during performance. Solid line – line filtration measurements during sport event. However, for one single group it is difficult approximation. Marked moments: 1 - Beginning of Ingeborg and Emoto having many different experiments, we need collective efforts of researches from presentation; 2 - Song; 3 - Song; 4 - Song “Shabat - Shalom” ; 5 - Song “Besmilla”; different countries. The advantage of this approach is that any researcher 6 - Song “God is Great”; 7 - Song “OM – Shri”; 8 - Lyric song ; 9 - Child song; operating with the Bio-Wel Camera may take part in research.

10 - Song “Gati-Gati-Paragati”; 11 - Song “Kumbaja My Lord”; 12 - Emoto singing.

We should take into consideration the following ideas of prof. Tiller [2009]: Discussion

“The periods of audience-focused attention upon the on-stage speaker signals that group entrainment leading to significant growth of group coherence is Instrumental approach developed for recording NLCI have been proven during occurring. This leads to high information production rate events, 5 years in a series of experiments conducted by research groups in Russia, Germany, Ukraine and Chili. Collected data give us clear evidence that human Macroscopic spatial information entanglement due to simultaneous use of consciousness may influence parameters of physical systems, both intentionally multiple measuring instruments appear to be generating reduced contrast in the and non-intentionally.

magnitudes of various event signatures. This probably occurs via the addition of out-of-phase vector components (a type of data randomization) From the conventional point of view, we may state that bias current in the electrical chain depends on the capacitance of space between antenna and As a closing remark, if all the subsystems of the experiment are included in the environmental grounded and electroconductive subjects. Emotions are related to analysis, it certainly strengthens the statement regarding “only trends” from our the activity of the parasympathetic division of the autonomic nervous system, experimental measurements can be expected to be meaningful at this time.

which changes blood microcirculation, perspiration, sweating, and other Further, with Dr. Korotkov’s team making experimental measurements in the functions of the body, resulting in the changes of the overall conductivity of the same room as us, one should expect information entanglement to occur between body and the conductivity of acupuncture points in particular. So the presence their measurement system and ours”!

in the vicinity of the instrument of the emotional people may change the To prove or disapprove these ideas we need to have a series of further conductivity of space and, hence, the signal of the sensor. This may be related to experiments with different modalities of healing.

the formation of areas of decreased entropy in space, or, as prof. Tiller claims


188 New approach to remote detecting of human emotions Energy fields electrophotonic analysis in humans and nature 189

At any rate, without being concerned on physical explanations, it is clear that the effects of human emotions are strong and measurable. We may definitely tell Part VI

about conditioning of environmental space in the workshop room. In the further stages of experiments we need to study the following topics: Different Research Lines

x Correlation between several similar instruments installed in the same


room of the workshop and in different rooms. It will help us to answer the question of space conditioning and the area of the influence.

Electrophotonic Analysis of Arterial Hypertension x Comparison with effects of a group of people at the music concert, political gathering.


x Effect of age and gender of participants.

Elena Aleksandrova1, Tatiana Zarubina1, Margarita Kovelkova1, Peter x Influence of geophysical conditions.

Strychkov2, Ekaterina Yakovleva1 M.D., Ph.D., Konstantin Korotkov3 Ph.D.

x Dependence of effects on the experience, training and other qualities of practitioners.

1 Pirogov Russian National Research Medical University, Moscow, Russia 2 Institute of Advanced Education, Moscow, Russia; Correlation of results between Dr. Tiller and Dr. Korotkov teams makes them 3 National Research University of Informational Technologies, Mechanics and especially significant and opens perspectives for further understanding of the Optics, Saint Petersburg, Russia.

enigmas of consciousness.


Results allowed to start a new scientific line of the instrumental investigation of the geoactive zones. In this field culturological aspect of the problem is of Introduction

particular interest. Idea that from the ancient times historical monuments have Arterial hypertension (AH) is the most common chronic disease in the world been correlated with the “places of power”, areas, having some specific and one of the most serious medico-social problems. 30% of adult population of geophysical properties, specific influence to the human condition, has been industrial countries present with elevated degree of arterial pressure and only 12-experimentally approved.

15% of population having stable arterial hypertension. The disease is a common The perspectives of study are exciting for everybody interested in the spiritual cause of life-endangering acute heart (myocardial infarction) and brain (cerebral history of humankind. We may define the whole new international research line: stroke) diseases including people of the working age. About 50% of all fatal cases development of the maps of energy parameters of sacral subjects and the from cardio-vascular diseases fall on arterial hypertension. It is the underlying program of study of their influence to the human psycho physiological condition, cause of numerous chronic diseases of the heart, brain, kidneys, eyes and other in relation with the environmental situation, health and psycho-type of people.

so-called target organs.

This type of research may be a public domain, contrary to the archeological Even today, when doctors have sufficient number of potent antihypertensive at excavations, they do not need any official allowance, and results may be their disposal average life span of the patients with arterial hypertension is not exchanged and published through the Internet. This approach opens up a broad high. Arterial pressure often elevates among adolescents, the disease dramatically field of activity. Not just sun-bathing at the beach or wandering around with photo getting younger along with most cardiovascular diseases. Hypertension and camera, but participating in the international project on the development of atherosclerosis are turning into important cause of premature death.

Geoactive Zones Database. The only condition for this – is ability to operate with Bio-Well Camera.

190 Different research lines Energy fields electrophotonic analysis in humans and nature 191

There is no doubt that prophylaxis and treatment of arterial hypertension are 603 patients aged from 18 to 83, 265 males and 338 females served as most effective at its early stages and not at the chronic stage with organic changes.

participants. All were divided into groups according to AH degree and stage and It is disappointing that in many cases the onset of the disease stays unseen as early degree of cardio-vascular complications risk in the nearest 10 years. Groups were rises in arterial pressure (AP) are not always associated with subjective symptoms divided as follows:

which makes arterial hypertension a disease difficult to diagnose at the early Control group – 136 people (47 men and 89 women) and experimental group –

stages. Therefore, the early diagnostics of arterial hypertension and a special 467 people (218 men and 249 women).

program of its further development prevention present an important scientific and practical problem. The focus today is on methods allowing detecting early Experimental group was in its turn divided in different ways: changes characteristic for arterial hypertension. Public health service needs According to the degree of AH: AH1 of the 1st degree – 92 persons (38 men highly sensitive non-invasive screening tests for AH.

and 54 women); AH2 of the 2nd degree – 185 people (89 men and 96 women); Thus, the objective of the given study was evaluation of GDV potential for AH3 of the 3d degree – 190 people (91 men and 99 women).

detecting patients with different degrees of severity of arterial hypertension in the According to the AH stage: AH1 of the 1st stage – 103 people (40 men and 63

course of population screening.

women); AH2 of the 2nd stage – 283 people (130 men and 153 women); AH3

Several classifications of arterial hypertension are accepted in medicine. To date, of the 3d stage – 81 persons (48 men and 33 women).

according to UHO recommendations arterial hypertension is classified into 3

According to the likely risk of cardio-vascular complications: low risk (risk 1) –

degrees (depending on the degree of AP elevation) and 3 stages (depending on 56 people (24 men and 32 women); moderate risk (risk 2) – 88 people (33 men the involvement of target organs). There are also 4 categories of arterial and 55 women); high risk (risk 3) – 114 people (51 men and 63 women); hypertension depending on the likelihood of cardio-vascular complications in the extremely high risk (risk 4) – 209 people (110 men and 99 women).

nearest 10 years. The complications are related to the presence of the risk-factors, involvement of target organs and/or concomitant (associated) diseases.

In the course of the study, the following BIO-gram parameters were analyzed: image area, normalized area, intensity, spectrum width, brightness and fractality.

The study was aimed at:

According to these parameters, we analyzed images of all 10 fingers as a whole x

Calculating discriminative functions to detect patients with different as well as of separate sectors selected in accordance with Korotkov’s Diagnostic degrees and stages of arterial hypertension as well as the risk of cardio-vascular Table: cerebral cortex, cerebral vessels, the right and left heart, vascular system, complications;

coronary vessels, hypophysis, hypothalamus, epiphysis, thyroid, suprarenals, kidneys, the nervous system.

x

Assessing dependence of the most qualitative patient grouping on one of the recognized AH classifications.

While using different diagnostic methods, one should know how reliable it is, taking into account its specificity and sensitivity for practical evaluation of x

Assessing the influence of patients’ gender on calculation discriminative different health problems.

functions.

Specificity implies the share of healthy people found healthy in the course of x

Building the model of logistic regression to detect patients with different diagnostics from the total number of healthy.

degrees of AH severity.

Sensitivity implies the share of ill patients found ill in the course of diagnostics Materials and methods

from the total number of ill patients.

Results and discussion

192 Different research lines Energy fields electrophotonic analysis in humans and nature 193

Results of GDV measurements have been analysed using ANOVA statistics and degree of involvement of target-organs. All group proved to have the following discriminative analysis. The first stage of the work included step by step sectors in common: cerebral cortex, thyroid and kidneys and starting with Group discriminative analysis of GDV parameters between the control group and each 2 (diagnosed AH2 of the 2nd degree) – the heart sector. Specificity and sensitivity of the three groups of arterial hypertension (according to degree of severity) increased along with higher degree of arterial hypertension.

separately. Results are presented in Table 1. The given figures are the result of It is known that GDV parameters are dependent of the patient’s gender and cross-testing.

arterial hypertension takes a different course in males and females.


Discriminative functions were calculated for all three degrees of arterial hypertension for males and females separately (Table 2).


Table 1. Grouping according to degree of AH. Results for all patients.


AH degree

Specificity

Sensitivity


AH1

67,6 %

62,0%

Table 2. Grouping according to AH degree. Results for males and females.

AH2

68,4%

66,5%

AH degree Females

Males

AH3 72,8% 77,9%

Specificity

Sensitivity

Specificity

Sensitivity


AH1

76,4%

77,8%

80,9%

73,7%

As an example, we present discriminative function between the control group and the group of the 1st degree of severity AH1. 8 parameters were included into AH2

74,2%

81,3%

63,8%

70,8%

the obtained discriminative function, among them were spectrum width of the AH3

75,3%

74,7%

78,7%

80,2%

images of the right thumb, sector of the head (cortex and vessels), suprarenals, thyroid and kidneys. Discriminative function between the control group and diagnosed AH1 group looks as follows:

Common diagnostic parameters were found for all groups, they included sectors of the cerebral cortex, vascular system, heart, thyroid and kidneys. Specificity and sensitivity of the functions obtained in groups divided on the basis of patients’

D = 0.017*X1+5.538*X2-0.476*X3+0.426*X4+0.001*X5-1.720*X6

gender were 5-9 % higher than for the mixed group.

+4.171*X7 +4.595*X8 -8.979

The number of diagnostic parameters used and percentage of difference for females with AH1 and AH2 were found higher than that for males. Men are If X1, X2 etc are the values of measured parameters for the particular person, known to have a tendency for higher arterial pressure against women of the tested patient either with 67.6% accuracy is being referred to the group of reproductive age. Differences on AP between men and women disappear after healthy, or with 62.0 % accuracy having the 1st degree of arterial hypertension women‘s menopause or ovarioectomy. AH incidence is lower in women below and should undergo an additional testing.

60 and higher over 60 against men of similar age.

From stage to stage of arterial hypertension the number of diagnostic parameters The next stage of the investigation was comparison of data obtained for patients increases from 8 up to 19, which is understandable as it coincides which the of the control group and groups with different stages of arterial hypertension.

194 Different research lines Energy fields electrophotonic analysis in humans and nature 195

Specificity and sensitivity values of calculated discriminative functions increased To sum it up, the course of arterial hypertension for women of the from the first stage of arterial hypertension to the third. Increase in specificity postmenopause period has the following characteristics: from stage to stage amounted to 67-80 %, and sensitivity – to 70-77%. The

- the disease is frequently manifested in perimenopause period (from the onset number of diagnostic parameters increased from stage 1 to stage 3 from 7 to 22.

of initial climacteric symptoms to one year after the least menstruation); For all stages, sectors of the cerebral cortex, heart, suprarenals and thyroid were involved in calculation.

- higher sensitivity to table salt;

- low-renin forms of arterial hypertension;

Table 3. Grouping according to AH stages. Results for the whole group.

- narrower diameter of the aorta;

AH stage

Specificity

Sensitivity

- characteristic rise in systolic arterial pressure;

- high rate of heart contractions;

Ahs1

66,9 %

70,9%

- menopause associated with increase in cardiovascular response induced by Ahs2

67,6%

73,5%

stress and rise in arterial pressure registered during 24-hour monitoring of arterial pressure;

AHs3

80,1%

76,5%

- more frequent involvement of target organs;


- more frequent hypertrophy of the left ventricle mostly of the concentric type; Discriminative functions were also calculated for men and women separately

- more frequent complications.

(Table 4).

Elevated arterial pressure and higher incidence of arterial hypertension in Table 4. Grouping according to AH stages. Results for males and females.

postmenopause are believed to result from other factors as well e.g. increase in the volume of circulating blood, higher body mass and higher noradrenalin level AH stage

Females

males

in the blood.

Specificity

Sensitivity

Specificity

Sensitivity

Discriminative functions were calculated to detect patients with different risk of Ahs1

80,9%

64,1%

80,9%

79,5%

cardio-vascular complications after arterial hypertension. Specificity and sensitivity of calculated functions amounted to 64 – 73.5% and 62.2 – 76%

Ahs2

68,1%

81,3%

75,3%

75,8%

respectively which correlates with values for the groups classified on the basis of AHs3

72,3%

67,3%

83,1%

84,4%

AH degree of severity. The number of diagnostic parameters increased depending on the risk group. Sectors reflecting the heart and kidneys were found as the most common for all groups (Tables 5, 6).

For this classification mean percentage of correct placements for men exceeded Table 5. Grouping according to the risk of cardio-vascular complications.

the one for women by 6-8%. It is likely to be associated with specific involvement Results for the mixed group.

of target organs for men and women.

Risk of cardio-vascular

Specificity Sensitivity

Arterial hypertension is one of the main risk factors of cardiovascular diseases in complications

women. Though the level of arterial pressure for women of the premenopause period is lower then for men of the corresponding age, AH incidence for elderly Risk 1

73,5 %

62,5%

women is higher.

Risk 2

69,9%

72,7%

196 Different research lines Energy fields electrophotonic analysis in humans and nature 197

made with the help of GDV and other diagnostic methods widely used in modern Risk 3

64,0%

64,0%

medicine.

Risk 4

69,9%

76,1%


Table 6. Grouping according to the risk of cardio-vascular complications.

Conclusions

Results for males and females.

Discriminative functions were calculated to detect patients with various degrees, Risk of cardio-Females

males

stages and risk of cardio-vascular complications in case of arterial hypertension.

vascular

Specificity Sensitivity Specificity Sensitivity The number of diagnostic parameters increased with higher degree of AH

complications

manifestation from 8 to 22 while specificity and sensitivity of calculated functions Risk 1

82,0%

75,0%

76,6%

58,3%

made up about 70%

Risk 2

78,7%

74,5%

70,2%

66,7%

Sectors of cerebral cortex, heart, thyroid, suprarenals and kidneys proved to be the most frequent diagnostic parameters. We believe that patients’ grouping was Risk 3

74,2%

77,8%

74,5%

78,4%

most qualitative under classification according to AH stages, which may be Risk 4

76,4%

75,8%

68,1%

72,7%

explained by the fact that in grouping according to AH stages both degree of AP

elevation and involvement of target organs were taken into account. Classification according to patients’ gender increased the accuracy of diagnostics by 5-9% which Feasibility of detecting patients with different AH degrees was tested with the help was due to differences in development and course of arterial hypertension in of logistic regression. Specificity and sensitivity were found close in values to women and men.

those obtained by discriminative analysis but values of specificity calculated by Thus, reliable differences between the control group of healthy patients and logistic regression were somewhat lower than those calculated by discriminative groups with various AH degrees and stages were calculated with sufficiently high analysis which determined our choice of the latter in our investigations (Table 7).

degree of accuracy which allows to include Electrophotonic - Gas Discharge Visualization technique into the population screening.

Table 7. Grouping according to AH degrees. Results calculated by logistic regression.


AH degree

Specificity

sensitivity


AH1

79,4 %

70,6%

AH2

68,3%

61,0%

AH3

58,1%

83,7%


Our findings correlate well with those obtained earlier by other investigators with the help of neuron network method as well as during comparison of the diagnosis

198 Different research lines Energy fields electrophotonic analysis in humans and nature 199

Express-evaluation of the psycho-physiological athlete; it is calculated in percents from 0 to 100%. EP = 100% is correlated with high level of competition readiness and high energy reserve.

condition of the Paralympic athletes

Stress Level (SL) is characteristic of the level of anxiety and stress, measured on Alexander, Drozdovski, PhD*; Irina, Gromova, **; Konstantin, Korotkov, the scale from 0 to 10, where 10 is a maximum stress level. Interpretation criteria PhD, Professor*

are given in Table 1.

*Saint Petersburg Federal Research Institute of Physical Culture and Sport; Participants

** Head Coach of the Skiing and Biathlon Paralympic Team of Russia Study was conducted at the training camp and in the process of the World Cup competitions in Norway from November 16 to December 18, 2011. 18 athletes of the Paralympic team of Russia on ski races and biathlon with damage to the Introduction

musculoskeletal system were tested: 4 women and 14 men; 9 athletes of top level, Monitoring of athletes’ activity for a long time allows creating the optimal training age 32.5+/- 8, (LW5/7, LW6, LW8, LW10, LW12 in accordance with process and preparing athletes for completions in the peak of their adaptation, International Paralympic Committee classification), 6 athletes of middle level, physical and psychological readiness [Drozdovski et al, 2012]. The best age 24+/- 5 (LW2, LW12) and 3 preparatory level, 17 years old (LW8). Athletes indication of this approach was successful performance of the Skiing and were measured every day in the morning before breakfast. In the process of study Biathlon Paralympic Team of Russia at Paralympic Winter Games Sochi-2014.

204 measurements in the training camp and 189 measurements before and in Athletes on Russian Paralympic Team achieved commendable results in the process of the World Cup have been performed. All athletes participated in biathlon: Gold – 7, Silver – 5, Bronze – 3, as well as in skiing: Gold – 10, Silver the study voluntary and with great interest; ethical considerations were taken into

– 3, Bronze - 6. These are remarkable results, which was achieved by combining account.

efforts of coachers, psychologists and scientists.

At the World Cup 2011 Russian Paralympic Team participated in this study had This paper presents results of testing several instruments for express-evaluation the following results: 6 medals in biathlon (3 gold, 1 silver and 2 bronze); 9

of athletes’ level of preparation in the training and competition periods and medals in skiing (5 gold and 4 silver); yang athletes took the 4th position which developing most efficient parameters for the practical applications.

demonstrated their potential for further competitions.

Methods

Results

The following methods and corresponding hand-held devices for athletes’

Averaged indexes of psycho-emotional tension, Energy Potential and Stress express-analysis were used in the study:

Level are presented at fig.1 and individual data at fig.2. Correlations between indexes and sport achievements at the World Cup competitions are presented in 1.

Evaluation of the psycho-emotional tension (PET) by measuring Tables 2-5.

Galvanic Skin Response with “Mirage” device; measuring electrodes were fixed on the pads of the index and ring fingers.

Discussions

2.

Evaluation of energy potential (EP) and stress level (SL) by the innovative Data of fig.1 suggest the following: 1) in the process of training athletes quite well Russian system: Gas Discharge Visualization technique. Measurements were responded to training loading; 2) athletes were well prepared to the completions taken from all 10 fingers.

of the World Cup; 3) athletes were able to keep high level of Energy Potential Energy Potential (EP) is a measure of psycho-physiological condition of an and low Stress Level during the competitions, which suggest the adequate selection of the training modalities.

200 Different research lines

Energy fields electrophotonic analysis in humans and nature 201

At the same time, as we see from fig.2, all athletes may be divided to three groups: x top-level athletes (NN 12-18 at fig.2) for them EP is very high and does not change much in all three sessions; stress level is the lowest at the moment of World competition, which suggest their high level of preparation; x middle-level athletes (NN 4-11) for them EP is lower and SL is higher than for the top group;

x preparatory level athletes (NN 1-3) – low level of EP and high level of stress.

We need to point out that in the training camp athletes having low level of Energy Potential and high Stress Level had professional consultations of sport psychologist for optimization of their training process and psychological condition.

Fig.1. Averaged on the group parameters of athletes measured at the different From the Table 2 we can make the following conclusions: 1) correlations moments: in the training camp; before the competition; at the moment of between psycho-emotional tension and Energy Potential are non-significant; 2) competitions.

strong positive correlations between Energy Potential in the training period, before (R= 0.674 p<0,01) and at moment of the World Cup (R= 0.728 p<0,01

and R= 0.953, p<0,001) were found.

From the Table 3 we may see the following strong positive correlations: 1) between psycho-emotional tension and Stress Level at the training camp (R=

0.498 p<0.05); between psycho-emotional tension at the training camp and Stress Level at the WC (R= 0.491 p<0.01); 2) between Stress Level at the training camp, Stress Level before the World Cup (R= 0.541 p<0.05) and Stress Level at the World Cup (R= 0.688 p<0.01 and R= 0.554 p<0.05).

From the Table 4 we may see the following strong correlations: 1) between Energy Potential at the training camp and Stress Level at the World Cup (R=-

0.622 p<0.01); 2) between Energy Potential before the World Cup and Stress Level both before (R=-0.620 p<0.01) and at the World Cup (R=-0.495 p<0.05); between Energy Potential at the World Cup and Stress Level at the World Cup (R=-0.699 p<0.01). No correlations between Energy Potential and Stress Level at the training camp were found.

Fig.2. Energy Potential and Stress Level for individual athletes measured at the After studding correlations between indexes of psycho-physiological condition of different moments: in the training camp; before the competition; at the athletes at the different stages of training and competition it is important to see moment of competitions.

202 Different research lines Energy fields electrophotonic analysis in humans and nature 203

correlations between indexes and competition results. Main results are presented in Table 5.


From the Table 5 we see correlations of different levels between psycho-Table 1. Interpretation criteria for Energy Potential (EP) and Stress Level (SL) emotional tension, Stress Level and competition results, it is clear that they are indexes

all negative; no significant correlations with Energy Potential were found.

EP

SL

Description of Condition

A direct measurement of Energy Potential and Stress Level in a fast non-invasive way is a quite new approach developed in Russian sport. It was tested for several 100%-80%

0-4

High level of psycho-physiological condition.

years with teams of different level and sport types and demonstrated high 90%-80%

4-8

High level of psycho-physiological condition, efficiency and reliability. These parameters are very important in understanding emotional tension.

athletes’ level of preparation for competitions, as well as for the correction of training process in accordance with human organism condition and its response 80%-60%

0-4

Affordable level of psycho-physiological condition.

to loading. The process of measurements takes 1-2 minutes, it may be done at 80%-60%

4-8

Affordable level of psycho-physiological condition, any place, even at the stadium; instruments may be run both from the power emotional tension.

outlet and from the battery. This paper for the first time presents this approach to the clinical sport medical community.

60%-40%

5-10

Acceptable level of psycho-physiological condition.

Energy and emotional depletion is possible; risk of C

Conclusions

traumas; overtraining.

The level of Energy Potential of an athlete created in the training period 40%-0% 5-10

Energy and emotional depletion; high level of stress; significantly influences the level of Energy Potential both before and at the time risk of traumas; overtraining. Detailed medical of important competitions. The level of Stress of an athlete recorded in the analysis is needed.

training period significantly correlates with the level of Stress both before and at the time of important competitions. Energy Potential and Stress Level have different level of correlations depending on the preparation period: at the training time no correlations were found, while before and at the competition time the level of correlations were highly significant. So the higher the level of Energy Potential achieved by the athlete in the training period, the lower the Stress Level in the competition time, which may contribute to the competition efficiency. The higher the Stress Level and Psycho-Emotional Tension in the training period, the lower the probability of high competition results.

Hand-held computer complexes “Mirage” and “GDV Sport” being used in this study allow to make express-analysis of psycho-physiological conditions of athletes with high precision at all the preparation and competition periods.

Calculated parameters help to carry out corrective actions directed to optimization of the athletes’ condition in the biofeedback regime.

204 Different research lines Energy fields electrophotonic analysis in humans and nature 205

Table 2. Correlations between Psycho-Emotional Tension (PET) and Energy Potential (EP) before and in the process of the World Cup (WC) competitions.

Table 4. Correlations between Energy Potential (EP) and Stress Level (SL)

* - p<0.05; ** - p<0.01; *** - p<0.001.

before and in the process of the World Cup (WC) competitions.

Indexes PET

PET

EP

EP

EP at the

Indexes

SL at the

SL before

SL at the

training

before

training

before

WC

training camp

the WC

WC

camp

the WC

camp

the WC

EP at the training camp

-0.343 -0.290

-0.622**

PET at the

X 0.377

0.024

0.307

0.013

EP before the WC

-0.204

-0.620**

-0.495*

training camp

EP at the WC

-0.273

-0.294

-0.699**

PET before the

X

-0.291

-0.243

-0.366

WC

Table 5. Correlations between competition results and parameters of psychophysiological condition before and in the process of the World Cup (WC) EP at the


X

0.674**

0.953***

competitions (11 athletes took part in biathlon and 15 athletes in skiing).

training camp

Indexes of psycho-

Results in the biathlon

EP before the

X

0.728**

physiological condition

WC

10.12.11

11.12.11

13.12.11

Total

result

EP at the WC


X

Sprint

Pursuit

Long dist.

Table 3. Correlations between Psycho-Emotional Tension (PET) and Stress SL at the training camp

-0.407

-0.349

-0.465

-0.413

Level (SL) before and in the process of the World Cup (WC) competitions.

PET before the WC

-0.540

-0.446

-0.570 -0.531

Indexes PET


PET

SL

SL

SL at the


Results in skiing

training

before

training

before

WC

camp

the WC

camp

the WC

15.12.11

17.12.11

18.12.11

Total

result

PET at the

X 0.377

0.498*

0.064

0.491*

Long dist.

Sprint

Middle dist.

training camp

SL at the training camp

-0.622*

-0.713**

-0.429

-0.707**

PET before the

X

0.353

0.054

0.425

SL before the WC


-0.590*


WC

PET before the WC

-0.574*

-0.540*

-0.567*

-0.683**

SL at the training

X

0.541*

0.688**

camp

SL before the

X

0.554*

WC

SL at the WC


X

206 Different research lines Energy fields electrophotonic analysis in humans and nature 207

Comparative Assessment of the Impact of Drinking Water Organization and Methodology of the Study

Quality on the Athletes’ Condition During Exercise Sample

Gavrilova ʔ.ʏ.,M.D., Ph.D, Professor., Glushkov S.I., M.D., Ph.D, Professor., The sample consisted of 40 athletes between the ages of 14 and 25, coming from Korotkov K.G., Ph.D. Professor., Churganov O.A. Ph.D. Professor., the Olympic Reserve School (St. Petersburg). Their skill level ranged from first-Shelkov O.M. Ph.D. Professor., Logvinov V.S., research associate class sportsmen (regional champions) to candidates for master of sport (nationally ranked players) and masters (national champions) in different kinds Federal State Institution «St. Petersburg Research Institute of Physical Culture of sports - athletics, rowing, triathlon, basketball. Two 20-person groups were and Sport», St. Petersburg, Russia

randomly selected - experimental and control. Groups were randomized by age, gender, skill level, and sports type. Subjects were aware of the goal of the experiment, but were not told which kind of water they would drink.

Introduction

Water is the main component of the internal environment of an organism. For For 30 days athletes in the experimental group drank water passed through an people whose work involves intense physical activity, the state of water-salt HRCM graphene filter [1]. Athletes in the control group consumed bottled metabolism is an important physiological requirement for maintaining optimum water.

performance. The Federal Service for Supervision of Consumer Rights Water source

Protection and Human Welfare notes the poor quality of drinking water in The filtering process utilizes the high-reactivity carbon mix (HRCM) - a new Russia. About 19% of samples from the water supply do not satisfy the sanitary-carbon material (Parent RU ʋ2163883, Patent US 7,842,271 B2 “Mass chemical standards and about 8% do not satisfy the bacteriological standards.

production of carbon nanostructures”). HRCM contains carbon nanostructures Nationwide, up to 30% of the samples of surface water sources do not meet that have an enormous surface area (about 2000 m^2 per gram). As such, when health standards for sanitary-chemical reasons, and up to 25% - for bacteriological moistened, HRCM carbon nanostructures form a mass which “entangles" even reasons. A serious problem is posed by water distributing systems - between 40%

the tiniest impurities and suspended particles both of an organic and of an and 70% of them are in need of replacement. According to a March 18, 2005

inorganic origin.

Service memo, “as a result of this, accidents at these systems and the subsequent microbial contamination of drinking water constitute an epidemic risk.” The Methods

memo states that out of all the disease outbreaks reported in 2004, 77.3% were The following methods and corresponding hand-held devices for athletes’

of an "AQUATIC" nature and were related to the poor state of the water system.

express-analysis were used in the study:

As such, the quality of drinking water may, along with a number of other factors play a certain role in determining the effectiveness of human activity. This holds 1. Heart Rate Variability (HRV) measurements by “Cardio-meter – MT”

especially true for activities involving extreme exertion - in particular for sports.

("Mycard-Lana" Co. St. Petersburg, Russia, www.mikard.ru).

This study focuses on identifying the impact of specially prepared water on the HRV indicators, which reflect features of cardiovascular regulation (a total of organisms of athletes.

24 indicators) serve primarily to characterize the adaptive reaction of an athlete to the stressful effects of graduated exercise. Statistical, spectral, and integrated indicators characterizing the state of different levels of the cardiac cycle regulation were used [McCraty R., Atkinson M., Tomasino D. and Bradley RT.

The Coherent Heart, HeartMath Research Center, Institute of HeartMath.


2006].

208 Different research lines

Energy fields electrophotonic analysis in humans and nature 209

2. The Profile of Mood States (POMS) test [3] was used to determine the significant differences in the dynamics of the following seven (out of nine) psychoemotional state and arrive at an integrated assessment of the mood and parameters. Systolic ABP prior to the exercise (p = 0.015), diastolic ABP prior stress levels of the athletes.

to the exercise (p = 0.012), HR prior to the exercise (p = 0.001), systolic ABP

after exercise (p = 0.001), peak oxygen consumption (p = 0.001), ABP recovery 3. To determine the level of the athletes’ physical ability peak oxygen time (p = 0.018), HR recovery time (p = 0.003). The values ABP, HR and their consumption (POC) based on the PWC170 sample was measured. These data recovery times decreased, while POC values increased (Fig. 1). The direction of access the optimality and efficiency of the athletes’ cardiovascular systems. [Mc these changes indicates a tendency toward the optimization of the functioning of Nair D.D., Lorr M., Droppleman L.F. Edits manual for the profile of mood the athletes’ cardiovascular system in the experimental group staits. SanDiego. California. – 1992].

These changes indicate the economization in the functioning of the 2. Stress system “General Electric Healthcare Cardiosoft” with the cycle cardiovascular system when that system is at rest, a reduction in the ergometry “Bike General Electric Healthcare” (General Electric USA).

hemodynamic cost of exercise for the subjects, a reduction in recovery time 3. Evaluation of energy potential (EP) and stress level (SL) by Gas Discharge following exercise, and an enhancement of the athletes’ aerobic capacity. This, Visualization technique with “GDV-Sport” device (“Biotechprogress” Co, St.

in turn, shows a reduction in the physiological price of exercise and an increase Petersburg, Russia, www.ktispb.ru). Measurements were taken from all 10

in the athletes’ performance following a month of drinking graphene-filtered fingers.

water.

Experimental protocol

First, athletes were given psychological tests, and their heart rate variability parameters (HRV) and gas discharge visualization parameters (GDV method) were measured. The athletes then used a velo ergometer (bicycle exercise, a variant of the PWC test 170), and their heart rate (HR) and arterial blood pressure (ABP) were recorded. At the end of the exercise HRV and GDV data were again recorded, along with the time it took to recover baseline heart rate and blood pressure. Psychological testing was then repeated. All this was conducted before and after the 30-day period.

The variance of the data was analyzed. Indicator changes relative to the baseline in the two groups of athletes were analyzed using Student’s t-test. Fisher’s exact test was used to assess the significance of differences in the sampling fractions.


Results

Fig.1. Dynamics of the statistically significant changes in the values of hemodynamic parameters in the experimental group.

Based on the analysis of obtained data we can make the following conclusions: 2. Out of the corresponding parameters in the control group only post-exercise 1. The criteria for measuring the impact of graphene-filtered water on the athletes HR values had statistically significant changes (p = 0.001). Even this HR decrease were their bodies’ reactions to exercise. During the standard veloergometric test was small.

in the experimental group, the analysis of the mean values of hemodynamic parameters comparing the initial and final test results yielded statistically

210 Different research lines

Energy fields electrophotonic analysis in humans and nature 211

3. In the control group of athletes a statistically significant reduction was found in 6. At the same time the difference in the values of averaged on the group the values of the pre-exercise energy potential (EP) when comparing data from parameters obtained through the GDV method when comparing samples of data the initial and the final test (p ӊ 0.001). There was no statistically significant from the experimental and control groups, either in the initial or in the final test change after the exercise.

was not statistically significant. Nor were such differences found before or after dosed exercise.

4. In the experimental group baseline EP values slightly increased during the active period of the training cycle and this increase was different for different 7. The use of rhythmocardiography made it possible to evaluate the state of the systems and organs in accordance with GDV measurements.

system of regulation of the HRV and the adaptive capacity of the athletes. In the experimental group comparing the data of the initial and the final testing prior to 5. The analysis of the energy performance of individual organs and organ systems physical activity revealed statistically significant differences (by the t-test) in the showed a substantial increase in the EP values obtained during the final testing in dynamics of 14 indicators. I.e. the average duration of the cardiac cycle (P =

the experimental group relative to those obtained in the control group. This 0.006), mode (p = 0.001), the minimum duration of the cardiac cycle (P = 0.007) applies to a number of organs and organ systems, as illustrated by Figure 2, which and the maximum duration of the cardiac cycle (p = 0,002); SDNN (p = 0,048); shows the difference in the EP values of athletes in the experimental group and RMSSD (p = 0,010); NN50count (p = 0,025); pNN50 (p = 0,025); MD (p =

those in the control group in the first and second trials.

0.007), vegetative equilibrium index (VEI) (p = 0.041); vegetative index of rhythm (VIR) (p = 0.030), indicator of the adequacy of regulatory processes (IARP) (p =

0.023), stress index (SI) (p = 0,034); VLF (p = 0.029). The F-test also found statistically significant differences for the vegetative equilibrium index (VEI) (p =

0.043) and the stress index (SI) (p = 0.005). The direction of changes in the indicator values reflects a downward trend in the sympathicotonic activity, an increase in the parasympathetic effects, and a centralization of heart rhythm management. This testifies to the improving capabilities of the body.

8. Particularly noteworthy was the decrease in the average of the vegetative index of rhythm (VIR) from 3.0 to 2.5 units. The predictive value of VIR in respect to the athletes’ aerobic capacity is shown above. Similarly, in this series of experiments, the increase in the peak oxygen consumption (POC) was 8.9%. In the control group of athletes a similar dynamic of the parameters was not seen.


Instead, there were shifts of indexes (VEI, VIR, and SI) in the other direction.

Fig. 2. The difference between the values of the indicator of the energy potential For example, the value of VIR increased from 2.3 to 2.8 units (p = 0.01).

of athletes in the experimental and control groups in the first and the second 9. There were no significant changes in the values of HRV parameters for trials. EP is measured in the scale from 0 to 10. 1 - Cardiovascular system, 2 -

athletes in experimental group after a bicycle exercise. But the overall trend of heart, 3 – blood vessels, 4 – mammary glands, 5 - hypothalamus, 6 – pineal gland, their dynamic shows the growth in their bodies’ adaptive capacities, primarily due 7 – pituitary gland, 8 - pancreas, 9 - adrenal glands, 10 - genitourinary system., 11

to the activation of the sympathetic nervous system (the LF parameter). At the

- the spine, 12 – sigmoid colon, 13 - Rectum, 14 - cecum, 15 – ascending colon, same time, control group data included indicator values changing significantly in 16 – transverse colon, 17 - the liver, 18 - pancreas, 19 – appendix, 20 -

the opposite direction. This is evidence of some reduction of the functional genitourinary system, 21 - kidney.

reserves of athletes in the control group during the bicycle exercise test.

212 Different research lines

Energy fields electrophotonic analysis in humans and nature 213

10. While examining the psychological state of the athletes the POMS test was Conclusion

conducted twice - before and after exercise. No significant changes in the groups’

1. The results of the experiment have shown that after a month of drinking water values of psychological profile indicators were found. The exception was the passed through a graphene filter, athletes experienced statistically significant increase in the mental strength factor following exercise in the experimental changes in their cardiovascular system. The values of HR, ABP at rest, and group (the V factor p=0.001) (Fig. 3). At the same time, the trends in the diastolic blood pressure after exercise decreased. POC increased by 9%, while psychological states, as measured by the POMS test, in the two groups went in HR recovery time following exercise decreased by 18% - and ABP by 10%. These opposite directions. Prior to exercise, the total cumulative index S in the data indicate improvement in physical performance, optimization of the experimental group had an optimizing tendency. Other parameters moved circulatory system, and enhanced exercise tolerance. Such trends were not slightly in the direction of optimization. In the control group comparing the data observed in the control group.

from the initial and final tests prior to exercise revealed a decrease in values of mental strength (V) and the cumulative index (S). The values of depression and 2. Based on variation pulsometry data, members of the experimental group had fatigue indicators increased.

a tendency towards the optimization of the vegetative balance (increased parasympathetic effects on the HRV and decreased sympathetic ones). This testifies to the improving body capabilities of the body.

3. In response to exercise athletes in the experimental group saw an increase in the values of their mental strength factor, reflecting the level of competitive readiness.

4. Data obtained using the GDV method suggest that the values of energy parameters for the athletes in the experimental group remained stable, whereas the control group exhibited a decline in the values of these parameters. At the same time, in the experimental group there was a significant increase in energy potential values pertaining to specific organs and organ systems.


5. It is shown that athletes drinking water passed through a graphene filter experienced growth in aerobic capacity, physical performance, energy potential, and their bodies’ adaptive reserves.


Figure 3. The dynamic of the POMS psychological profile in the experimental and control groups.

214 Different research lines Energy fields electrophotonic analysis in humans and nature 215

Can a bird fly across the Atlantic?

demonstrate that they should have lost more than half of their weight during flight, which they do not. So the typical belief that “a few grams of Konstantin Korotkov

fat can be enough to fuel a hummingbird or a warbler for a thousand miles over the Gulf and beyond” is wrong. Birds need fat to protect their body How does an organism exist and develop? We commonly speak of the number from the low temperatures and winds, which they meet at high altitudes, of calories in different types of food products. The main idea seems to be that but this fat is not enough to fuel their flight. From the classical point of the more calories we consume, the more weight we gain. Simple Western dietary view it is impossible for the little birds to fly across the ocean, but they do systems are based on the calculation and restriction of calories. However, after and have been doing so for thousands of years! Technically and initial enthusiasm for this system and after thousands of pages published on the scientifically speaking, they should fall into the sea halfway across and be subject it was discovered that in most cases it simply did not work. An individual drowned but they do not. Do they follow another set of physical laws than organism is much more complicated than an oven, where you can calculate heat those affecting inanimate objects?

produced from the fuel loaded. Some people can eat quite sparingly and stay active and healthy; some need a lot of food all the time. Many families suffer We believe that there is one and the only Physics: The Physics of the from the permanent hunger of growing children.

Material World that is valid both for inanimate subjects and living beings.

The only difference consists in the complexity and time-span of the On the other hand, we need to ask the question: do we produce physical energy processes. When a stone accepts sun energy, its temperature increases: only from food? If this was the case, then how could little birds fly across the Atlantic? Let us make a simple calculation. A direct measurement of energy the more sun, the higher the temperature. To some extent, a stone may expenditure for free-flying songbirds migrating from Panama to Canada by using be accepted as a CLOSED SYSTEM. When a healthy person stays in the doubly labeled water was reported by a big international group [Wikelski M., et.

sun, his temperature remains constant and we can assume that a person al 2003]. In accordance with their measurements migratory flight used 1

15.5

maintains H

HOMEOSTASIS – that is equilibrium, or balance with the kJ* h-1 total energy while flying, which agrees with predicted values surrounding environment. This is only possible due to the two-sided estimated from multiple models and wind-tunnel studies [Lindström Å., process of interchange. We accept energy from the sun, from food, from et.al. 1999; McWilliams S. R., et.al 2004]. For songbirds, one nocturnal the air, and we dissipate energy in space. Schrödinger and later, Prigogine, non-stop flight for up to 600 km lasts about 7.7 h, which takes 119.35 kJ

Haken and others developed the concept that biological subjects are so-of energy. At the same time researchers found by direct measurements called O

OPEN SYSTEMS. It means that during all the lifetime they that individual birds had roughly the same body weight and fat content in exchange not only material stuff, but both energy and information with the the mornings before and after their migratory flights (6% body-weight loss), environment.

no change in fat content. For a 30 g bird, 6% is 1.8 g. Each gram of How this may help a bird in a migratory flight to generate an extra energy?

carbohydrate provides four kcal of energy (16.75 kJ), one gram of fat provides nine kcal (37.68 kJ). Direct transformation of 1.8 g of body mass We do not believe that cells work as a “nuclear reactor,” but we assume to energy provides from 30 to 68 kJ of energy. In reality only part of weight that birds may extract energy directly from the air. Birds breathe using a loss generates energy, so this number would be even less. As we see, from unique system in which air follows a one-way route through the respiratory 119 kJ spent less than half would be covered by body mass. For birds flying system. This system is unlike our lungs, in which the air backtracks where through Atlantic for 3000-4000 miles non-stop, these calculations it came from. Their system of respiration (breathing) is very efficient -

216 Different research lines Energy fields electrophotonic analysis in humans and nature 217

much more efficient than our system. Birds have two relatively small lungs may initiate chain reactions in solutions containing bioorganic molecules (where gas exchange occurs), but the lungs are augmented by bellows-like such as lipids, proteins, nucleic acids, carbohydrates. The best solution of air sacs (where no gas exchange occurs). These air sacs keep the lungs this kind is blood [Voeikov V. 2001].

perpetually inflated (even when the bird is exhaling). Our lungs alternately Radical chain reactions indeed damage important biological molecules in fill and empty out. The bird's respiratory system takes up 20% of a bird’s vitro, and ROS are traditionally regarded in biochemical literature as volume (our respiratory system takes up only 5% of our volume). In the highly hazardous particles. However, a lot of old and recent data urge to bird's respiratory system, air first flows through air sacs (located even inside assume that ROS are eminently needed for normal vital activity.

their hollow bones) that direct fresh, oxygenated air into the tube-like lungs According to some estimates, 10-15% of oxygen consumed by an animal (parabronchi, where gas exchange occurs) both when the bird inhales and at rest is routed to the univalent pathway of reduction, along which ROS

when it exhales. We assume that together with molecular oxidation there are generated [Souza, H.P., et.al. 2002]. Under the stressful conditions, should exist some alternative way of O2 utilization, which provides when activity of ROS-generating enzymes is amplified, the total oxygen metabolic energy.

consumption increases by nearly 20%, and supposedly all this excess is The oxygen molecule (O2) is unique among other molecules in the univalently reduced [Vlessis A.A. et al. 1995]. Therefore, ROS should environment. It has two electrons with parallel spins (unpaired electrons) play a very important role in normal physiology [Voeikov V. 2001].

on its valence molecular orbital ((Mnn, where n represents an electron Oxygen takes part in chain processes in the organism, which may be with a certain spin) [Mattheus P. 1986]. Such constitution of an outer presented as follows [Voeikov V. 2001]:

electron shell is termed a triplet state. Triplet Ɉ2 is a vast energy store, able x

to release more than 180 kcal/mole upon its reduction to two water 4(O2 + eņ + H+) Æ 4HO2 (1)

molecules after gaining four electrons (together with their carriers –

2(HO Ĺ

Ļ

2

+ HO2 ) Æ 2H2O2 +2O2 (2)

protons). However, it cannot be spontaneously reduced, because H

according to Wigner spin conservation rules it cannot directly interact with 2O2 + H2O2 Æ 2H2O + O2 (3)

singlet state molecules [Salem L. 1982], and that is one of the reasons of

-------------------------------------------------------

triplet oxygen stability. There are several ways to activate oxygen, and one 4O2 + 4eņ + 4H+ Æ 2H2O +3O2 (4)

of them – one-electron oxygen reduction. When electrons are taken by Ɉ2

one after another, intermediate products – reactive oxygen species (ROS) Remarkably, O2, which gives birth to free radicals, is basically the only arise. Some of them are free radicals: chemical species, which unlike usual substance, which can terminate these reactions. As a bi-radical, it can molecules possess an odd number of electrons at their valence electron provide multiplication of radicals and increase probability of their shell. In the desire to get a pair for a lone electron free radicals avidly recombination. If a radical R

Rn interacts with O pp

2

, a peroxyl radical,

interact with the neighboring electron donors, which are normally ROOp, arises. It can abstract a hydrogen atom from an appropriate represented by molecules. A free radical gains an electron from a molecule R’H making it a radical R’p and turning itself into a peroxide molecule and turns into a molecule, while a molecule turns into a free molecule ROOH. The bond O-O in peroxides is relatively weak and radical and starts to look for another electron donor. Thus, free radicals under certain conditions it can break down giving rise to two new free

218 Different research lines Energy fields electrophotonic analysis in humans and nature 219

radicals, R

ROn and HOp in addition to a radical R’p. This event is a termed a delayed chain branching. New radicals can recombine with other References

radicals present in the system and terminate the chain, which they lead.

Agadganjan N.A. Human Physiology. Ɇ. Medical Book. 2003.

No less important is that the reactions of radical recombination have a Abrilian, S., Devillers, L., Buisine, S., & Martin, J.-C. (2005). EmoTV1: Annotation of unique property – quanta of energy released in such reactions may be Real-life Emotions for the Specification of Multimodal Affective Interfaces. Proceedings equivalent to the energy of photons of visible or even UV-light. Gurwitsch of Human-Computer Interaction International, Las Vegas, USA, July 2005.

[Gurwitsch A.G., Gurwitsch L.D. 1999] and Szent-Gyorgyi [Szent-Akhmeteli GG, Baranova TN, Korotkina SA, Pakhomova KS. The experience of using Gyoergyi A. 1968] insisted that in the organized milieu of living systems EPI-graphy technique for the determination of rhesus-factor and human blood groups the energy of electron excitation does not easily dissipate into heat, rather according to ABO system. In: Proceedings of VIII International Scientific Congress on it may radiatively or in a radiation-less manner transfer to macromolecules, Bioelectrography. St Petersburg 2004:63-66.

or to their ensembles. Energy packages equivalent to the energy of light Akhmeteli GG, Boldyreva US, Komissarov NV, et al. Diagnostics of allergy aetiology photons released in the reactions of radical recombination may serve for using gas-discharge visualization (EPI) technique: Workbook. St Petersburg 2005:39.

biochemical reactions triggering, while their rhythmic release under Alexandrova RA, Fedoseev BG, Korotkov KG, Philippova NA, Zayzev S, Magidov M, certain conditions may suggest their role of pacemakers of metabolic Petrovsky I. Analysis of the bioelectrograms of bronchial asthma patients. In: Proceedings of conference “Measuring the human energy field: State of the science”.

processes [Voeikov, V. 2003].

National Institute of Health. Baltimore, MD, 2003:70-81.

In every chain reaction up to 8 eV of energy is realized [Voeikov, V. 2003].

Alexandrova RA, Nemtsov VI, Koshechkin DV, Ermolev SU. Analysis of holeodoron For a bird consuming humid air during flight, this may create an extra treatment effect on cholestasis syndrome patients. In: Proceedings of VII International source of electron-excited states for the generation of ATP in muscles. 1

Scientific Congress on Bioelectrography. St Petersburg 2003:4-6.

eV is equal to 1.6*10-19 J, in 1 cm3 of air we have about 1016 oxygen Alexandrova RA, Trofimov VI, Bobrova EE, Parusova VK. Comparison of dermal molecules, so to generate 100 kJ a bird needs to process about 106 cm3 of allergology test results and changes of EPI bioelectrograms in case of contact with phytocosmetic substance in test tube. In: Proceedings of VII International Scientific air. During the flight, the respiratory rate of a little bird is 60-160 breathes Congress on Bioelectrography. St Petersburg 2003:1-4.

per minute [McWilliams S. et al. 2003]. We may evaluate that a bird Augner Chr., Hacker G.W., Schwarzenbacher S., Pauser G.: Gas Discharge processes about 103 cm3 of air per minute. Therefore, to process 106 cm3

Visualization (GDV): Eine auf physikalischen Methoden und Meridiananalysen of air bird would need 103 minutes, or 16 hours. This number is quite basierende Technik zur Untersuchung von Stressreaktionen und energetischen compatible with a duration of migratory flights.

Schwachstellen – Zwischenbericht laufender Forschung. (Gas Discharge Visualization (GDV): A Technique Based on Physical Methods and Meridian Analyses to Detect Biological organisms extract energy not only from food, but also directly from Stress Reactions and Energetic Weaknesses – Report of Ongoing Research.) Dt. Ztschr.

air, water, and the sun. External stimulii play a fundamental bio-energetic role by f. Akup. (DZA) – German Journal of Acupuncture & Related Techniques 53, 14-20, activation of inner vital processes. We may tell that they operate as informational 2010.

signals for stimulating inner reactions. In other words, subthreshold Baeckkyoung Sung, Min Su Kim, Byung-Cheon Lee, Jung Sun Yoo, Sang-Hee Lee, informational stimulation and consumption, activates a cascade of pro homeo-Youn-Joong Kim, Ki-Woo Kim, Kwang-Sup Soh. Measurement of flow speed in the kinetic activity.

channels of novel threadlike structures on the surfaces of mammalian organs.

Naturwissenschaften 2008, 95:117–124

220 References

Energy fields electrophotonic analysis in humans and nature 221

Bauer E.. Theoretical biology. M, 2004.

Bundzen P., Korotkov K., Nazarov I., Rogozkin V. Psychophysical and Genetic Bell I., Lewis D.A., Brooks A.J., Lewis S.E., Schwartz G.E. Gas Discharge Visualisation Determination of Quantum-Field Level of the Organism Functioning. Frontier Evaluation of Ultramolecular Doses of Homeopathic Medicines Under Blinded, Perspectives, 2002, 11, 2, 8-14.

Controlled Conditions. J of Alternative and Complementary Medicine, 2003, 9, 1: 25-37

Bundzen P., Korotkov K., Unestahl L.-E. Altered States of Consciousness: Review of Belogorodsky B.A., Sidorov G.A., Yantikova T.A., Yanovskaya E.E. Scenar therapy and Experimental Data Obtained with a Multiple Techniques Approach. J of Alternative and application of EPI bioelectrography. In: Proceedings of VIII International Scientific Complementary Medicine, 2002, 8 (2), 153-167.

Congress on Bioelectrography. St Petersburg 2004:67-68.

Bundzen PV, Korotkov KG, Belobaba O, et al. Correlation between the parameters of Bezilla, Todd A. In Theory Traditional Osteopathy as an Integrated Model of Holistic induced opto-electron emission (Kirlian effect) and the processes of corticovisceral Medicine. Altern Complement Therapies. April 1997, 3(2): 140-144.

regulation. In: Proceedings of VII International Scientific Congress on Bioelectrography.

St Petersburg 2003:89-91.

Bigler C , Levite D, van der Meer M, Kaufmann M und Weibe FP. Rotwein unter Hochspannung: Mehrjährige Qualitäts-Untersuchung mit Gas-Discharge-Visualisation Bundzen PV, Korotkov KG, Korotkova AK et al. Psychophysiological Correlates of (GDV). 10. Wissenschaftstagung Ökologischer Landbau. Beitrag archiviert 2009

Athletic Success in Athletes Training for the Olympics Human Physiology. J Fiziologiya Cheloveka 2005; 31; 3:316–323.

Bigler C, Weibel FP. Testing agricultural commodities with Gas-Discharge-Visualisation (EPI). In: Proceedings of the International Scientific Conference: Measuring energy Bundzen PV, Korotkov KG, Korotkova AK, Priyatkin NS. Psycho-physical prognosis of fields. Kamnik/Tunjice, Slovenia 2007:93-96.

winnings in sport. J of Medicine and Sport, 2005;2:23-24.

Bishop C.M. Circulatory variables and the flight performance of birds. J of Experimental Bundzen PV, Korotkov KG. Correlation between Psycho-physiological and Genetic Biology 208, 1695-1708. 2005.

Factors for Top-level and Middle-level Athletes in Sports with Physical Endurance. In: Korotkov K, editor. Measuring Energy Fields. Fair Lawn: Backbone Publishing, 2004:83-Blalock J.E. A molecular basis for bidirectional communication between the immune 91.

and neuroendocrine systems. Physiol Rev. 1989 Jan; 69 (1): 1-32.

Burns SB, Burns JL. Andrew Taylor Still, M.D.: Founder of Osteopathy. J Altern Bolehan VS, Maltsev OV, Lvov NI, et al. Serosity analysis of influenza and ARD patients Complement Med. 1997, 3(3): 213-214.

by means of Gas Discharge Visualization method. In: Proceedings of X International Scientific Congress on Bioelectrography. St Petersburg 2006:54-55.

Buyantseva LV, Korotkov KG, Zhegmin Qian, Bascom R, Ponomarenko GN. Gaseous discharge visualization (EPI) bioelectrography in patients with hypertension: pilot study.

Brezhneva TV, Borovkov EI, Dovgusha VV, et al. Patient state monitoring using EPI In: Proceedings of conference “Measuring the human energy field: State of the science”.

method in case of application of autoquantum therapy. In: Proceedings of XI National Institute of Health. Baltimore, MD, 2003:31-54.

International Scientific Congress on Bioelectrography. St Petersburg 2007:9-12.

Bykov AT, Chernousova LD, Brodnikova NN. Bioelectrography in complex evaluation of Brizhik, L.; Del Giudice, E.; Jørgensen, S. E.; Marchettini, N.; Tiezzi, E., The role of adaptation under laser therapy in sanatorium conditions. In: Proceedings of X International electromagnetic potentials in the evolutionary dynamics of Ecosystems, Ecological Scientific Congress on Bioelectrography. St Petersburg 2006:170-171.

Modelling, 220, 1865-1869, 2009

Chai BH, Zheng GM, Zhao Q, Pollac G (2008). Spectroscopic studies of solutes in Bulanova KJ, Lobanok LM, Ignatenko AO, et al. Gas Discharge Visualization technique aqueous solutions. J Phys Chem 112:2242-2247.

in investigation of small ionizing radiation doses affect on human organism. In: Proceedings of X International Scientific Congress on Bioelectrography. St Petersburg Chaplin MF (2000). A proposal for structuring of water. Biophys Chem 83:211-221.

2006:11-12.

Chesnokova VN, Varentsova IA, Golubina OA. Actual experience with the EPI Bioelectrography in evaluation of a human adaptation to climatographic factors. In: Bulatova Ɍȿ, Popova TV, Tarasova MN. Peculiarities in EPI-graphy results dynamics of Proceedings of X International Scientific Congress on Bioelectrography. St Petersburg a woman under physical and emotional stress influence. In: Proceedings of IX

2006:43-44.

International Scientific Congress on Bioelectrography. St Petersburg 2005:86-92.

222 References

Energy fields electrophotonic analysis in humans and nature 223

Chizhevskiy A.L.. Terrestrial echo of solar storms. M.: Mysl’, 1992

Gagua PO, Giorgobiani LG, Korotkov KG, et al. Gas discharge visualization method in Ciesielska I.L., Masajtis J. The preliminary studies of influence of garments on human lung carcinoma monitoring during chemotherapy. Georgian Journal of Radiology. Tbilisi beings' corona discharge. International Journal of Clothing Science and Technology.

2003;2(15):53.

2008. 20. N 5. pp 299 – 316. Ciesielska I.L. Images of corona discharges as a source of Gedevanishvili EG, Giorgobiani LG, Kapanidze A, et al. Estimation of Radiotherapy information about the influence of textiles on humans. Autex research journal, 2009, vol.

effectiveness with Gas Discharge Visualization (EPI). In: Proceedings of VIII 9, no1, 36-41

International Scientific Congress on Bioelectrography. St Petersburg 2004:98-99.

Cioca GH, Giacomoni P, Rein G. A correlation between EPI and heart rate variability Gibson s, Williams B (2005). The effect of music and focused meditation on the human measures: a new measure of well being. In: Korotkov K, editor. Measuring Energy Fields.

energy field as measured by the gas discharge visualization (GDV) technique and profile Fair Lawn: Backbone Publishing, 2004:59-65.

of mood states. Subtle Energies and Energy Medicine. 16: 57-60.

Cohen S, Popp FA. Whole-body counting of biophotons and its relation to biological Gimbut VS, Chernositov AV, Kostrikina EV. EPI parameters of woman in phase rhythms. In: Chang JJ, Fisch J, Popp FA, eds. Biophotons. Dordrecht: Kluwer Academic dynamics of menstrual cycle. In: Proceedings of VIII International Scientific Congress Publishers, 1998:183-191.

on Bioelectrography. St Petersburg 2004:80-82.

Del Giudice E, Spinetti P.R., Tedeschi A. Water Dynamics at the Roots of the Gimbut VS. Diagnostic possibilities of the modified EPI technique in obstetrics. In: Metamorphosis in Living Organisms. www.mdpi.com/journal/water. 2010.

Korotkov K, editor. Measuring Energy Fields. Fair Lawn: Backbone Publishing, 2004:65-Del Giudice E, Vitiello G. Role of the electromagnetic field in the formation of domains 75.

in the process of symmetry-breaking phase transition. Phys Rev A. 74: 1-9. 2006.

Gladishev, P. Thermodynamic Theory of the Evolution of Living Beings. 1997; J. Biol Dobson P, O’Keeffe E. Investigation into the EPI Technique and Personality. In: Physics 23(2), 129-131.

Proceedings of the Intern Scientific Conference: Measuring energy fields.

Grogono A. W., Woodgate D. J. Index for measuring health. Lancet. 1971.; 2

Kamnik/Tunjice, Slovenia 2007:111-113.

(7732):1024-6.

Drozdov DA, Shatsillo OI. Analysis of the EPI-bioelectrography images from the Gudakova G.Z., Galynkin V.A., Korotkov K.G. Research of growth phases of fungi positions of vegetology. In: Proc of IX Intern Scientific Congress on Bioelectrography.

cultures of CANDIDA type by means of gas discharge visualization (Kirlian effect)//

St Petersburg 2005:3-7.

Mycology and phytology. 1990. Vol.24, N 2. pp. 174-179.

Drozdovski A, Gromova I, Korotkov K, Shelkov O, Akinnagbe F. Express-evaluation Gursky VV, Krizhanovsky EV, Korotkina SA, et al. EPI application for diagnostics of of the psycho-physiological condition of Paralympic athletes. Open Access Journal of patient functional states. In: Proceedings of X International Scientific Congress on Sports Medicine. Journal of Sports Medicine, ʋ 3, 2012, p. 215-222.

http://www.dovepress.com/express-evaluation-of-the-psycho-physiological-condition-of-Bioelectrography. St Petersburg 2006:180-183.

paralympic-peer-reviewed-article-OAJSM

Gurwitsch A.G. and Gurwitsch L.D. Twenty Years of Mitogenetic Radiation. 21st Edwards R, Ibison MC, Jessel-Kenyon J, Taylor RB. Light emission from the human Century Science & Technology.. 12: No 3, 41-53, 1999.

body. Complementary Medical Research 1989;3:16-19.

Hacker G.W., Pawlaka E., Pauser G., Tichy G., Jell H., Posch G., Kraibacher G., Aigner Froehlich H Long-range coherence and energy storage in biological systems. Int J Quant A., Hutter J. Biomedical Evidence of Influence of Geopathic Zones on the Human Chem 2:641-649.1968

Body: Scientifically Traceable Effects and Ways of Harmonization. Forsch Komplementärmed Klass Naturheilkd 2005;12:000–000

Gagua PO, Gedevanishvili EG, Kapanidze A, et al. Experimental study of the EPI Technique application in oncology. In: Korotkov KG eds. Measuring Energy Fields: Hao BL (1985). Chaos. World Scientific, Singapore.

State of the Science. Fair Lawn: Backbone Publishing Co., 2004:43-51.

http://catarrh.narod.ru

Gagua PO, Gedevanishvili EG, Korotkov KG, et al. Experimental study of the EPI Jadad AR, Moore RA, Carroll D, et al. Assessing the quality of reports of randomized Technique application in oncology. J Izvestia Vuzov – Priborostroenie 2006;49;2:47-50.

clinical trials: Is blinding necessary? Controlled Clin Trials 1996;17:1-12.

224 References

Energy fields electrophotonic analysis in humans and nature 225

Johansson B (2009). Effects of Functional Water on Heart Rate, Heart Rate Variability, Korotkov K., Korotkin D. Concentration dependence of gas discharge around drops of and Salivary Immunoglobulin A in Healthy Humans: A Pilot Study. J Altern inorganic electrolytes. J of Applied Physics, 2001, 89, 9, 4732-4737.

Complement Med 15:871-877.

Korotkov K., Korotkova A. Innovation technologies in sport: study of Jungdae Kim, Vyacheslav Ogay, Byung-Cheon Lee, Min-Su Kim, Inbin Lim, Hee-Jong psychophisiological state of athletes with GDV method. (in Russian) M. Sport. 2008.

Woo, Hi-Joon Park, Jan Kehr, and Kwang-Sup Soh, Catecholamine-Producing Novel Korotkov K., Krizhanovsky E., Borisova M., Hayes M., Matravers P., Momoh K.S., Endocrine Organ: Bonghan System. Medical Acupuncture 2008, 20, 2: 97-102

Peterson P., Shiozawa K., and Vainshelboim A. The Research of the Time Dynamics of Kim S., P.Georgiou, S.Lee, S.Narayanan. “Real-time emotion detection system using the Gas Discharge Around Drops of Liquids. J of Applied Physics. 2004, v. 95, N 7, pp.

speech: Multi-modal fusion of different timescale features”, Proceedings of IEEE

3334-3338.

Multimedia Signal Processing Workshop, Chania, Greece, 2007

Korotkov K., Williams B., Wisneski L. Biophysical Energy Transfer Mechanisms in Kobayashi M. Modern technology on physical analysis of biophoton emission and its Living Systems: The Basis of Life Processes. J of Alternative and Complementary potential extracting the physiological information. In: Musumeci F, Brizhik LS, Ho MW, Medicine, 10, 1, 49-57, 2004.

eds. Energy and Information Transfer in Biological Systems. New Jersey, London: Korotkov K.G., Gurvits B.Y., Krylov B.A. New conceptual approach to early cancer World Scientific Publishers 2003:157-187.

detection // Mind and physical reality. – 1998. – Vol. 3, No. 1, pp. 51-58.

Kolkin JG, Kolkina VJ. EPI bioelectrography in a modern surgical clinic. In: Proceedings Korotkov K.G., Kryzhanovsky E.V., Korotkina S.A., Borisova M.B., Vainshelboim A., of X International Scientific Congress on Bioelectrography. St Petersburg 2006:183-185.

Matravers P., Momoh K., Haies M., Shaas N. // Research of time series of the features of Coulson, M.: Attributing Emotion to Static Body Postures: Recognition Accuracy, liquid phase subjects gas discharge glow //Priborostroenie. 2003. Vol.45. N6. pp.18-24.

Confusions, and Viewpoint Dependence. Journal of Nonverbal Behavior 28, 2004, 117-Korotkov K.G., Mystery of life glow. SPb., publishing house Ves’. 2003 p.157.

139.

Korotkov KG, Matravers P, Orlov DV, Williams BO (2010) Application of Electrophoton Kondratiev AU, Korotkina SA, Korotkov KG, et al. Estimation of psycho-emotional state Capture (EPC) Analysis Based on Gas Discharge Visualization (GDV) Technique in

– new experimental approaches and methods. In: Proceedings of VII International Medicine: A Systematic Review. J Altern Complement Med. 16(1): 13-25.

Scientific Congress on Bioelectrography. St Petersburg 2003:23-24

Korotkov KG, Nechaev VA, Petrova EN, et al. Research of EPI fluorescence of human Korotkov K. Physical processes in sliding gas discharge. J Technical Physics Letters, 412: hair. J Izvestia Vuzov – Priborostroenie 2006; 49; 2:51-56.

67-70, 1985

Korotkov KG, Polushin US, Levshankov AI, et al. Technical facilities and new quantum Korotkov K, Bundzen P, Bronnikov V, Lognikova L. Bioelectrographic correlates of the biophysics technologies for assessment of human and biological objects state: EPI direct vision phenomenon. J Altern Complement Med 2005;11;5:885–893.

method. Actual problems in hardware for anesthetization and resuscitation help. St Korotkov K, Orlov D, Madappa K. New Approach for Remote Detection of Human Petersburg 2003:46.

Emotions. Subtle Energies & Energy Medicine • V 19, N 3, pp 1- 15, 2009.

Korotkova AK. Gas Discharge Visualization bioelectrography method in studies of Korotkov K, Orlov D. Analysis of Stimulated Electrophotonic Glow of Liquids.

master-sportsmens psycho-physiology. Abstract of a PhD thesis in psychology. St www.WaterJournal.org V 2, 2010.

Petersburg, 2006.

Korotkov K. Aura and Consciousness – New Stage of Scientific Understanding. St Kostyuk N, Meghanathan N, Isokpehi R.D., Bell T, Rajnarayanan R, Mahecha1 O, Petersburg, Russia: Russian Ministry of Culture, 1998:270. Korotkov K. Human Energy Cohly H., Biometric Evaluation of Anxiety in Learning English as a Second Language.

Field: study with EPI bioelectrography. NY. Backbone publishing, 2002:360

International Journal of Computer Science and Network Security, V.10 No.1, pp 220-Korotkov K. Champs D’Energie Humaine. Resurgence Collection. Belgique. 2005.

229, 2010

Korotkov K. Human Energy Field: study with EPI bioelectrography. Backbone Krashenuk AI, Danilov AD, Korotkov KG. Investigation of system optimization of publishing, NY. 2002.

vegetative nervous system work under hirudotherapy impact as a result of comparative

226 References

Energy fields electrophotonic analysis in humans and nature 227

analysis of EPI signal and cardiorythm nonlinear analysis. In: Proceedings of X

Milhomens Newton. Fotos Kirlian – Como Interpretar. Ibrasa. Sao Paulo. 1997.

International Scientific Congress on Bioelectrography. St Petersburg 2006:31-35.

Milton R. Alternative Science. Park Street Press. Rochester, Vermont, 1996.

Krashenuk AI, et al. Wave effects of medical leeches. In: Korotkov K, editor. Measuring Montagnier, L. et al. , Electromagnetic Signals Are produced by Aqueous Nanostructures Energy Fields. Fair Lawn: Backbone Publishing, 2004:95-103.

Derived from DNA Bacterial Sequences, Interdisciplin. Sci.: Computational Life Sci., Krizhanovsky EV, Borisova MV, Lim KC, Chan TS. Estimation of mineral water’s 1, 81-90. 2009

influence on the human body state by means of EPI bioelectrography. J Izvestia Vuzov O’Keeffe E. The EPI technique as an aide to stress assessment and its potential

– Priborostroenie 2006;49;2:62-66.

application in recruitment and selection of individuals suited to positions associated with Kupeev VG. Zagumennikov S.U. Capabilities of EPI method in analysis of different high level of stress. In: Proceedings of X International Scientific Congress on treatment-and-reducing measures effectiveness in case of different chronic pathologies of Bioelectrography. St Petersburg 2006:202-204.

internals. In: Proceedings of X International Scientific Congress on Bioelectrography. St Olalde J. The Systemic Theory of Living Systems and Relevance to CAM. Parts 1-3. e-Petersburg 2006:35-38.

CAM Oxford Press, 2005, 1-3.

Lindström Å., Klaassen M. & Kvist A. 1999. Variation in energy intake and basal Olalde JA, Magarici M, Amendola F, del Castillo O. Correlation between Electrophoton metabolic rate of a bird migrating in a wind-tunnel. Funct. Ecol. 1999. 13:352-359

s values and diabetic foot amputation risk. In: Proceedings of Conference: Lovygina ON. The method of gas discharge visualization within the system of assessment Neurobiotelekom. St Petersburg 2004:54-58.

of vegetative functions in sportsmen’s organisms. In: Proceedings of IX International Olalde J. El Cáncer sí se cura. Editorial: Adaptogenos Internacionales C.A. Caracas, Scientific Congress on Bioelectrography. St Petersburg 2005:21-22.

Venezuela. 2003.

Mamedov UE, Zverev VA. EPI-graphy as a method of express diagnostics and screening Olalde J. Systemics La Revolución de los Adaptogenos en la Salud. Editorial Melvin C.A.

control of psychosomatic pathology in contemporary medicine practice. In: Proceedings Caracas, Venezuela. 2001.

of IX International Scientific Congress on Bioelectrography. St Petersburg 2005:110-111.

Olalde, J. A., Gomes, Libia, Oswaldo de Castillo. Increase in human Energy Field (EPI) Mamedov UE. Diagnostic potential of EPI-graphy in eduction of musculoskeletal and with Systemic Medicine. Proceedings of the Congress “Science, Information, Spirit”

bronchopulmonary system’s pathologies. In: Proceedings of X International Scientific 2005

Congress on Bioelectrography. St Petersburg 2006:38-39.

Om SN, Gursky VV. Research of the characteristics of adaptation syndrome in Mandel P. Energy Emission Analysis; New Application of Kirlian Photography for Antarctica by means of gas discharge visualization technique. In: Proceedings of VIII Holistic Medicine. - Synthesis Publishing Co., Germany. 1986.

International Scientific Congress on Bioelectrography. St Petersburg 2004:15-21.

Mattheus P.C.S. Quantum chemistry of atoms and molecules. Cambridge University Om SN. Chronic alcoholism diagnosis by means of Gas Discharge Visualization Press. 1986.

technique. In: Proceedings of VIII International Scientific Congress on Mc Nair M., Lorr M., Droppleman L. POMS Manual. San Diego, California. 1992.

Bioelectrography. St Petersburg 2004:92-96.

McWilliams S. R., Guglielmo C, Pierce B and Klaassen M. Flying, fasting, and feeding Papuga P. Methodological difficulties in EPI evaluation in patients with hyperthyroidism.

in birds during migration: a nutritional and physiological ecology perspective. J of In: Proceedings of the International Scientific Conference: Measuring energy fields.

Aviation Biology 35: 377_/393, 2004.

Kamnik/Tunjice, Slovenia 2007:113-116.

Measuring Energy Fields: State of the Art. EPI Bioelectrography series. Vol. I. Korotkov Pavlov VS, Petritskaya EN, Abaeva LF. EPI method implementation in studies of serum K. (Ed.). Backbone Publishing Co. Fair Lawn, USA, 2004. 270 p.

luminescence in cases of different pathologies. In: Proceedings of XI International Measuring the Human Energy Field: State of the Science (2002). Ed. R.A. Chez. National Scientific Congress on Bioelectrography. St Petersburg 2007:21-22.

Institute of Health, Samueli Institute, Maryland.

228 References

Energy fields electrophotonic analysis in humans and nature 229

Petritskaya EN, Pavlov VS, Kartashova NV, et al. Evaluation of bioresonance therapy Rubik B, Brooks A (2005). Digital High-Voltage Electrophotographic Measures of the influence on human organism using EPI method. In: Proceedings of X International Fingertips of Subjects Pre and Post-Qigong. Evidence Based Integrative Medicine. 2: Scientific Congress on Bioelectrography. St Petersburg 2006:39-40.

245-242.

Petrova E.N., Korotkov K.G., Orlov D.V., Korotkova A.K. Principles of development Saeidov W. Living water from Tunjice and its properties. In: Proceedings of the and structure of the computer complex for health state assessment. Instrumental International Scientific Conference: Measuring energy fields. Kamnik/Tunjice, Slovenia Development Journal (in Russian). 2009. 52, ʋ 5. pp. 16 – 20.

2007:38-39.

Pitirimova TN, Cheryakova IS, Pizhova EG. Application of EPI method in alternative Salem L. Electrons in Chemical Reactions. First Principles. New York: Wiley medicine. In: Proceedings of X International Scientific Congress on Bioelectrography.

Interscience. 1982.

St Petersburg 2006:40-42.

Sanches Fernando. Aura y Ciencia. Mandala Ediciones. Madrid. 2000.

Pollack, G.H. Water, Energy and life: fresh views from the water’s edge. International Schwartz G., Simon W. The Energy Healing Experiments. Artia Books. 2007.

Journal of Design & Nature and Ecodynamics, 5, 27-29, 2010.

Science of Whole Person Healing. Volumes 1 and 2. Rustum Roy (Ed.). New York, Polushin J, Levshankov A, Shirokov D, Korotkov K. Monitoring Energy Levels during Lincoln, Shanghai. 2004.

treatment with GDV Technique. J of Science of Healing Outcome.. 2:5. 5-15, 2009.

Scottish Intercollegiate Guidelines Network. A Guideline Developers’ Handbook.

Polushin US, et al. Evaluation of patients after abdominal surgery with EPI. In: Korotkov Edinburgh: SIGN, 2001.

K, editor. Measuring Energy Fields. Fair Lawn: Backbone Publishing, 2004:51-59.

Senkin VV, Ushakov IB, Bubeev UA, Stepanov VK. EPI bioelectrography method in Popova TV, Bulatova TE, Tarasova MN, et al. Personality-oriented correction approach air and space medicine. J Izvestia Vuzov – Priborostroenie 2006;49;2:57-61.

to a student health improvement problem. In: Proceedings of X International Scientific Senkin VV, Ushakov IB, Bubeev UA. Bioelectrographic criteria of overload tolerance Congress on Bioelectrography. St Petersburg 2006:146-150.

of summer pilot team in centrifuge expert test. In: Proceedings of Conference: Priyatkin NS, Korotkov KG, Kuzemkin VA, et al. EPI bioelectrography in research of Neurobiotelekom. St Petersburg 2004:69-70.

influence of odorous substances on psycho-physiological state of man. J Izvestia Vuzov –

Sergeev SS, Pisareva SA. The use of gas-discharging visualization method (EPI) for Priborostroenie 2006;49;2:37-43.

monitoring a condition of the personnel at short-term rehabilitation. In: Proceedings of Radin D. The Conscious Universe. HarperEdge. 1997

VIII International Scientific Congress on Bioelectrography. St Petersburg 2004:128-129.

Radin, D. I. Entangled minds: Extrasensory experiences in a quantum reality. New Shabaev VP, Kolpakov NV, Muminov TA, et al. Results and future prospects of EPI-York: Simon & Schuster. 2006.

graphy application for differentional diagnostics and monitoring of the treatment of lungs tuberculosis and profound of mycosis fungoides – zaaminelles. In: Proceedings of VIII Rgeusskaja G.V., Listopadov U.I. Medical Technology of Electrophotonics – Gas International Scientific Congress on Bioelectrography. St Petersburg 2004:117-118.

Discharge Visualization - in Evaluation of Cognitive Functions. J of Science of Healing Shoaf A.R., Shaikh A.U., Harbison R.D., and Hinojosa O. Extraction and Analysis of Outcome. V.2, N 5, pp.15-17, 2009.

Superoxide Free Radicals (.O2-) from Whole Mammalian Liver. J. Biolumin.

Rizzo-Roberts N. EPI description and discussion of safety issues. In Measuring Energy Chemilumin. 6: 87-96.

Fields: State of the Art. EPI Bioelectrography series. Vol. I. Korotkov K. (Ed.). Backbone Sorokin O.V., Abramov V.V., et. al Gas-discharge characteristics of the prolipherat Publishing Co. Fair Lawn, USA, 2004. pp. 25-30.

activity of mono-nuclear. Medicine and education in Siberia (in Russian). ʋ 4 – 2009.

Roberts NR, Shealy N, Tiller W. Are there electrical devices that can measure the body’s Sorokin O.V., Druginin V.U. et al. Character of interconnection between energy state change to an acupuncture treatment. In: Korotkov K, editor. Measuring electrophotonic emission and heart autonomic regulation for patients with hypertention.

Energy Fields. Fair Lawn: Backbone Publishing, 2004:31-39.

Medicine and education in Siberia (in Russian). ʋ 5 – 2010.

230 References

Energy fields electrophotonic analysis in humans and nature 231

Sorokin O.V., Khadanov A.I. et al. Electrophotonic emission as reflection of micro-Vainshelboim A.L., Hayes M.T., Korotkov K., Momoh K.S. EPI Technology circular fluctuatuayions. Medicine and education in Siberia (in Russian). ʋ 5 – 2010.

Applications for Cosmetic Sciences IEEE 18th Symposium on Computer-Based Medical Systems (CBMS 2005). Dublin, Ireland. June 2005.

Souza, H.P., Liu, X., Samouilov, A., Kuppusamy, P., Laurindo, F.R, and Zweier. J.L., Quantitation of superoxide generation and substrate utilization by vascular NAD(P)H

Vainshelboim A.L., Hayes M.T., Korotkov K., Momoh K.S. Observing the Behavioral oxidase. Am. J. Physiol. Heart. Circ. Physiol. 2002, 282: H466-H474.

Response of Human Hair to a Specific External Stimulus Using Dynamic Gas Discharge Visualization Journal of Cosmetic Science. Proceedings of the First International Stepanov A, Sviridov L, Korotkina SA, Achmeteli GG, Krizhanovsky EV. Application Conference on Applied Hair Science. Full Manuscript. Princeton, New Jersey. June 9-of the EPI-graphy technique for the estimation of antigen-antibody reaction. In: Korotkov 10, 2004. pp. S91-S104.

K, editor. Measuring Energy Fields. Fair Lawn: Backbone Publishing, 2004:39-43.

Vainshelboim A.L., Hayes M.T., Momoh K.S. Bioelectrographic Testing of Mineral Stolley K, Frey RJ, PhD. Osteopathy. The Gale Encyclopedia of Alternative Medicine.

Samples: A Comparison of Techniques. J Altern Complement Medicine. 2005: Vol. 11, Ed. Laurie Fundukian. 3rd ed. Detroit: Gale, 2009. 4 vols.

No. 2, pp. 299-304.

Strukov EU. Facilities of Gas Discharge Visualization method for assessment of Vainshelboim AL, Hayes MT, Korotkov K, Momoh KS. EPI Technology Applications functional state of organism in preoperational period. Abstract of a medical doctoral for Cosmetic Sciences. IEEE 18th Symposium on Computer-Based Medical Systems candidate’s thesis. St Petersburg, Military Medical Academy, 2003.

(CBMS). Dublin, Ireland June 2005.

Sviridov L.P., Stepanov A.V., Khlopunova O.V., Korotkov K.G., Akhmeteli G.G., Vainshelboim AL, Hayes MT, Momoh KS. Bioelectrographic testing of mineral Korotkina S.A., Kryzhanovsky E.V. // Registration of agglutination assay by means of gas samples: A comparison of techniques. J Altern Complement Med 2005;11;2:299-304.

discharge visualization method // Modern microbiology to clinical medicine and epidemiology: materials of scientific conference, St. Petersburg, May 21, 2003. –

Van Wijk EPA, Ackerman J, Van Wijk R. Effect of meditation on ultraweak photon St.Petersburg: VMedA., 2003-pp. 32-33.

emission from hands and forehead. Research in Complement and Classical Natural Medi 2005;12: 107-112.

Szadkowska I. , Masajtis J., Gosh J.H. Images of corona discharges in patients with cardiovascular diseases as a preliminary analysis for research of the influence of textiles Vepkhvadze R, Gagua R, Korotkov KG, et al. EPI in monitoring of lung cancer patient on images of corona discharges in textiles' users. Autex research journal, 2010. v l. 10, n condition during surgical treatment. J Georgian oncology. Tbilisi 2003; 1(4):60.

1, pp 26-30.

Vernadskiy V.I. The Biosphere and the Noosphere. M.: Nauka, 1967

Szent-Gyoergyi A. Bioelectronics. A study in Cellular Regulations, Defence, and Cancer.

Vlessis A.A. et al. Role of Reactive O2 in Phagocyte-Induced Hypermetabolism and Academic Press, N.Y., London, 1968.

Pulmonary Injury. J. Appl. Physiol. 78: 112-116. 1995.

Tiller W., Dibble W., Kohane M. Conscious Acts of Creation. Pavior Publishing, Voeikov V. Active Oxygen, Water, Photons, and Life. Rivista di Biologia/Biology Forum; Lafayette CA. 2001

94 (2), pp. 237-258. 2001.

Tiller W. A., and W. E. Dibble. An Experimental Investigation of Some Reconnective Voeikov VL, Volkov AV, Senkin VV, et al. Comparative characteristics of diagnostic Healing Workshops via a Unique Subtle Energy Detector. Consciousness and Physical criteria complex and assessment of effectiveness of bioadaptive method “biophotonic”

Reality Journal. 2009, N 8, 27-32.

on the functional state of the body. In: Proceedings of VIII International Scientific Tumanova AL. Comparative analysis of EPI bioelectrography results in clinical practice.

Congress on Bioelectrography. St Petersburg 2004:77-80.

In: Proceedings of XI International Scientific Congress on Bioelectrography. St Voeikov, VL, Del Giudice, E. Water Respiration - The Basis of the Living State. Water Petersburg 2007:26-27.

1:52-75. 2009

Tumanova AL. Rehabilitation of eye diseases in sanatoria and health resorts practice.

Volkov A. The Prinicples of Health. Moscow. 2004 (in Russian) In: Proceedings of XI International Scientific Congress on Bioelectrography. St Petersburg 2007:27-29.

Volkov AV, Hunderyakova NV, Telesheva TU, Kondrashiva MN. Characteristics and state of organism correlation investigation by means of EPI method and by activity of

232 References

Energy fields electrophotonic analysis in humans and nature 233

succinate dehydrogenase in lymphocytes. In: Proceedings of XI International Scientific Congress on Bioelectrography. St Petersburg 2007:12-15.

Acknowledgments

Volkov AV, Telesheva TU, Gursky VV, Krizhanovsky EV. Statistical model of patient diagnosis based on different parameters of EPI-grams. In: Proceedings of IX

Writing this book would not been possible without the dedication of many brilliant men International Scientific Congress on Bioelectrography. St Petersburg 2005:27-28.

and women, some of whom I’ve gotten to know for many years. This is first of all our Volkov AV, Telesheva TU, Kondakov SE. Application of modified EPI Russian team of friends and colleagues: Roman Yusubov, Zaur Guseinov, Elena Bioelectrography method in determination of individual sensitivity to foodstuffs by Yanovskaya and many others. This is my dear friends and colleagues Christian and Silvie example of serum study. In: Proceedings of X International Scientific Congress on Bordes, Krishna Madappa, Vladimir Voeikov, Wadim Seidov, Len Wisnwski, Jirka Bioelectrography. St Petersburg 2006:16-18.

Rysavy, Kimba Arem and many others who participated in research and develpment.

Volkov AV, Telesheva TU. Some phenomenology aspects of induced by EPI method bioelectrographic activity of human. In: Proceedings of X International Scientific I want to thank my daughter Anna, who helps me in life and work.

Congress on Bioelectrography. St Petersburg 2006:14-16.

Special thanks to my wife, travel companion and Love, Dr. Irina Dmitrieva, to whom I Wagner F. W. The dysvascular foot: a system of diagnosis and treatment. Foot Ankle dedicate this book.

1981; 2, 64-122.


Web ref. 1. http://korotkov.org/ [02.02.2010]

Web ref. 2. http://ktispb.ru/en/index.htm [02.02.2010]

Web ref.. 3. http://catarrh.narod.ru

Wiggins PM (2002). Enzymes and two states of water. J Biol Phys Chem 2:25-37.

Wikelski M., Tarlow E. M., Raim A., Diehl R. H., Larkin R. P., Visser G. H. Costs of migration in free-flying songbirds. Nature. Vol 423. 12 June 2003. p 704

Williams B. How does gas discharge visualization technique assess a body? Emerging models of energy and control in biophysics and physiology. In: Proceedings of X

International Scientific Congress on Bioelectrography. St Petersburg 2006:211-214.

Wisneski L., Anderson L. The Scientific Basis of Integrative Medicine. CRC Press.

2005, 2009 (second edition).

Yakovlev VP, Zinatulin SN, Zhdanov AN. Investigation of respiratory maneuvers influence on autonomic nervous system state using Gas Discharge Visualization technique. In: Proceedings of X International Scientific Congress on Bioelectrography.

St Petersburg 2006:44-45.

Yakovleva EG, Struchkov PV, Zarubina TV, et al. Evaluation of EPI technique diagnostic possibilities in examination of the patients afflicted with arterial hypertension. In: Proceedings of X International Scientific Congress on Bioelectrography. St Petersburg 2006:216-218.


Proof

Digital Proofer

Printed By Createspace